ATTENTION Project Athena Users

Logout may occasionally fail, leaving you logged in!

(This is bad because then other people may destroy or mangle your account!)

So, after logging out, wait until the Athena Login Window appears before leaving your workstation.

If you are not logged out after 60 seconds, type "logout" in any available window. If you continue to have problems, reboot the workstation by pressing the button labelled "reboot" Or, call Consulting Hotline at x3-4435

Experienced Users Only:

Try killing your Xsession processing by typing "ps ux | grep Xsession" and then "kill -1 37619" where "37619" should be the PID number that the ps command has associated with Xsession