M.I.T. Ocean Engineering • Project Athena

The Cluster Will Be

Down Saturday

25 May

0001 - 2400

The cluster will be down and inaccessible on Saturday, 20 May, due to a planned power outage. The lack of power will continue until midnight. Machines should be restarted Sunday morning, however, much depends on how quickly Athena responds. Please plan accordingly.