\documentstyle[ncs,fixunder,functions,twoside]{article}
\setlength{\oddsidemargin}{0.25in}
\setlength{\evensidemargin}{-0.25in}
\setlength{\topmargin}{-.5in}
\setlength{\textheight}{9in}
\setlength{\parskip}{.1in}
\setlength{\parindent}{2em}
\setlength{\textwidth}{6.25in}

\pagestyle{headings}
\begin{document}
\begin{center}
{\Huge Kerberos V5 Data Encryption Standard library} \\
{\Large DRAFT}
\end{center}
\section{DES functions}
The DES functions conform to the encryption interface required by the
Kerberos version 5 library, and provide an encryption mechanism based on
the DES Cipher-block chaining mode (CBC), with the addition of a
cyclical redundancy check (CRC-32) for integrity checking upon
decryption.

The functions have the same signatures as those described by the main
library document; the names are:
{\obeylines
\funcname{mit_des_encrypt_func}
\funcname{mit_des_decrypt_func}
\funcname{mit_des_process_key}
\funcname{mit_des_finish_key}
\funcname{mit_des_string_to_key}
\funcname{mit_des_init_random_key}
\funcname{mit_des_finish_random_key}
\funcname{mit_des_random_key}
}
The \datatype{krb5_cryptosystem_entry} for this cryptosystem is
\globalname{mit_des_cryptosystem_entry}.

\end{document}
