Athena Cluster Equipment Serial and MIT Numbers

Updated 8/2/90

All entries are serial numbers unless otherwise noted Location CPU Keyboard Monitor

Workstations m7-321-1 WF 54105844 B044302ME6 AB54800LE9

* **

VAXstation II MIT#’s 0186871 0186760

m7-321-2 WF 63508293 B060204KU6 AB635015I4 VAXstation II/RC MIT# 0202324

m7-321-3 WF 63508317 B06320ACP6 AB64600NK3 VAXstation II/RC MIT# 0202325

m7-321-4 WF 63508290 B06320ADI6 AB65200IE5 VAXstation II/RC MIT# 0202326

m7-321-5 WF 63508307 B071906321 AB63501351 VAXstation II/RC MIT# 0202327

m7-321-6 WF 63508318 B06320ABM4 AB62600YW4 VAXstation II/RC MIT# 0202328

m7-321-8 26-003860 A110H012669 54153? IBM PC/RT MIT# 0211372

m7-321-9 WF54005698 BO00305584 AB63001LI8 VAXstation II MIT#0186916

2 Location CPU Keyboard Monitor

m7-321-10 WF60406621 BO720060N4 AB542008H1 VAXstation II MIT#0186997

m7-321-11 WF54105741 BO720060C4 VAXstation II MIT#0186894

m7-321-12 WF54003707 BO72006055 AB84200DGE VAXstation II MIT#0202266

Printer and Server

m7-321-7 WF 63508323 VAXstation II/RC MIT# 0202329

VT101 ABBY845

printer HY-36985 LNO3 ScriptPrinter MIT# 0202330

Other Equipment

plotter 628810-10266 DMP-62A MIT# 0222251

Tandon’s CPU 416444 Model: TM6005A Tand. Keybd T-264325-86 Samsung Mon. 70204412 Model: MA2565 Tandon’s Print. 057769 Model: Epson FX80t

* **

The MIT# for the CPU The MIT# for the Keyboard