The changes you made to your biographical information will be sent
to the Registrar for review tonight.  If your changes are appropriate,
the SIS database will be updated.  This will take no more than 5
business days.  If you return to this screen later in your SIS session,
your changes will appear, but they have not yet been approved.  You
may make subsequent changes, which will OVERRIDE your previous changes.
If you exit SIS and re-enter it in the next five days, the changes you
just made will not appear; don't repeat your changes, unless they are
different from the original changes.

If you have any questions, contact the Registrar's Office in building
E19  or call x-xxxx.
