The BIOGRAPHICAL screen displays student information.  Data contained in 
boxes can be updated, although the term address is updated by first pressing
the "UPDATE TERM ADDRESS" button at the bottom of the screen.  You can move
around with the arrow keys, or by positioning the cursor on a field with
the mouse and then pressing the left-mouse button.  To change data, position
the cursor at the end of the data, and erase it with the delete key; then type.  

You can confirm or cancel your updates.  Confirming your updates causes the 
changes you made to be sent to the Registrar for verification.  The updates
will take approximately 5 days to be processed; you will not see your changes
on this screen until that time.  Cancelling your updates causes the screen to
be refreshed with the original information.

