First International Athena Technical Conference

The Zephyr Notification Service

John T. Kohl Digital Equipment Corporation Project Athena

Copyright © 1991 by the Massachusetts Institute of Technology

First International Athena Technical Conference

Outline

• Motivation & goals • Overview • Uses • Components • Installation & Operation

Zephyr, Slide 1 11 April 1991

Copyright © 1991 by the Massachusetts Institute of Technology