             Information Systems

           Massachusetts Institute of Technology

                 304 Vassar Street W92-1__
                Cambridge MA 02139-4307 USA
                     FAX: 617-258-8736
                    Voice: 617-253-____

Date sent:
Sender’s name:
Number of pages: This cover and

Deliver to:
Company name:
Department:
Individual:
Fax number:

Special instructions (if any):