\documentclass[green]{conditionechoblueshift}
\begin{document}
\name{\gPentagramI{}}

\bigquote{``The Old Ones were, the Old Ones are, and the Old Ones
shall be. Not in the spaces we know, but *between* them, They walk
serene and primal, undimensioned and to us unseen.''}{--
H.P. Lovecraft, quoting from the Necronomicon in ``The Dunwich
Horror''}

You believe that the following ritual will start the \bCthulht{} on
the way to total protection from the Ancient Ones.

This ritual may be performed in a hallway or room.  You will need a
power source and some capacitors that can be connected to create a
capacitance of 1.1F.  Remember, capacitors add in parallel.  In
series, take the inverse of the sum of the inverses.  

% Three willing participants must be present.

\begin{enum}[Ritual Instructions]
  \item Engrave the following symbol at the place where you will
  perform the ritual (create the symbol on a flat surface using green
  tape).  The symbol must be clearly visible to anyone who would wander
  by.\footnote{Hiding the symbol would insult the Great Ones.  Are you
  ashamed of your devotion? \ldots didn't think so.}
  \\
  \begin{center}
  \includegraphics{\postscript/ritual1-1.eps}
  \end{center}
  \medskip
  \nopagebreak
  \item Connect the capacitors in the proper configuration such that
  the resulting total capacitance is 1.1F.  Each capacitor takes 5
  seconds to connect.
  \item Connect the power supply, capacitor configuration, and symbol
  in series.  This takes ten seconds.
  \item Switch on the grounded power supply on a three-count.
  \item If all living members of the \bCthulht{} were present for the
  duration of the ritual, find and open the packet attached to the
  bottom of the bench in 24-3.
  \item Let a GM know that this ritual was completed and the location
  of the inscribed rune.
\end{enum} 

%% Result: demon appears.  gives them the next set of
%% instructions, two rune cards, and \iRobe{}.

\end{document} 
