Lying-Naked-in-the-Periwinkle

Internet - 18.187.1.74 Ethernet - 08:00:20:f8:f2:f9

LNITP Lying Too-Long

System Serial Number - FW0440140 MIT Tag Number - 0358413

Multics

srz

ΣΠΒ