The Hartford Courant. ©1998

MURPHY, Genevieve (Warren) NEWINGTON

MURPHY, Genevieve (Warren) Genevieve (Warren) Murphy, of Newington, wife of the late Thomas F. Murphy, died Tuesday (Feb. 24, 1998) at St. Francis Hospital and Medical Center. Born in Newbury Port, MA, she had lived in the Newington area for39 years. She was a member of St. Mary’s Church, Newington. She was an executive secertery with the Underwood Company of Hartford for 20 years. She leaves a son, Thomas C. Murphy of Somerville, MA; a daughter Kathleen E. Murphy of Newington; her beloved dog, Colin. The funeral will be Thursday, 9 a.m. from the Sheehan-Hilborn-Breen Funeral Home, 1084 New Britain Ave., West Hartford, with a Mass of Christian Burial, 10 a.m., in St. Mary’s church Newington. Burial will be in West Meadow Cemetery, Newington. Friends may call at the funeral home Today from 5-8 p.m. In lieu of flowers, donations may be made to the House of Bread, Home program, 453 Main ST. Hartford or to I.S.C.A. Health Committee, c/o Connie Vanacore, R.D., #2 Roxitcus, Mendham, NJ 07945.

Published in The Courant: 2/25/98

New Search | Information | Classifieds | the courant