Athena Cluster Equipment Serial and MIT Numbers Updated 21 August 1990

All entries are serial numbers unless otherwise noted CPU Monitor Keyboard Mouse MIT ID#

Workstations

m7-321-1 VAXstation II

** *

WF 54105844 AB54800LE9 B044302ME6 0186760 0186871 CUTTY-SARK m7-321-2 VAXstation II/RC WF 63508307 AB63501351 B071906321 0202327 AUSTRALIA m7-321-3 VAXstation 3100 Color ABO24055R2 FF02134613 B001100343 B094600551 0233164 COURAGEOUS m7-321-4 VAXstation 3100 B/W ABO2406A39 AB84200DFC BO02402195 BO02308238 0233109 KOOKABURRA m7-321-5 VAXstation 3100 B/W ABO2406AFX AB84200EIL BO02402245 BO02309725 0233110

CPU Monitor Keyboard Mouse MIT ID#

INTREPID m7-321-6 VAXstation 3100 B/W AB02406A7H AB84200H78 B0022402216 B002309746 0233108

BLUENOSE m7-321-9 VAXstation II WF60406621 AB542008H1 BO720060N4 0186997

COLUMBIA m7-321-10 VAXstation 3100 B/W AB02406A0F AB84200IJ2 B002408753 B002409060 0233112

m7-321-8 IBM PC/RT 26-003860 54153? A110H012669 0211372

STARS-AND-STRIPES m7-321-11 VAXstation 3100 Color ABO24055U8 FF02134614 B001100365 B094600564 0233139

KIWI-MAGIC m7-321-12 VAXstation 3100 Color ABO24055S4 FF02134616 B001103713 B094600555 0233138

FREEDOM m7-321-13 VAXstation 3100 Color ABO24055T6 FF02134610 B001100352 B094600511 0233137

CPU Monitor Keyboard Mouse MIT ID#

Other Equipment

m7-321-7 VT101 & VAXstation II/RC Server WF 63508323 ABBY845 0202329

oe LNO3 ScriptPrinter *** HY-36985 0202330

edgar plotter DMP-62A 628810-10266 MIT# 0222251

IBM Compatible PC Component Serial Number Model Number Maker

CPU 416444 TM6005A Tandon Keyboard T-264325-86 Tandon Monitor 70204412 MA2565 Samsung Printer 057769 FX80t Epson

* ** ***

The MIT# for the CPU The MIT# for the Keyboard For the printer itself