Kerberos V5 Data Encryption Standard library

DRAFT

1 DES functions

The DES functions conform to the encryption interface required by the Kerberos version 5 library, and provide an encryption mechanism based on the DES Cipher-block chaining mode (CBC), with the addition of a cyclical redundancy check (CRC-32) for integrity checking upon decryption.

The functions have the same signatures as those described by the main library document; the names are:

mit_des_encrypt_func() mit_des_decrypt_func() mit_des_process_key() mit_des_finish_key() mit_des_string_to_key() mit_des_init_random_key() mit_des_finish_random_key() mit_des_random_key() The krb5_cryptosystem_entry for this cryptosystem is mit_des_cryptosystem_entry.