./barnowl 211,169,210,436,578 bytes x ms

ms 2.0 2000002.04000002.06000002.08000002.010000002.012000002.014000002.016000002.018000002.020000002.0 bytes

0M

2M

4M

6M

8M

x422CD53:???

x422C6A5:???

x42F1C44:Z_ReadWait x40A1F83:Perl_saveshared other x43FE09D:newwin x805BFE3:owl_parseline x804E260:owl_list_append x804F328:owl_message_set x804E2AC:owl_list_create x804D74A:main x40A2146:Perl_safesysmal heap-admin x41F3980:strdup x42EEC7B:ZReceiveNotice