\def\stdafterruleskip{2\Internote}
\vsize=10.5in
\hsize=7.7in
\voffset=-0.75in
\hoffset=-0.75in
%\relativeaccidentals
\raggedbottom
\nopagenumbers
\font\eightsl=cmsl8
\def\freqbarno{99}
\parindent 0pt
\musicsize=17\relax
\def\nbinstruments{1}\relax

