Copyright: © IBM Corporation, 1999
Citation: AFS-3.6-ALH-031500


AFS
AFS®

AFS ist ein Unternehmensdateisystem, das über einen einzelnen gemeinsamen Dateibereich konsistenten Dateizugriff gewährleistet.

Dateien werden im Computernetz auf verschiedenen Maschinen gespeichert (d.h. auf verschiedene Maschinen verteilt), der Zugriff auf diese Dateien ist jedoch von allen Maschinen möglich.


AFS-Zugriffsberechtigungen

AFS-Zugriffsberechtigungen gelten für das Verzeichnis, in dem ACLs abgelegt wurden, sowie für die im Verzeichnis enthaltenen Unterverzeichnisse und Dateien. Weitere Informationen siehe Zugriffssteuerung auf Verzeichnisebene.

Hinweis:	Jede Berechtigung besitzt eine zulässige Einzelzeichenabkürzung, die in den folgenden Definitionen vor dem vollständigen Namen erscheint.

l	Lookup

Benutzer können die Namen von Unterverzeichnissen und Dateienin einem Verzeichnis ansehen, Details vom Inhalt eines Verzeichnissesanzeigen, die ACL nach einem Verzeichnis durchsuchen und auf die Unterverzeichnisse in einem Verzeichnis zugreifen (es sei denn, es besteht eine Zugriffsbeschränkung durch Unterverzeichnis-ACLs). Es ist zu beachten, daß Benutzer den Inhalt von Unterverzeichnissen erst dann anzeigen können, wenn eine Lookup-Berechtigung für das Elternverzeichnis besteht.

Hinweis:	Wenn ein Benutzer keine Lookup-Berechtigung erhält, dann werden auch keine sonstigen Berechtigungen erteilt.

r	Read

Benutzer können den Inhalt der Dateien in einem Verzeichnis lesen.

i	Insert

Benutzer können neue Unterverzeichnisse erstellen undDateien zu einem Verzeichnis hinzufügen, indem sie entweder neue Dateien erstellen oder bereits vorhandene Dateien kopieren.

d	Delete

Benutzer können Dateien und Unterverzeichnisse aus einem Verzeichnisentfernen.

w	Write

Benutzer können den Inhalt der in einem Verzeichnis enthaltenen Dateien ändern.

l	Lock

Benutzer können Programme ausführen, mit denen Sperrverhinderungen für Dateien in einem Verzeichnis angelegt werden.

a	Administer

Benutzer können die ACL für ein Verzeichnis ändern. Benutzer besitzen die Administer-Berechtigung für ihr Ausgangsverzeichnis und die in ihm enthaltenen Unterverzeichnisse.

Zugehörige Abschnitte:

Sonstige variable Berechtigungen

Übersicht über Zugriffssteuerungslisten (ACLs)

Zugriffssteuerung auf Verzeichnisebene

Zugriffssteuerungslisten festlegen


Register AFS-Zellen - Knopf Hinzufügen
Hinzufügen

Fügt eine Zelle zur Zellendatenbank der Maschine hinzu. Es muß der vollständige Zellenname angegeben werden. Abgekürzte Zellennamen werden abgelehnt.

Siehe Abschnitt Zellen zur Zellendatenbank hinzufügen.


Register AFS-Zellen - Knopf Ändern
Ändern

Sie können die Informationen und Angaben zu den ausgewählten Zellen bearbeiten.

Siehe Abschnitt Zelleninformationen ändern.


Register AFS-Zellen - Knopf Entfernen
Entfernen

Die ausgewählte Zelle wird durch Löschen aus der Zellendatenbank entfernt. Wenn Sie den Knopf Entfernenwählen, dann zeigtAFS Light eine Nachricht an und fordert Sie auf, den Löschvorgang für die ausgewählte Zelle zu bestätigen. Nachdem Sie diesen Vorgang bestätigt haben, ist es nicht mehr möglich, diese Zellen zu kontaktieren.

Siehe Abschnitt Zellen entfernen .


AFS-Dateispeicherungskonzepte

Zellen und Standorte

Die Zelle ist die Verwaltungsdomäne in AFS. Jede Zelle wird eigenständig (autonom) verwaltet. Der Administrator der Zelle bestimmt die Konfiguration von Client-Maschinen und legt fest, wievielSpeicherplatz jedem Benutzer auf dem Datei-Server zur Verfügung steht.

Die Domäne einer Zelle kann aus einer Firma, einer Abteilung oder einer beliebigen benutzerdefinierten Gruppe von Benutzern bestehen. Aus Hardware-Sicht handelt es sich bei einer Zelle um eine Gruppierung von Client- und Server-Maschinen, die Mitglieder derselben lokalen Zellesind. Ein AFS-Standort ist eine Gruppierung von einer oder mehreren zusammengehörenden Zellen.

Während AFS den Dateibereich pro Zelle organisiert und verwaltet, kann jede Zelle und jeder Standort eine Verbindung zum Dateibereich anderer Zellen und Standorte aufbauen, die AFS auf demselben Netzwerk ausführen. Das Ergebnis ist ein riesiger Dateibereich, der einen gemeinsamen Dateizugriff nicht nur innerhalb von Zellen und Standorten, sondern auch sowie zell- und standortübergreifend ermöglicht.

Partitionen, Volumes und Mount-Punkte

Jeder Datenträger in einem Computer ist in Abschnitte (Sektionen) unterteilt, die als Partitionen bezeichnet werden. AFS gliedert die Partitionen in kleinere Untereinheiten auf, sogenannte Volumes. Ein Volumebeinhaltet eine untergeordnete Baumstruktur mit zusammengehörenden Dateien und Verzeichnissen. Ein solches Volume eignet sich hervorragend zum bequemen Speichern, Sichern und Verschieben solcher zusammengehörender Dateien und Verzeichnisse.

Der Zugriff auf ein Volume erfolgt über den Mount-Punkt. Ein Mount-Punkt ist ein besonderer Verbindungstyp zwischen einer Verzeichnisposition im Dateibaum und dem Volume, das die Elemente in diesem Verzeichnis beherbergt.  Im Dateibaum sieht ein AFS-Verzeichnis wie ein reguläres Verzeichnis aus. Wenn Sie in ein anderes Verzeichnis wechseln, kann es sein, daß Sie einen Mount-Punkt überqueren, ohne es zu bemerken. Wenn Sie einen Mount-Punkt überqueren, wechseln Sie von einem Volume zu einem anderen, gegebenenfalls auch von einem Datei-Server und einerPartition zu einem anderen Datei-Server und einer anderen Partition.  Dieser Übergang ist transparent, da AFS die Mount-Punkte interpretiert und die angeforderten Dateien und die Verzeichnisse abruft, die Sie von der entsprechenden Adresse anfordern. Daher ist es nicht erforderlich, die Volume-, Partitions- und Datei-Server-Adressen zu kennen.

Quoten

Die Dateien im Ausgangsverzeichnis werden normalerweise gemeinsam in einem einzelnen Volume gespeichert. Um den verfügbaren Speicherplatz Ihrer Zelle optimal auszunutzen, legt der Systemadministrator für jedes Volume eine maximale Größe oder Quote fest. Sie können nur so viele Daten in einem Volume speichern, wie die festgelegte Quote zuläßt.  Wenn der durch die Quote begrenzte Speicherplatz fast ausgelastet ist, können Änderungen einer in diesem Volume gespeicherten Datei unter Umständen nicht mehrgespeichert werden. Gleichermaßen kann eine Datei manchmal nicht gespeichert werden, weil die Plattenpartition, in dem sich Ihr Volume befindet, voll ist, selbst wenn Ihr Volume die ihm zugeordnete Quote längst noch nicht erreicht hat.

Überprüfen Sie in regelmäßigen Abständen die Quote ihres Ausgangsverzeichnis-Volumes und stellen Sie so sicher, das ausreichend Speicherplatz zur Verfügung steht. Wenn beim Speichern einer Datei Fehler oder Probleme auftreten, sollten Sie die Quote derPartition prüfen, in dem sich das entsprechende Volumebefindet. Zum Überprüfen der Quoten wählen Sie im AFS-Menü die Option Volume/Partition. Setzen Sie sich mit dem Systemadministrator in Verbindung, wenn die Quote eines Volumes oder einer Partition fast ausgelastet ist.

Zugehörige Abschnitte:

Volumes und Partitionen

Mount-Punkte

Datei-Server anzeigen

Zellen anzeigen


AFS Light
Informationen zuAFS Light

AFS®Light für Windows 95® und Windows 98® ermöglichen Ihnen die Verwaltung von Dateien und Verzeichnissen im AFS-Dateibereich von einer Maschine mit dem Betriebssystem Windows95 oder Windows 98. Wenn Sie im AFS-Dateibereich eine Datei anfordern, greift AFS Light über eine Maschine mit AFS  Client für Windows NT®, auf der ein AFS Light-Gateway aktiv ist, auf gemeinsame AFS-Ressourcen zu. Eine Kopie der angeforderten Datei wird auf dem lokalen Datenträger gespeichert.

Die Verwaltung von AFS-Dateien und -Verzeichnissen gleicht der Verwaltung von Dateien und Verzeichnissen auf dem lokalen Dateisystem. Sie können AFS-Dateien und -Verzeichnisse wie in der Windows-Dokumentation erläutert erstellen, benennen, verschieben, kopieren, auswählen, löschen, umbenennen, drucken und durchsuchen .

Als Windows-Benutzer können Sie auch weiterhin Dateien und Verzeichnisse im AFS-Dateibereich über eine Befehlszeilenschnittstelle in einem Fenster mit Eingabeaufforderung  verwalten.

Zugehörige Abschnitte:

Informationen zu AFS

Befehle an der Eingabeaufforderung


Zusammenfassung AFS Light Configuration, Register AFS-Zellen
AFS Light Configuration: Register AFS-Zellen

Dieses Register enthält die folgenden Angaben:

Das Feld AFS-Zellen zeigt alle registrierten AFS-Zellen an.

Auf diesem Register sind die folgenden Funktionen verfügbar:

Neue Zellen zur Zellendatenbank von AFS Light hinzufügen

Die in der Zellendatenbank derzeit gespeicherten Informationen zu der Zelle ändern

Zellen durch Löschen aus der Zellendatenbank entfernen

Weitere Informationen siehe AFS Light Configuration: Register AFS-Zellen.


Zusammenfassung AFS Light Configuration, Register Laufwerkbuchstaben
AFS Light Configuration: Register Laufwerkbuchstaben

Dieses Register enthält die folgenden Angaben:

Den Pfaden in AFS zugeordnete Laufwerkbuchstaben und ihr jeweiliger Verbindungsstatus

Auf diesem Register sind die folgenden Funktionen verfügbar:

Pfaden in AFS Laufwerkbuchstaben zuordnen

Zuordnungen ändern

Zuordnungen entfernen

Netzlaufwerkzuordnungen verbinden

Weitere Informationen siehe AFS Light Configuration: Register Laufwerkbuchstaben.


Zusammenfassung AFS Light Configuration, Register Allgemein
AFS Light Configuration: Register Allgemein

Auf diesem Register sind die folgenden Funktionen verfügbar:

Eine Windows NT-Maschine als Gateway zum AFS-Dateibereich bestimmten

Die AFS-Zelle anzeigen, in derAFS Light konfiguriert ist

Ihre AFS-Anmeldung in Ihre Windows-Anmeldung integrieren

Das Symbol für AFS Light in der Task-Leiste anzeigen

Weitere Informationen siehe AFS Light Configuration: Register Allgemein.


Dienstprogramm AFS Light Configuration

Der Zugriff auf das Dienstprogramm AFS Light Configuration erfolgt über die Systemsteuerung.

Führen Sie die folgenden Schritte aus, um das Dienstprogramm AFS Light Configuration aufzurufen:

1.	Wählen Sie im Menü Startdas Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

Das Dienstprogramm AFS Light Configuration erscheint.

Register

Vom Dienstprogramm AFS Light Configuration können Sie auf die folgenden drei Register zugreifen.

  Allgemein

  Laufwerkbuchstaben

  AFS-Zellen


AFS Light Configuration: Register AFS-Zellen

Auf dem Register AFS-Zellenkönnen Sie Änderungen an der Zellendatenbank Ihrer Maschine vornehmen. Bei der Zellendatenbank handelt es sich um eine Liste aller registrierten AFS-Zellen. AFS Light muß eine Zelle registrieren; erst danach können Sie diese Zelle kontaktieren. Die Zellendatenbank befindet sich in der Datei  afsdcell.ini  im Standardverzeichnis von  Windows. Änderungen, die am Inhalt der Zellendatenbank vorgenommen wurden, werden erst nach dem Neustart der Maschine wirksam.

Das Feld AFS-Zellen zeigt alle registrierten AFS-Zellen an.

Das Feld AFS-Zellen enthält Optionen zum Hinzufügen neuer Zellen zur Zellendatenbank von AFS Light, Ändern von den derzeit in der Zellendatenbank gespeicherten Zellinformationen und Entfernen von Zellen aus der Zellendatenbank.

  Hinzufügen

  Ändern

  Entfernen

Zugehörige Abschnitte:

Neue Zellen zur Zellendatenbank hinzufügen

Zelleninformationen ändern

Zellen aus der Zellendatenbank entfernen


AFS Light Configuration: Register Laufwerkbuchstabe
AFS Light Configuration: Register Laufwerkbuchstaben

Auf dem Register Laufwerkbuchstaben können Sie jedem beliebigen AFS-Pfad Laufwerkbuchstaben zuordnen.  Auf diesem Register werden auch Laufwerke angezeigt, die zum gegenwärtigen Zeitpunkt AFS und ihren jeweiligen Pfadnamen zugeordnet sind.

Hinweis:	Um AFS Light verwenden zu können, muß dem AFS-Dateibereich mindestens ein Laufwerk zugeordnet sein.

Das Register Laufwerkbuchstaben enthält die folgenden Angaben:

Zur Zeit den Pfaden in AFS zugeordnete Laufwerkbuchstaben:

Dem Namen des Laufwerks folgt der vollständige AFS-Pfad.

Verbindungsstatus jedes Laufwerks:

Ist dieses Markierungsfeld ausgewählt, dann ist das Laufwerk zur Zeit mit dem AFS-Dateibereich verbunden.

Ist das Markierungsfeld nicht ausgewählt, ist das Laufwerk nicht mit dem AFS-Dateibereich verbunden.

Hinweis:	Klicken Sie auf ein nicht ausgewähltes Markierungsfeld, um eine Verbindung zu einem Laufwerk herzustellen. Siehe Abschnitt Ein Laufwerk mit dem AFS-Dateibereich verbinden.

Das Register Laufwerkbuchstaben enthält die folgenden Optionen:

  Hinzufügen

  Ändern

  Entfernen


AFS Light Configuration: Register Allgemein

Auf dem Register Allgemein können Sie eine Windows NT-Maschine festlegen, die als Gateway zum AFS-Dateibereich dienen soll, die AFS-Anmeldung in Ihre Windows-Anmeldung integrieren und das das Symbol AFS Light in der Task-Leiste anzeigen.

Das Register Allgemein enthält die folgenden Konfigurationsoptionen:

  Gateway

  Zellenname

  AFS-Token beim Anmelden bei Windows erhalten

  Das Symbol für AFS Light in der Task-Leiste anzeigen


AFS Light-Programmgruppe
Die AFS Light-Programmgruppe

Die AFS Light-Programmgruppe wird bei der Installation von AFS Light zum Menü Programme hinzugefügt. Die AFS Light-Programmgruppe beinhaltet Befehle, die den Benutzern von AFS Light zur Verfügung stehen.

Führen Sie die folgenden Schritte aus, um die AFS Light-Programmgruppe aufzurufen:

1.	Suchen Sie im Menü Start die Programmgruppe IBM AFS (oder IBM WebSphere), und wählen Sie dann den Eintrag Light aus.

2.	Die  AFS Light-Programmgruppe erscheint.

Die AFS Light-Programmgruppe umfaßt die folgenden Befehle:

  Authentifizierung

  Online-Hilfefunktion


AFS Light-Programmgruppe - Authentifizierung
Authentifizierung

Zeigt das Register Tokenim AFS Light-Merkmalfenster an. Mit diesem Register können Sie die Authentifizierung prüfen sowie Token erhalten oder löschen.

Weitere Informationen siehe Bei AFS authentifizieren.


AFS Light-Merkmalfenster

Der Zugriff auf das AFS Light-Merkmalfenster erfolgt über das Symbol AFS Lightin der Task-Leiste. Siehe Das Symbol für AFS Light anzeigen.

Das AFS Light-Merkmalfenster ermöglicht dem AFS-Benutzer, zahlreiche AFS-Tasks einfach und bequem durchzuführen.

Führen Sie die folgenden Schritte aus, um das AFS Light-Merkmalfenster aufzurufen:

1.	Zeigen Sie das Symbol AFS Lightin der Task-Leiste am unteren rechten Bildschirmrand an.

a.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung .

b.	Doppelklicken Sieauf das Symbol AFS Light Configuration, umdas Dienstprogramm AFS Light Configurationaufzurufen.

c.	Wählen Sie das Register Allgemeinaus.

d.	Aktivieren Sie die Option Das Symbol für AFS Light in der Task-Leiste anzeigen.

e.	Klicken Sie anschließend auf OK.

Das Symbol AFS Light erscheint  sofort als kleines Vorhängeschloß in der Task-Leiste.

2.	Klicken Sie aufdas Symbol AFS Lightin der Task-Leiste.

DasAFS Light-Merkmalfenster wird geöffnet.

Das AFS Light-Merkmalfenster enthält die folgenden Angaben:

  Benutzername

  Version

Außerdem enthält das AFS Light-Merkmalfenster die folgenden Register:

  Token

  Laufwerkbuchstaben


AFS Light-Merkmalfenster - Feld Version
Version

Gibt an, welche Version von AFS Light zur Zeit auf der Windows-Machine installiert ist.


AFS Light-Merkmalfenster: Register Laufwerkbuchstaben

Der Zugriff auf das Register Laufwerkbuchstabenerfolgt über das Symbol AFS Lightin der Task-Leiste. Weitere Informationen darüber, wie Sie das Symbol in der Task-Leiste Ihrer Windows-Maschine anzeigen lassen, siehe Das Symbol für AFS Light anzeigen.

Das Register Laufwerkbuchstaben enthält die folgenden Angaben:

Zur Zeit den Pfaden in AFS zugeordnete Laufwerkbuchstaben:

Dem Namen des Laufwerks folgt der vollständige AFS-Pfad.

Verbindungsstatus von jedem Laufwerk:

Ist dieses Markierungsfeld gekennzeichnet, dann ist das Laufwerk zur Zeit mit dem AFS-Dateibereich verbunden.

Ist dieses Markierungsfeld nicht gekennzeichnet, dann ist das Laufwerk zur Zeit nicht mit dem AFS-Dateibereich verbunden.

Hinweis:	Klicken Sie auf ein nicht gekennzeichnetes Markierungsfeld, um eine Verbindung zu einem Laufwerk herzustellen. Siehe Laufwerk mit dem AFS-Dateibereich verbinden.

Das Register Laufwerkbuchstaben enthält die folgenden Optionen:

  Hinzufügen

  Ändern

  Entfernen

Zugehörige Abschnitte:

Netzlaufwerke AFS zuordnen


AFS-Menü
Das AFS-Menü

Das AFS-Menü wird bei der Installation von AFS Light zum Windows Explorer hinzugefügt. Das AFS-Menü enthält Befehle, die den Benutzern von AFS Light zur Verfügung stehen.

Führen Sie die folgenden Schritte durch, um das AFS-Menü aufzurufen:

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf  Programme , und wählen Sie  Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustasteauf eine AFS-Datei oder ein AFS-Verzeichnis.

3.	Zeigen Sie auf AFS.

Das AFS-Menü wird angezeigt.

Das AFS-Menü enthält die folgenden Befehle:

Zugriffssteuerungslisten

Volume/Partition

Mount-Punkt

Datei/Verz leeren

Volume leeren

Datei-Server anzeigen

Zelle anzeigen

Server-Status anzeigen


Übersicht über AFS
AFS®

AFS®ist ein Unternehmensdateisystem, das über einen einzelnen gemeinsamen Dateibereich konsistenten Dateizugriff gewährleistet.  Durch Verknüpfung der lokalen Dateisysteme von mehrerenDatei-Server-Maschinen stellt AFS unabhängig von hardware-seitigen Grenzen einen einzelnen Dateibereich dar.Dateien werden im Computernetz auf verschiedenen Maschinen gespeichert, der Zugriff auf diese Dateien ist jedoch von allen Maschinen möglich. Auf diese Art ist es mit AFS ganz einfach, Dateien gemeinsam zu benutzen.

AFS-Benutzer müssen denphysischen Standort von Dateien nicht kennen, selbst wenn eine Datei gegebenenfalls auf einer beliebigen Anzahl von Datei-Server-Maschinen gespeichert sein kann.  Wenn Benutzer mit entsprechender Zugriffsberechtigung von ihren Desktop-Rechnern auf AFS-Dateien zugreifen, dann scheinen diese Dateien auf den lokalen Maschinen gespeichert zu sein.

Wie in jedem System mit gemeinsam benutzten Dateien können Sie Tasks nur für diejenigen Dateien und Verzeichnisse durchführen, für die Sie auch die entsprechende Berechtigung besitzen.

Zugehörige Abschnitte:

AFS-Dateispeicherungskonzepte

AFS-Sicherheitskonzepte

Informationen zu AFS Light


AFS-Sicherheitskonzepte

Da viele Benutzer aufAFS zugreifen, wird zur Gewährleistung der Systemsicherheit eine Kombination unterschiedlicher Methoden verwendet.

Kennwörter und Authentifizierung stellen sicher, daß nur Benutzer mit entsprechender Berechtigung auf AFS zugreifen können.

Zugriffssteuerungslisten ermöglichen bestimmten einzelnen Benutzern, den Zugriff auf ihre eigenen Verzeichnisse einzuschränken oder auszuweiten.

Zugehörige Abschnitte:

Bei AFS authentifizieren

Zugriffssteuerungslisten


Zugriffssteuerungslisten

Zur Gewährleistung der Sicherheit von Dateien und Verzeichnissen in AFS müssen Sie mit von Zugriffssteuerungslisten(Access Control Lists; ACLs) Zugriffsrechte definieren. Eine solche ACL ist eine Auflistung von Sicherheitsattributen, die einem AFS-Verzeichnis zugeordnet sind. ACL-Einträgegeben an, welche Vorgänge und Operationen einBenutzer oder eine Gruppe bei einem bestimmten Verzeichnis einschließlich der in ihm enthaltenen Dateien durchführen darf. Die ACL eines Verzeichnisses kann bis zu 20 ACL-Einträge aufweisen.

Benutzereinträge

Ein Benutzereintrag gilt nur für den entsprechenden Benutzer.

Gruppeneinträge

Ein Gruppeneintrag gilt für alle Mitglieder der angegebenen Gruppe. Eine Gruppe kann sowohl aus Benutzern als auch aus Maschinen bestehen. Ein Benutzer, der Teil einer Gruppe ist, besitzt alle für diese Gruppe definierten Berechtigungen. Ein Benutzer, der bei einer Maschine angemeldet ist, die als Mitglied einer Gruppe definiert ist, besitzt alle für diese Gruppe festgelegten Berechtigungen.

In einer ACL können Sie einem Benutzer oder einer Gruppe jede beliebige Kombination von Berechtigungen zuweisen oder aber einem bestimmten Benutzer oder einer Gruppe ausdrücklich die Zugriffsberechtigung verwehren.

Zugehörige Abschnitte:

AFS-Zugriffsberechtigungen

Zugriffssteuerung auf Verzeichnisebene

Normale und negative Einträge

Zugriffssteuerungslisten festlegen


Befehl Zugriffssteuerungslisten
Der Befehl Zugriffssteuerungslisten

Eine Zugriffssteuerungsliste (Access Control List bzw. ACL) ist eine Auflistung von Sicherheitsattributen, die einem AFS-Verzeichnis zugeordnet sind. ACL-Einträge  legen über Zugriffsberechtigungen fest, welche Vorgänge und Operationen ein Benutzer oder eine Gruppe bei einem bestimmten Verzeichnis einschließlich der in ihm enthaltenen Dateien durchführen darf.

Mit dem Befehl Zugriffssteuerungslistenim AFS-Menüwird das Dialogfenster AFS-ACL festlegenaufgerufen. Das Dialogfenster zeigt ACL-Einträge an. Außerdem können Sie Berechtigungen bearbeiten oder ändern, neue Einträge zu einer ACL hinzufügen, Einträge aus einer Liste löschen, ACLs für andere Verzeichnisse kopieren und ACLs leeren bzw. aktualisieren.

Hinweis:	Zugriffssteuerungslisten sind bestimmten AFS-Verzeichnissen zugeordnet. Wenn Sie das AFS-Menü aufrufen, indem Sie mit der rechten Maustaste auf  eine Datei klicken, dann ist der Befehl Zugriffssteuerungslisten  nicht verfügbar.

Zugehörige Abschnitte:

ACLs festlegen

Zugriffssteuerung auf Verzeichnisebene


Dialogfenster ACL-Eintrag hinzufügen
Das Dialogfenster ACL-Eintrag hinzufügen

Das Dialogfenster ACL-Eintrag hinzufügen enthält die folgenden Angaben:

  Berechtigungen

  Eintragsart

  Name

Zugehörige Abschnitte:

ACL-Einträge hinzufügen

Übersicht über Zugriffssteuerungslisten


Dialogfenster ACL-Eintrag hinzufügen - Feld Eintragsart
Eintragsart

Legt den Wert des ACL-Eintragsals normal oder negativ fest.

Wählen Sie Normal, damit die Eintragsart als ”Normal” festgelegt wird und dadurch ein Benutzer oder eine Gruppe die angegebenen Berechtigungen erhält. Der ACL-Eintrag erscheint in der ListeNormale Einträgeim Dialogfenster AFS-ACL festlegen.

Wählen Sie Negativ,  damit  die Eintragsart als ”Negativ” festgelegt wird und dadurch einem Benutzer oder einer Gruppe die angegebenen Berechtigungen verweigert werden. Der ACL-Eintrag erscheint in der Liste Negative Einträgeim Dialogfenster AFS-ACL festlegen.

Weitere Informationen siehe Normale und negative Einträge.


Dialogfenster ACL-Eintrag hinzufügen - Feld Name
Name

Legt den Namen des Benutzers oder der Gruppe fest, die zur Zugriffssteuerungsliste hinzugefügt werden soll.


Dialogfenster ACL-Eintrag hinzufügen - Feld Berechtigungen
Berechtigungen

Eine Reihe von Markierungsfeldern, mit denen Sie AFS-Zugriffsberechtigungen festlegen können.

Weitere Informationen siehe AFS-Zugriffsberechtigungen.


DialogfensterServer hinzufügen

Sie müssen für jede Zelle einen oder mehrere Volume Location Server angeben.

  Server-Name

  Server-Adresse

Zugehörige Abschnitte:

Server-Informationen zu einer Zelle hinzufügen


Dialogfenster Server hinzufügen - Feld Server-Adresse
Server-Adresse

Sie können entweder eine bestimmte IP-Adresse für den Volume Location Server angeben oder aber AFS anweisen, die Adresse automatisch zu suchen.


Dialogfenster Server hinzufügen - Feld Server-Name
Server-Name

Gibt den Namen des Volume Location Serversan, der zur Liste Serverhinzugefügt werden soll.


ACL-Einträge hinzufügen

Sie können einen neuen Benutzereintrag oder Gruppeneintrag zu einer  Zugriffssteuerungsliste hinzufügen und auf diese Art normale oder negative Berechtigungen vergeben. Jede ACL kann bis zu 20 Einträge umfassen.

ACL-Eintrag hinzufügen:

Hinweis::	Damit Sie einen Eintrag zu einer Verzeichnis-ACL hinzufügen können, müssen Sie die Administer- Berechtigung für das Verzeichnis besitzen. Siehe AFS-Zugriffsberechtigungen.

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazuauf Programme, und wählen Sie anschließen Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das  AFS-Verzeichnis, zu dem ein ACL-Eintrag hinzugefügt werden soll.

3.	Zeigen Sie auf AFS. Das AFS-Menü wird angezeigt.

4.	Klicken Sie auf Zugriffssteuerungslisten.

Das Dialogfenster AFS-ACL festlegen wird geöffnet.

5.	Klicken Sie auf  Hinzufügen.

Das Dialogfenster ACL-Eintrag hinzufügen  erscheint.

6.	Geben Sie im Feld Name den Namen  des Benutzers oder der Gruppe ein, der zur ACL hinzugefügt werden soll.

7.	Wählen Sie im FeldEintragungsart die entsprechende Art der Eintragung aus. Ein normaler Eintrag erteilt einem Benutzer oder einer Gruppe die angegebenen Berechtigungen. Durch die Eingabe negativer Zahlen werden dem entsprechenden Benutzer oder der Gruppe die angegebenen Berechtigungen verwehrt.  Weitere Informationen siehe Normale und negative Einträge.

Hinweis::	Normale und negative Berechtigungen müssen getrennt hinzugefügt werden.

8.	Wählen Sie im Fenster Berechtigungen alle  AFS-Zugriffsberechtigungen aus, die dem Verzeichnis erteilt (positive, d.h. normale Rechte) oder verwehrt (negative Rechte)werden sollen. Weitere Informationen siehe AFS-Zugriffsberechtigungen.

9.	Klicken Sie zum Schließen des Dialogfensters ACL-Eintrag hinzufügen auf OK.

Der hinzugefügte ACL-Eintrag erscheint jetzt je nach zugewiesenen Rechten in der Berechtigungsliste Normal oder Negativ im Dialogfenster AFS-ACL festlegen.

Zugehörige Abschnitte:

ACLs kopieren

ACL-Einträge entfernen

Übersicht über Zugriffssteuerungslisten


Zellen zur Zellendatenbank hinzufügen

AFS Light enthält eine Datei mit einer List aller registrierten AFS-Zellen. Diese Zellendatenbank befindet sich in der Datei  afsdcell.ini im Standardverzeichnisvon  Windows. AFS Light muß eine Zelle registrieren; erst danach können Sie diese Zelle kontaktieren.

Ein identischer Zelleneintrag muß in der Zellendatenbank des AFS Light-Gateways (Datei afsdcell.ini) vorhanden sein, damit sich AFS Light-Benutzer bei der Zelle authentifizieren können. Die AFS Light Gateway-Maschine muß in der Lage sein, die Volume Location Server-Maschinen einer Zelle zu kontaktieren, damit von der Zelle aus der Zugriff auf eine Datei möglich ist. Inkorrekte oder fehlende Informationen und Angaben zu einer Zelle in der Zellendatenbank einer Gateway-Maschine haben zur Folge,  daß die AFS Light Client-Maschine nicht auf Dateien zugreifen kann.

Eine Zelle zur Zellendatenbank hinzufügen:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register AFS-Zellen aus.

4.	Klicken Sie auf Hinzufügen.

Es erscheint das Dialogfenster Neue Zelle.

5.	Geben Sie im Feld AFS-Zelle den Namen der neuen AFS-Zelle ein.

6.	Geben Sie im Feld Beschreibung zur genaueren Bezeichnung der neuen Zelle eine Beschreibung ein.

7.	Sie müssen für jede neue Zelle einen oder mehrere Volume Location Server angeben. Klicken Sie auf den Knopf Hinzufügen, um Informationen zum Server hinzuzufügen.

Es erscheint das Dialogfenster Server hinzufügen.

8.	Geben Sie im Feld Server-Name den Namen eines Volume Location Servers in der neuen Zelle ein.

9.	Wählen Sie die Option Spezielle Adresse benutzen, und geben Sie die IP-Adresse des Servers ein, oder wählen Sie die Option Adresse automatisch suchen, wenn Windows die entsprechende Adresse selbständig suchen soll.

10.	Klicken Sie auf OK.

Der Name und die Adresse des Servers erscheinen jetzt im Feld  Server im Dialogfenster Neue Zelle.

Wiederholen Sie für Zellen mit mehreren Volume Location Servern die Schritte 7-10 .

11.	Klicken Sie auf OK, damit die  Zelle zu der Liste der registrierten AFS-Zellen auf dem Register AFS-Zellen hinzugefügt wird.

Zugehörige Abschnitte:

Zelleninformation ändern

Zellen aus der Zellendatenbank löschen


Server zu Zellen hinzufügen
Server-Informationen zu einer Zelle hinzufügen

Für jede Zelle, die in der Zellendatenbank von AFS Light aufgeführt ist, muß AFS Light mindestens ein Volume Location Server in dieser Zelle bekannt sein. Häufig sind jedoch in einer Zelle mehrere Volume Location Server vorhanden.

Wenn Sie eine neue Zelle zur Zellendatenbank von AFS Light hinzufügen, müssen Sie einen oder mehrere Volume Location Server angeben. Weitere Informationen siehe Eine neue Zelle zur Zellendatenbank hinzufügen.

Es ist möglich, Server zu Zellen hinzuzufügen, die bereits in der Zellendatenbank von AFS Light registriert sind.

Server-Informationen zu einer bereits vorhandenen Zelle hinzufügen:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register AFS-Zellen aus.

4.	Doppelklicken Sie auf die Zelle, zu der die Server-Informationen hinzugefügt werden sollen.

Es erscheint das Dialogfenster Zellenmerkmale.

5.	Klicken Sie auf Hinzufügen.

Es erscheint das Dialogfenster Server hinzufügen.

6.	Geben Sie im Feld Server-Name den Namen eines Volume Location Servers ein, der zu der angegebenen Zelle hinzugefügt werden soll.

7.	Wählen Sie die Option Spezielle Adresse verwenden aus, und geben Sie eine IP-Adresse ein, oder wählen Sie die Option Adresse automatisch suchen, wenn Windows die entsprechende Adresse selbständig suchen soll.

8.	Klicken Sie auf OK.

Der Name und die Adresse des Servers erscheinen jetzt im Feld Server im Dialogfenster Zellenmerkmale.

9.	Klicken Sie zum Schließen des Dialogfensters Zellenmerkmale auf OK .

Zugehörige Abschnitte:

Server-Informationen aus einer Zelle entfernen

Server-Informationen ändern

Zelleninformationen ändern


Bei AFS authentifizieren
Bei AFS authentifizieren (Token erhalten)

\Als Authentifizierung wird der Vorgang bezeichnet, bei dem Sie sich bei AFS durch Angabe Ihres Benutzernamens und des dem Benutzernamen zugeordneten Kennworts  identifizieren. Wenn Sie sich bei AFS authentifizieren, erhalten Sie ein Token, das  AFS Light bei der Anforderung von Services von AFS-Servern verwendet. Wenn Sie kein Token haben, stuft AFS Sie als anonymen (d.h. allgemeinen) Benutzer ein und begrenzt den möglichen Zugriff auf den AFS-Dateibereich beträchtlich.

In vielen Systemen sind Anmeldung und Authentifizierung in einem Schritt zusammengefaßt.  Falls dies auch auf Ihr System zutrifft, ist Ihre Authentifizierung bei AFS bereits erfolgt. Der zuständige Systemadministrator kann Ihnen mitteilen, welche Art von Anmeldung Ihre Zelle verwendet, Sie können jedoch auch nach erfolgreicher Anmeldung selbständig überprüfen, ob Token vorhanden sind. Siehe Authentifizierung prüfen.

Bei AFS authentifizieren:

1.	Rufen Sie das Register Token im AFS Light-Merkmalfenster wahlweise mit einer der folgenden Vorgehensweisen auf:

Suchen Sie im Menü Start die Programmgruppe IBM AFS (oder IBM WebSphere) und die Programmuntergruppe Light.. Klicken Sie auf Authentifizierung.

Klicken Sie in der Task-Leiste auf das Symbol AFS Light, und wählen Sie das Register Token aus.Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Klicken Sie auf dem Register Token auf Neue Token erlangen.

Es erscheint das Dialogfenster Neue AFS-Token erlangen.

3.	Geben Sie im Fenster AFS-Zelle den Namen der Zelle ein, bei der Sie sich authentifizieren wollen, oder bestätigen Sie einfach die Standardzelle, die identisch mit der lokalen Zelle ist.

4.	Geben Sie im Fenster Benutzer name Ihren AFS-Benutzernamen ein.

5.	Geben Sie im Fenster Kennwort Ihr Kennwort ein. Das Kennwort wird nicht auf dem Bildschirm angezeigt.

6.	Klicken Sie auf OK, damit die Authentifizierung erfolgt. Das RegisterToken zeigt die Informationen zum neuen Token an.  Weitere Informationen über die Angaben und Informationen, die auf dem RegisterToken angezeigt werden, siehe Register Token.

Hinweis: 	Wenn Sie sich bei mehreren Zellen authentifizieren wollen, wiederholen Sie für jede Zelle die Schritte 2-6.

Sie können die AFS-Authentifizierung mit der Windows-Anmeldung kombinieren. Weitere Informationen siehe Integrierte Anmeldung.

Zugehörige Abschnitte:

Von AFS deauthentifizieren (Token löschen)

Authentifizierung prüfen


Zwischengespeicherte Dateien

Auf dem lokalen Datenträger Ihrer Maschine werden Kopien der AFS-Dateien gespeichert. AFS Light verwendet diese Eigenkopien der zwischengespeicherten Dateien, so daß nicht ständig Netzanforderungen für Daten der gespeicherten Dateien gesendet werden müssen.

Sie können die zwischengespeicherten Dateien vom lokalen Datenträger der Client-Maschine löschen.

Das AFS-Menü enthält die folgenden Befehle zum Löschen von ad-Dateien:

Datei/Verz leeren

Dieser Befehl zwingt AFS Light, die für eine bestimmte Datei oder für alle Dateien in einem bestimmten Verzeichnis gespeicherten Daten zu löschen. Weitere Informationen siehe Dateien und Verzeichnisse leeren.

Volume leeren

Dieser Befehl  zwingt AFS Light, die für alle Elemente im Cache gespeicherten Daten zu löschen, die aus dem selben Volume wie eine angegebene Datei oder ein bestimmtes Verzeichnis stammen. Weitere Informationen siehe Volumes leeren.

Zugehörige Abschnitte:

Dateispeicherungskonzepte


Zellendatenbank

AFS Light enthält eine Datei mit einer Auflistung von AFS-Zellen und  den Namen sowie IP-Adressen der Volume Location Server innerhalb  jeder Zelle.  Dies wird bei  AFS Light als Zellendatenbank bezeichnet. Die Zellendatenbank befindet sich in der  Datei afsdcell.ini im Standardverzeichnis  von Windows.

Es muß außerdem ein Zelleneintrag in der Zellendatenbank des AFS Light-Gateways (Datei afsdcell.ini) vorhanden sein, damit sich der AFS Light-Benutzer bei einer Zelle authentifzieren kann. Die AFS Light Gateway-Maschine muß in der Lage sein, die Volume Location Server-Maschinen einer Zelle zu kontaktieren, damit von der Zelle aus der Zugriff auf eine Datei möglich ist. Inkorrekte oder fehlende Informationen und Angaben zu einer Zelle (entweder in der Zellendatenbank des Gateways oder der Zellendatenbank des Clients) haben zur Folge, daß die Client-Maschine auf Dateien nicht zugreifen kann.

Hinweis:	Es ist wichtig, Angaben und Informationen zu Zellen zu aktualisieren und synchronisieren, sobald sich die Server-Informationen für die entsprechende Zelle ändern.

Sie können Zellen zur  Zellendatenbank von AFS Light hinzufügen, die Informationen zu Zellen ändern und Zellen aus der Zellendatenbank löschen. Wenn Sie einen oder mehrere dieser Vorgänge durchführen wollen, verwenden Sie das Register AFS-Zellen im Dienstprogramm AFS Light Configuration.

Zugehörige Abschnitte:

Zellen zur Zellendatenbank hinzufügen

Zelleninformtionen ändern

Zellen aus der Zellendatenbank entfernen


Dialogfenster Zellenmerkmale

Dieses Dialogfenster erscheint, wenn Sie im  Dienstprogramm AFS Light Configuration auf dem Register AFS-Zellen auf den Knopf Ändern klicken. Das Dialogfenster enthält Angaben zu der jeweils angegebenen Zelle und ermöglicht Ihnen, diese Änderungen an dieser bestimmten Zelle  in der Zellendatenbank  von AFS Light vorzunehmen.

Hinweis:	Sie müssen für jede registrierte Zelle  einen oder mehrere Volume Location Server  angeben.

Mit dem Dialogfenster Zellenmerkmale können Sie die Angaben und Informationen zu registrierten AFS-Zellen ändern.

  AFS-Zelle

  Beschreibung

  Server

Im Dialogfenster Zellenmerkmale können Sie Datenbank-Server zu einer Zelle hinzufügen, die einer Zelle zugeordneten Datenbank-Server-Angaben ändern und Datenbank-Server aus einer Zelle durch Löschen entfernen.

  Hinzufügen

  Ändern

  Entfernen

Zugehörige Abschnitte:

Zelleninformationen ändern


Zelleninformationen ändern

Sie können die Angaben und Informationen zu einer Zelle ändern, die  in der Zellendatenbank von AFS Light registriert sind. Zum Beispiel können Sie den Namen der Zelle ändern, die Beschreibung, die diese Zelle eindeutig kennzeichnet, und den die Angaben für den Volume Location Server für eine Zelle.

In der Zellendatenbank des AFS Light-Gateways(Datei afsdcell.ini) muß ein identischer Zelleneintrag vorhanden sein, damit sich AFS Light-Benutzer bei der Zelle authentifizieren können. Die AFS Light Gateway-Maschine muß in der Lage sein, die Volume Location Server-Maschinen einer Zelle zu kontaktieren, damit von der Zelle aus der Zugriff auf eine Datei möglich ist. Inkorrekte oder fehlende Informationen und Angaben zu einer Zelle in der Zellendatenbank einer Gateway-Maschine haben zur Folge, daß die AFS Light Client-Maschine nicht auf Dateien zugreifen kann. Wenn Sie Änderungen in der Zellendatenbank von AFS Light vornehmen, stellen Sie sicher, daß Sie dieselben Änderungen auch in der Zellendatenbank auf der AFS Light Gateway-Maschine durchführen.

Angaben und Informationen zu einer Zelle ändern:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf  Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register AFS-Zellen aus.

4.	Wählen Sie die Zelle aus, für die Änderungen durchgeführt werden sollen, und klicken Sie anschließend auf Ändern.

Es erscheint das Dialogfenster Zellenmerkmale mit Informationen und Angaben zur Zelle.

5.	Ändern Sie im Fenster AFS-Zelle den Namen der AFS-Zelle, sofern gewünscht.

6.	Ändern Sie gegebenenfalls im Fenster Beschreibung die Beschreibung der Zelle.

7.	Wählen Sie Hinzufügen aus, wenn Sie einen Server-Eintrag zur Zelle hinzufügen wollen. Siehe Server-Informationen zu einer Zelle hinzufügen.

Klicken Sie zum Ändern der Server-Angaben auf Ändern. Siehe Server-Informationen ändern.

Wählen Sie Entfernen, um einen Server-Eintrag aus der Zelle zu löschen.  Siehe  Server-Informationen aus einer Zelle entferne.

7.	Klicken Sie auf OK.

Hinweis:	Inkorrekte oder fehlende Angaben und Informationen zu einer Zelle haben zur Folge, daß Ihre Client-Maschine auf die Dateien in dieser Zelle nicht zugreifen kann. Daher ist es wichtig, die entsprechenden Angaben und Informationen zu einer Zelle sorgfältig zu aktualisieren.

Zusätzliche Informationen:

Zellen zur Zellendatenbank hinzufügen

Zellen aus der Zellendatenbank löschen


Netzlaufwerkzuordnungen ändern

Damit Sie einfacher auf Dateien zugreifen können, die im AFS-Dateibereich gespeichert sind, können Sie  einer bestimmten Position im AFS-Dateibereich direkt ein Laufwerk zuordnen.

Diese Zuordnungen können verändert werden, indem Sie die dem Netzlaufwerk zugewiesenen Laufwerkbuchstaben ändern und auf diese Art einen anderen AFS-Pfad angeben sowie die entsprechende Beschreibung ändern. Außerdem können Sie den Verbindungsstatusvon Netzlaufwerkzuordnungen ändern.

Netzlaufwerkzuordnung ändern:

Hinweis:	Ein Netzlaufwerk, das gerade benutzt wird, kann nicht geändert werden.

1.	Rufen Sie das Register Laufwerkbuchstaben folgendermaßen auf:

Aufrufen des Registers vom Dienstprogramm AFS Light Configuration:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken  Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register Laufwerkbuchstaben aus.

Öffnen des Registers vom AFS Light-Merkmalfenster:

1.	Klicken Sie auf das Symbol AFS Light in der Task-Leiste. Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Wählen Sie das Register Laufwerkbuchstaben aus.

2.	Wählen Sie im Feld Laufwerkbuchstaben die Zuordnung aus, die geändert werden soll.

3.	Klicken Sie auf den Knopf Ändern.

4.	Es erscheint das Dialogfenster Laufwerkbuchstabe zuordnen. Ändern Sie den Laufwerkbuchstaben, den   AFS-Pfad und die Beschreibung, falls erforderlich.

5.	Aktivieren oder deaktivieren Sie je nach Bedarf das Markierungsfeld  Diese Zuordnung bei jeder Anmeldung wiederherstellen .

6.	Klicken Sie auf OK.

Die Änderungen erscheinen jetzt auf dem RegisterLaufwerkbuchstaben. Außerdem werden die vorgenommenen Änderungen auch im Windows Explorer angezeigt.

Zugehörige Abschnitte:

Netzlaufwerke AFS zuordnen

Netzlaufwerkzuordnungen entfernen


Server-Informationen
Server-Informationen ändern

AFS Light enthält eine Datei mit einer Auflistung aller registrierten AFS-Zellen und Namen sowie IP-Adressen der Volume Location Server innerhalb jeder Zelle. Diese Zellendatenbank befindet sich in der Datei  afsdcell.ini im Standardverzeichnisvon  Windows.

Wenn Änderungen an den Volume Location Server-Maschinen einer Zelle vorgenommen werden, muß die Zellendatenbank aktualisiert werden.

Server-Informationen einer Zelle ändern:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register AFS-Zellen aus.

4.	Markieren Sie die Zelle, deren Server-Informationen geändert werden sollen, und klicken Sie anschließend auf Ändern.

Es erscheint das Dialogfenster Zellenmerkmale.

5.	Wählen Sie den Server aus, bei dem die zugehörigen Server-Informationen geändert werden sollen, und klicken Sie anschließend auf Ändern.

Es erscheint das Dialogfenster Server editieren.

6.	Geben Sie gegebenenfalls im Fenster  Server-Name den neuen Namen des Volume Location Servers ein.

7.	Geben Sie im Fenster Server-Adresse die neue IP-Adresse des Volume Location Servers ein, falls erforderlich.

8.	Klicken Sie auf OK.

Die geänderten Server-Informationen werden nun in der Auflistung Server im Dialogfenster Zellenmerkmale angezeigt.

9.	Klicken Sie auf OK, damit die geänderten Server-Informationen zur Zelle hinzugefügt werden.

Zugehörige Abschnitte:

Zelleninformationen ändern

Server-Informationen aus einer Zelle entfernen


Befehle an der Eingabeaufforderung

AFS Light für Windows 98 unterstützt mehrere Befehle, mit denen Sie Ihre AFS-Dateien und -Verzeichnisse direkt von der Eingabeaufforderung verwalten können. In vielen Fälle stellen diese Befehle eine Alternative für die Verwaltung der AFS-Dateien und -Verzeichnisse dar, denn die selben Operationen können größtenteils auch mit der grafischen Benutzerschnittstelle von AFS auf dem Desktop durchgeführt werden. (Beachten Sie, daß diese Befehlsgruppen nicht verfügbar sind, wenn AFS Light auf einem System mit Windows 95 installiert ist.)

Die folgenden Befehle stehen an der Eingabeaufforderung zur Verfügung:

fs-Befehlsgruppe

vos-Befehlsgruppe

bos-Befehlsgruppe

kas-Befehlsgruppe

pts-Befehlsgruppe

klog

tokens

unlog

Zugehörige Abschnitte:

Befehle an der Eingabeaufforderung ausgeben


Fenster Eingabeaufforderung

Eine Befehlszeilenschnittstelle zum Eingeben von Textbefehlen.

Führen Sie die folgenden Schritte aus, um auf einem PC mit Windows 95 oder Windows 98 ein Eingabeaufforderungsfenster zu öffnen:

Wählen Sie im Menü Start das Menüelement Programme aus, und klicken Sie anschließend auf Eingabeaufforderung.


Laufwerke mit AFS verbinden
Netzlaufwerkzuordnungen verbinden und trennen

Ein Netzlaufwerk, das dem AFS-Dateibereich zugeordnet ist,kann verbunden werden, und eine bestehende Verbindung kann getrennt werden.

Hinweis:	Beim Trennen einer Netzlaufwerkzuordnung wird diese nicht gelöscht.

Es gibt mehrere Möglichkeiten, Laufwerke mit AFS zu verbinden oder von AFS zu trennen.

Eine neu erstellte Netzlaufwerkzuordnung wird automatisch verbunden.

Eine gelöschte Netzlaufwerkzuordnung wird sofort getrennt.

Eine Netzlaufwerkzuordnung, die mit der Option Diese Zuordnung bei jeder Anmeldung wiederherstellen erstellt wurde, wird automatisch bei jeder Anmeldung bei der Windows-Maschine verbunden. Diese Einstellung kann jedoch geändert werden (siehe Laufwerkzuordnungen ändern).

Zuordnungen, die getrennt wurden, können manuell wieder verbunden werden.

Führen Sie die folgenden Schritte aus, um Netzlaufwerkzuordnungen zu verbinden:

1.	Rufen Sie das Register Laufwerkbuchstaben folgendermaßen auf:

Aufrufen des Registers vom Dienstprogramm AFS Light Configuration:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken  Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register Laufwerkbuchstaben aus.

Aufrufen des Registers vom AFS Light-Merkmalfenster:

1.	Klicken Sie auf das Symbol AFS Light in der Task-Leiste. Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Wählen Sie das Register Laufwerkbuchstaben aus.

2.	Markieren Sie das Markierungsfeld neben dem Buchstaben für das Laufwerk, das mit dem AFS-Dateibereich verbunden werden soll.

Die Zuordnung ist jetzt verbunden, und der Laufwerkbuchstabe erscheint im Windows Explorer.

Eine Zuordnung, die verbunden ist, kann manuell getrennt werden.

Führen Sie die folgenden Schritte aus, um Netzlaufwerkzuordnungen zu trennen:

1.	Rufen Sie das Register Laufwerkbuchstaben folgendermaßen auf:

Aufrufen des Registers vom Dienstprogramm AFS Light Configuration:

1.	Wählen Sie im Menü Start das Menüelement Einstellungenaus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register Laufwerkbuchstaben aus.

Aufrufen des Registers vom AFS Light-Merkmalfenster:

1.	Klicken Sie auf das Symbol AFS Light in der Task-Leiste. Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Wählen Sie das Register Laufwerkbuchstaben aus.

2.	Entfernen Sie die Markierung aus dem Markierungsfeld neben dem Buchstaben für das Laufwerk, das getrennt werden soll.

Die Zuordnung ist jetzt getrennt, und der Laufwerkbuchstabe wird nicht mehr im Windows Explorer angezeigt.

Zugehörige Abschnitte:

Laufwerke AFS zuordnen


Dialogfenster ACL kopieren

Es ist möglich, eine Zugriffssteuerungsliste (Access Control List; ACL) aus einem Quellenverzeichnis in ein Zielverzeichnis zu kopieren.  Wenn Sie einen Dateinamen als Quellenverzeichnis angeben , wird die Zugriffssteuerungsliste (ACL) des der Datei übergeordneten Elternverzeichnisses verwendet.

  Kopieren von

  Kopieren nach

  Durchsuchen

  Aktuelle Einträge löschen

Zugehörige Abschnitte:

Zugriffssteuerungslisten kopieren


Dialogfenster ACL kopieren - Knopf Durchsuchen
Durchsuchen

Ermöglicht Ihnen, nach einem Zielverzeichnis zu suchen.

Hinweis:	Wenn Sie nach dem Zielverzeichnis suchen, müssen Sie eine Datei wählen, die sich im gewünschten Zielverzeichnis befindet . Wenn Sie ein leeres Verzeichnis als Zielverzeichnis verwenden wollen, dann müssen Sie im Feld  Kopieren nach den Pfad eingeben und können den Knopf Durchsuchen nicht benutzen.


Dialogfenster ACL kopieren - Markierungsfeld Aktuelle Einträge löschen
Aktuelle Einträge löschen

Ermöglicht Ihnen, alle vorhandenen ACL-Einträge aus der ACL des Zielverzeichnisses zu löschen, bevor Sie die Einträge des Quellenverzeichnisses hinzufügen. Ist dieses Feld nicht markiert, dann sind die aktuellen ACL-Einträge im Zielverzeichnis nicht betroffen.


Dialogfenster ACL kopieren - Feld Kopieren von
Kopieren von

Gibt den Pfad und den Verzeichnisnamen des Quellenverzeichnisses an.

Diese Information basiert auf der AFS-Datei oder dem AFS-Verzeichnis, von dem aus Sie auf das AFS-Menü zugegriffen haben.


Dialogfenster ACL kopieren - Feld Kopieren nach
Kopieren nach

Gibt den Pfad und den Verzeichnisnamen des Zielverzeichnisses an.


ACLs kopieren

Es ist möglich, eine Zugriffssteuerungsliste (Access Control List; ACL) aus einem Quellenverzeichnis in ein Zielverzeichnis zu kopieren. Wenn Sie einen Dateinamen als Quellenverzeichnis angeben, dann wird die Zugriffssteuerungsliste (ACL) des der Datei übergeordneten Verzeichnisses in das Zielverzeichnis kopiert.

Führen Sie die folgenden Schritte aus, um einen ACL-Eintrag in ein Zielverzeichnis zu kopieren:

Hinweis::	Um einen ACL-Eintrag kopieren zu können, müssen Sie über die Lookup-Zugriffsberechtigung für das Quellenverzeichnis und die Zugriffsberechtigung Administer für das Zielverzeichnis verfügen. Siehe AFS-Zugriffsberechtigungen.

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das Verzeichnis (oder eine Datei in diesem Verzeichnis), dessen ACL Sie kopieren wollen.

3.	Wählen Sie im AFS-Menü die Option Zugriffssteuerungslisten aus. Das Dialogfenster AFS-ACL festlegen wird geöffnet.

4.	Wählen Sie den Befehl Kopieren aus.

Es erscheint das Dialogfenster ACL kopieren  mit dem Feld Kopieren von, in dem der Pfad des Quellenverzeichnisses angegeben ist.

5.	 Geben Sie im Feld Kopieren nach den Pfadnamen für das Zielverzeichnis ein.

6.	Markieren Sie das Markierungsfeld Aktuelle Einträge löschen, wenn vor dem Hinzufügen der Zugriffsberechtigungen alle vorhandenen ACL-Einträge aus dem Zielverzeichnis entfernt werden sollen.

7.	Klicken Sie auf OK, damit die ACL in das angegebene Verzeichnis kopiert wird.

Zugehörige Abschnitte:

Übersicht über Zugriffssteuerungslisten

ACL-Einträge hinzufügen

ACL-Einträge entfernen


Definition von ACL-Eintrag
ACL-Eintrag

Ein Eintrag in einer Zugriffssteuerungsliste (Access Control List; ACL), der einen Benutzer oder eine Benutzergruppe mit bestimmten Zugriffsberechtigungen verknüpft, zum Beispiel Read oder  Write etc. Ein Eintrag kann entweder den Wert normal aufweisen, wodurch der Benutzer oder die Gruppe bestimmte Berechtigungen erhält, oder aber als negativ definiert sein, wodurch dem Benutzer oder der Gruppe bestimmte Berechtigungen verwehrt werden.


Definition von AFS Light
AFS Light

Software, die Benutzern von Windows 95 und Windows 98 ermöglicht, mit AFS Light Gateway auf den Dateibereich von AFS zuzugreifen.

Hinweis:	AFS Light Gateway ist eine Komponente des Produkts AFS Client für Windows NT.


Definition von AFS Light Gateway
AFS Light Gateway

Ein Service, der auf einer Windows NT-Maschine aktiv ist und Benutzern von AFS Light den Zugriff auf AFS ermöglicht.

Hinweis:	AFS Light Gateway ist eine Komponente des Produkts AFS Client für Windows NT.


Definition von AFS UID
AFS UID

Eine eindeutige Identifikationsnummer, die AFS-Benutzern und AFS-Gruppen zugeordnet ist.


Definition von Zugriffssteuerungsliste (Access Control List; ACL)
Zugriffssteuerungsliste (Access Control List; ACL)

Eine Liste, die einem AFS-Verzeichnis zugeordnet ist und die Aktionen definiert, die ein Benutzer oder eine Gruppe für dieses Verzeichnis und die in ihm enthaltenen Dateien durchführen darf.


Definition von Authentifiziert
Authentifiziert

Der Status eines Principals, dessen Identität von AFS geprüft und bestätigt wurde.


Definition von Authentifizierung
Authentifizierung

Vorgang, bei dem geprüft wird, ob ein Benutzer oder ein Prozeß eine gültige (d.h. zulässige) Identität vorweisen kann.

Eine Authentifizierung beinhaltet auch die Bestätigung, daß das vom Benutzer eingegebene Kennwort korrekt ist.


Definition von Rückruf
Rückruf

Eine Zusicherung des Datei-Servers, daß er AFS Light kontaktieren muß, falls Änderungen an der zentral gespeicherten Kopie der Datei durchgeführt werden, während sie lokal benutzt wird.  Rückrufe stellen sicher, daß die Benutzer immer mit der aktuellsten Version der verfügbaren Dateien und Verzeichnisse arbeiten.


Definition von Zelle
Zelle

Ein verwaltungstechnisch unabhängiger Standort, der AFS verwendet und aus einer Gruppe von AFS-Server-Maschinen und AFS-Client-Maschinen besteht.

Eine Client-Maschine kann jeweils immer nur zu einer Zelle gehören.


Definition von Zellendatenbank
Zellendatenbank

Eine Datei mit einer Auflistung aller registrierten AFS-Zellen und  den Namen sowie IP-Adressen der Datenbank-Server innerhalb jeder Zelle.  Diese  Zellendatenbank befindet sich in der Datei  afsdcell.iniim Standardverzeichnis von  Windows.

Hinweis:	AFS Light muß eine Zelle registrieren; erst danach können Sie diese Zelle kontaktieren.


Definition von Datei-Server
Datei-Server

Ein bestimmter Maschinentyp zum Speichern von Dateien und Übertragen angeforderter Dateien zu Client-Maschinen.


Definition von Lokale Zelle
Lokale Zelle

Die Zelle, zu der die lokale Client-Maschine gehört. Selbst wenn ein Benutzer die Authentifizierung in einer fremden Zelle erfolgreich durchführen oder auf Dateien in einer fremden Zelle zugreifen kann, bleibt die Identität der lokalen Zelle während einer Anmeldesitzung unverändert.


Definition von Mount-Punkt
Mount-Punkt

Ein besonderer Verzeichnistyp, der eine Position im AFS-Dateibereich mit einem Volume verbindet. Ein Mount-Punkt sieht wie ein Standardverzeichnis aus. Bei der Auflistung des Verzeichnisses wird der Inhalt des Volumes angezeigt.

Hinweis:	Jeder Mount-Punkt entspricht einem einzelnen Volume.


Definition von Netzlaufwerk
Netzlaufwerk

Eine Verbindung zum Festplattenlaufwerk eines fernen Computers, über die Sie auf gemeinsam benutzte Dateien und Verzeichnisse zugreifen können. Es ist möglich, eine Verbindung zwischen einem Netzlaufwerk und einem Verzeichnis im AFS-Dateibereich herzustellen.


Definition von Partition
Partition

Ein logischer Abschnitt (Sektion) eines Datenträgers in einem Computer.


Definition von Kennwort
Kennwort

Eine eindeutige, einmalige und benutzerdefinierte Zeichenfolge, mit der die Identität des Benutzers gegenüber dem System gekennzeichnet wird.

Der Benutzer zur Authentifizierung bei AFS das Kennwort eingeben.


Definition von Quote
Quote

Die Größenbegrenzung eines Volumes, die vom Systemadministrator erteilt und in1-KB-Blöcken gemessen wird.


Definition von Read-Only
Read-Only

Ein Volume (und daher auch Verzeichnisse und Dateien), das von einem Quellen-Volume kopiert wurde und nicht geändert werden kann.

Hinweis:	Volumes mit Dateien und Verzeichnissen, auf die häufig zugegriffen wird, werden oft kopiert und auf mehreren Datei-Servern abgelegt, um auf diese Art die Systemleistung zu verbessern.


Definition von Read/Write
Read/Write

Die änderungsfähige Version eines Volumes und damit auch der in ihm enthaltenen Dateien und Verzeichnisse.


Definition von Registrierte Zelle
Registrierte Zelle

Server-Informationen (Namen und IP-Adressen) zu einer AFS-Zelle, die in der Zellendatenbank erfaßt werden.


Definition von Token
Token

Ein Satz Daten, der nach der Authentifizierung eines Benutzers bei AFS freigegeben wird. AFS Light verwendet Token bei der Anforderung von Services von AFS Servern.

Einem Token ist eine bestimmte Lebensdauer zugeordnet, die nach einer festgelegten Zeitspanne erschöpft ist. Danach verfällt das Token. Wenn Ihr Token abgelaufen ist, haben Sie nicht längerauthentifizierten Zugriff auf AFS. Die Standardlebensdauer für Token beträgt 25 Stunden.


Definition von Benutzername
Benutzername

Der Name, der den Benutzer in der lokalen Zelle eindeutig kennzeichnet. Der Benutzername ist der AFS-Benutzer-ID (UID)zugeordnet.


Definition von Volume
Volume

Eine Gruppe zusammengehöriger Dateien und Verzeichnisse, die auf einer AFS-spezifischen Plattenpartition gespeichert sind.


Definition von Volume Location Server
Volume Location Server

Ein Server-Prozeß in AFS, mit dem die Verwaltung der Volume Location Database erfolgt.

Die Client-Maschine kontaktiert den Volume Location Server einer Zelle, um Dateien und Verzeichnissen zu lokalisieren.


Zellen aus der Zellendatenbank löschen
Zellen löschen

Es ist möglich,eine Zelle zu löschen, die in derZellendatenbank Ihrer Maschine registriert ist.  Nachdem eine Zelle aus der Zellendatenbank entfernt wurde, ist es nicht mehr möglich, diese Zelle zu kontaktieren.

Führen Sie die folgenden Schritte aus, um eine Zelle zu löschen::

1.	Wählen Sie im Menü Start das  Menüelement Einstellungenaus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register AFS-Zellen aus.

4.	Wählen Sie die Zelle aus, die gelöscht werden soll, und klicken Sie anschließend auf  Entfernen.

5.	AFS Light zeigt eine Nachricht an und fragt Sie, ob die auswählte Zelle wirklich gelöscht werden soll.  Wenn Sie den gewünschten Löschvorgang bestätigen, kann die angegebene Zelle nicht mehr kontaktiert werden. Klicken Sie auf OK, um die Zelle zu löschen.

6.	Klicken Sie zum Schließen des Dienstprogramms AFS Light Configuratione auf OK.

Hinweis:	Die in einer gelöschten Zelle enthaltenen Dateien und Verzeichnisse sind nicht mehr zugänglich.

Zusätzliche Informationen:

Neue Zellen hinzufügen

Zelleninformationen ändern


Zugriffssteuerung auf Verzeichnisebene

In AFS werden Zugriffsberechtigungen auf Verzeichnisebene definiert. Die Zugriffssteuerung auf Verzeichnisebene hat verschiedene Konsequenzen:

Dateien übernehmen die dem Elternverzeichnis zugeordneten Zugriffsberechtigungen. Wenn Sie eine Datei in ein anderes Verzeichnis verschieben, dann übernimmt diese Datei die Zugriffsberechtigungen des Verzeichnisses, in das Sie die Datei verschoben haben.  Wenn Sie die ACL für ein Verzeichnis ändern, dann hat dies zur Folge, daß sich der Zugriffsschutz für alle in diesem Verzeichnis enthaltenen Dateien ändert.

Wenn Sie ein Unterverzeichnis erstellen, so übernimmt es die Zugriffsberechtigungen seines Elternverzeichnisses.

Hinweis:	Sie können nach der Erstellung eines Unterverzeichnisses die ACL für dieses Unterverzeichnis so ändern, daß die ACL von der des übergeordneten Verzeichnisses abweicht.

Wenn Sie die ACL für ein Elternverzeichnis restriktiver gestalten als die ACL für ein Unterverzeichnis, ist es möglich, daß Sie Benutzern des Unterverzeichnisses unabsichtlich den Zugriff verwehren, selbst wenn die Benutzer normale Zugriffsrechte für das Unterverzeichnis besitzen.

Hinweis:	Generell sollten Sie die Zugriffsberechtigungen für ein Ausgangsverzeichnis relativ liberal gestalten, und dann zum besseren Schutz bestimmter Dateien Unterverzeichnisse mit restriktiveren Berechtigungen erstellen.

Zugehörige Abschnitte:

Zugriffssteuerungslisten festlegen


Mount-Punkte anzeigen

Sie können das Dialogfenster Mount-Punkte für ein ausgewähltes Verzeichnis anzeigen lassen. Wenn ein Verzeichnis ein Mount-Punkt ist, dann enthält das Dialogfenster Mount-Punkt Angaben über den Mount-Punkt.

Führen Sie die folgenden Schritte aus, um die Mount-Punkt-Informationen anzuzeigen:

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf  Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das Verzeichnis, für das Sie den Mount-Punkt anzeigen lassen wollen.

3.	Wählen Sie AFS, dann  Mount-Punkt, und anschließend Anzeigen.

Das Dialogfenster Mount-Punkt wird angezeigt. Dieses Dialogfenster enthält Angaben und Informationen über den Mount-Punkt des ausgewählten Verzeichnisses. Wenn es sich bei dem ausgewählten Verzeichnis nicht um einen Mount-Punkt handelt, dann wird die Nachricht

Verzeichnis ist kein Mount-Punkt

angezeigt, wobei  Verzeichnis für den Namen des ausgewählten Verzeichnisses steht.

Zugehörige Abschnitte:

Mount-Punkte

Dateispeicherungskonzepte


Volume- und Partitionsinformationen anzeigen

Die Datenträger zum Speichern von Daten in einem Computer sind in Partitionen unterteilt. AFS untergliedert diese Partitionen in sogenannte  Volumes. Ein Volumen umfaßt eine untergeordnete Baumstruktur zusammengehörender Dateien und Verzeichnisse. Sie können die Merkmale von Volumes und Partitionen anzeigen.

Führen Sie die folgenden Schritte aus, um Volume-Informationen anzuzeigen:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf die Datei oder das Verzeichnis, für das die Volume-Informationen angezeigt werden sollen.

3.	Klicken Sie auf  AFS, dann Volume/Partition, und anschließend auf Merkmale.

Es erscheint das Dialogfenster Volume-Informationen. Dieses Dialogfenster enthält Angaben und Informationen über das Volume, das die ausgewählte Datei oder das ausgewählte Verzeichnis beinhaltet.

Führen Sie die folgenden Schritte aus, um Partitionsinformationen anzuzeigen:

1.	Öffnen Sie wie oben beschrieben das Dialogfenster Volume-Informationen.

2.	Klicken Sie im Dialogfenster Volume-Informationen auf den Knopf  Informationen zur Partition anzeigen.

Es erscheint das Dialogfenster Informationen zur Partition. Dieses Dialogfenster enthält Angaben und Informationen über die Partition, die die ausgewählte Datei oder das ausgewählte Verzeichnis beinhaltet.

Zugehörige Abschnitte:

Volumes und Partitionen


Das Symbol für AFS Light anzeigen

Mit dem Symbol AFS Light in der Task-Leiste kann das AFS Light-Merkmalfenster geöffnet werden. Das AFS Light-Merkmalfenster bietet dem AFS-Benutzer eine bequeme Möglichkeit, zahlreiche AFS-Tasks einfach auszuführen.

Der Zugriff auf das Symbol AFS Light erfolgt über das Dienstprogramm AFS Light Configuration.

Führen Sie die folgenden Schritte aus, um das Symbol für AFS Light in der Task-Leiste anzuzeigen:

1.	Wählen Sie im Menü Start das  Menüelement Einstellungenaus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration, um das Dienstprogramm AFS Light Configuration aufzurufen.

3.	Wählen Sie das Register Allgemein aus.

4.	Wählen Sie die Option Das Symbol für AFS Light in der Task-Leiste anzeigen.

5.	Klicken Sie auf OK.

Das Symbol AFS Light erscheintsofort als kleines Vorhängeschloß in der Task-Leiste.

 Hinweis:	Das Symbol AFS Light erscheint jetzt jedes Mal automatisch in der Task-Leiste, wenn Sie AFS starten.


Register Laufwerkbuchstaben - Knopf Hinzufügen
Hinzufügen

Öffnet das Dialogfenster Laufwerkbuchstabe zuordnen. In diesem Dialogfenster können Sie auf Ihrer Windows-Maschine einen bestimmtenLaufwerkbuchstaben dem AFS-Dateibereich zuordnen. Damit Sie auf den AFS-Dateibereich zugreifen können, muß mindestens ein Laufwerk einem Pfad in AFS zugeordnet sein.

Weitere Informationen siehe Laufwerke AFS zuordnen.


Register Laufwerkbuchstaben - Knopf Ändern
Ändern

Öffnet das Dialogfenster Laufwerkbuchstabe zuordnen. In diesem Dialogfenster können Sie den Laufwerkbuchstaben oder den AFS-Pfad für eine bereits vorhandene Zuordnung ändern.

Hinweis:	Diese Option steht nicht für Laufwerke zur Verfügung, die zum aktuellen Zeitpunkt benutzt werden.

Weitere Informationen siehe Netzlaufwerkzuordnungen ändern.


Register Laufwerkbuchstaben - Knopf Entfernen
Entfernen

Entfernt die Zuordnung des angegebenen Laufwerkes zum AFS-Pfad. Nach Entfernen der Zuordnung wird die Verbindung für das angegebene Laufwerk sofort getrennt.

Hinweis:	Diese Option steht nicht für Laufwerke zur Verfügung, die zum aktuellen Zeitpunkt benutzt werden.

Weitere Informationen siehe Netzlaufwerkzuordnungen entfernen.


Dialogfenster Server editieren

Die Client-Maschine muß in der Lage sein, die Volume Location Server-Maschinen einer Zelle zu kontaktieren, damit der Zugriff auf Dateien dieser Zelle möglich ist. Inkorrekte oder fehlende Angaben und Informationen zu einer Zelle haben zur Folge, daß AFS Light keine Dateien abrufen kann.

Die Server-Informationen, die einer Zelle zugeordnet sind, die in  derZellendatenbank von AFS Light registriert ist, können geändert werden.

Hinweis:	Es ist wichtig, Angaben und Informationen zu Zellen zu aktualisieren, sobald sich die Server-Informationen für die entsprechende Zelle ändern.

  Server-Name

  Server-Adresse

Zugehörige Abschnitte:

Server-Informationen ändern


Dialogfenster Server editieren - Feld Server-Adresse
Server-Adresse

Zeigt die Server-spezifische IP-Adresse des Servers an, den Sie gerade editieren, oder gibt an, daß Windows die IP-Adresse des angegebenen Servers automatisch sucht.


Dialogfenster Server editieren - Feld Server-Name
Server-Name

Zeigt den Namen des Servers an, den Sie gerade editieren.


Befehl Datei/Verz leeren
Der Befehl Datei/Verz leeren

Das Leeren von Dateien oder Verzeichnissen hat häufig zur Folge, daß in AFS Light gespeicherte Kopien von AFS-Material aktualisiert werden. Dadurch wird sichergestellt, daß Sie immer mit der aktuellsten Version einer Datei arbeiten.

Der Zugriff auf den Befehl  Datei/Verz leeren erfolgt über das AFS-Menü.

Dieser AFS-Menü-Befehl zwingt AFS Light, die Daten und die zugehörigen Statusinformationen, die  für bestimmte Dateien oder Verzeichnisse gespeichert worden sind, zu löschen. Wenn danach ein Anwendungsprogramm die Daten anfordert,  ruft Ihre Client-Maschine die aktuellste beim Datei-Server verfügbare Version ab.

Hinweis:	AFS verfügt über einen Mechanismus, mit dem sichergestellt wird, daß Sie auf die aktuellste Version der verfügbaren Dateien und Verzeichnisse zugreifen.  Wenn der Datei-Server einer Client-Maschine eine Kopie einer änderungsfähigen Datei übermittelt, dann wird gleichzeitig ein sogenannter Rückrufgesendet. Werden an der zentral gespeicherten Kopie einer Datei Änderungen vorgenommen, während Sie die Datei verwenden, dann unterbricht der Datei-Server den Rückruf. Wenn Sie danach mehr Daten dieser Datei anfordern,erkennt AFS Light den unterbrochenen Rückruf und greift auf eine aktualisierte Kopie der Datei auf dem Datei-Server zu.

Der Befehl Datei/Verz leeren kann verwendet werden, wenn Sie vermuten, daß der Rückruf-Mechanismus ausnahmsweise nicht ordnungsgemäß funktioniert.

Zugehörige Abschnitte:

Dateien und Verzeichnisse leeren

Volumes leeren

AFS-Dateispeicherungskonzepte


Befehl Volume leeren
Der Befehl Volume leeren

Durch Leeren eines angegebenen Volumes wird sichergestellt, daß Sie durch die Aktualisierung der  Kopien des von AFS Light gespeicherten AFS-Materials jeweils mit den aktuellsten Kopien der jeweiligen Dateien arbeiten.

Der Zugriff auf den Befehl Volume leeren erfolgt über das AFS-Menü .

Der Befehl im AFS- Menü zwingt AFS Light, die für alle Elemente im Cache gespeicherten Daten zu löschen, die aus dem  selben Volume wie die angegebenen Dateien oder Verzeichnisse stammen. Wenn danach ein Anwendungsprogramm die Daten anfordert,  ruft Ihre Client-Maschine die aktuellste beim Datei-Server verfügbare Version ab.

Hinweis:	AFS verfügt über einen Mechanismus, mit dem sichergestellt wird, daß Sie auf die aktuellste Version der verfügbaren Dateien und Verzeichnisse zugreifen.  Wenn der Datei-Server einer Client-Maschine eine Kopie einer änderungsfähigen Datei übermittelt, dann wird gleichzeitig ein sogenannter Rückrufgesendet. Werden an der zentral gespeicherten Kopie einer Datei Änderungen vorgenommen, während Sie die Datei verwenden, dann unterbricht der Datei-Server den Rückruf. Wenn Sie danach mehr Daten dieser Datei anfordern,erkennt AFS Light den unterbrochenen Rückruf und greift auf eine aktualisierte Kopie der Datei auf dem Datei-Server zu.

Der Befehl  Volume leeren kann verwendet werden, wenn Sie vermuten, daß der Rückruf-Mechanismus ausnahmsweise nicht ordnungsgemäß funktioniert.

Zugehörige Abschnitte:

AFS-Dateispeicherungskonzepte

Volumes leeren

Dateien und Verzeichnisse leeren


Dateien und Verzeichnisse leeren
Dateien oder Verzeichnisse leeren

Das Leeren von Dateien oder Verzeichnissen hat häufig die Aktualisierung von in  AFS Light gespeicherten Kopien von AFS-Material zur Folge. Dadurch wird sichergestellt, daß Sie immer mit der aktuellsten Version einer Datei arbeiten.

AFS stellt sicher, daß Client-Maschinen einen Hinweis mit dem Inhalt erhalten, daß ihre Dateiversion nicht mehr gültig ist, sofern Änderungen an der zentral gespeicherten Dateiversion auf dem Datei-Server vorgenommen werden. Wenn der Datei-Server die Kopie einer änderungsfähigen Datei übermittelt, dann wird gleichzeitig ein sogenannter Rückruf gesendet. Werden an der zentral gespeicherten Kopie einer Datei Änderungen vorgenommen, während Sie die Datei verwenden, dann unterbricht der Datei-Server den Rückruf. Wenn Sie danach Daten der Datei anfordern, erkennt die Client-Maschine den unterbrochenen Rückruf undgreift auf eine aktualisierte Kopie der Datei auf dem Datei-Server zu. Rückrufe stellen automatisch sicher, daß Ihre Client-Maschine  immer mit der aktuellsten Version der verfügbaren Dateien und Verzeichnisse arbeitet.

Der BefehlDatei/Verz leeren kann verwendet werden, wenn Sie vermuten, daß der Rückruf-Mechanismus ausnahmsweise nicht ordnungsgemäß funktioniert. Verwenden Sie diese Option, um AFS Light zum Löschen (Leeren) von Daten im Cache zu zwingen. Wenn danach ein Anwendungsprogramm die Daten anfordert,  ruft AFS Light die aktuellste beim Datei-Server verfügbare Version ab.

Führen Sie die folgenden Schritte aus, um Dateien oder Verzeichnisse zu leeren:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf eine zu aktualisierende AFS-Datei oder ein zu aktualisierende AFS-Verzeichnis.

3.	Wählen Sie AFS und anschließend  Datei/Verz leeren aus.

AFS Light löscht die gespeicherten Daten für die ausgewählte Datei bzw. das ausgewählte Verzeichnis.

Zugehörige Abschnitte:

AFS-Dateispeicherungskonzepte

Volumes leeren


Volumes leeren

Das Leeren eines angegebenen Volumes hat häufig die Aktualisierung von  Kopien von AFS-Material zur Folge, die  AFS Light beinhaltet. Dadurch wird sichergestellt, daß Sie immer mit den aktuellsten Versionen von Dateien arbeiten.

AFS stellt sicher, daß Client-Maschinen einen Hinweis mit dem Inhalt erhalten, daß ihre Dateiversion nicht mehr gültig ist, falls Änderungen an der zentral gespeicherten Dateiversion auf dem Datei-Server vorgenommen werden. Wenn der Datei-Server einer Client-Maschine eine Kopie einer änderungsfähigen Datei übermittelt, dann wird gleichzeitig ein sogenannter Rückruf gesendet. Werden an der zentral gespeicherten Kopie einer Datei Änderungen vorgenommen, während Sie die Datei benutzen, dann unterbricht der Datei-Server den  Rückruf. Wenn Sie danach Daten der Datei anfordern,  erkennt die Client-Maschine den unterbrochenen Rückruf und greift auf eine aktualisierte Kopie der Datei auf dem Datei-Server zu. Rückrufe stellen automatisch sicher, daß AFS Light auf die aktuellste Version der verfügbaren Dateien und Verzeichnisse zugreift.

Der Befehl Volume leeren kann verwendet werden, wenn Sie vermuten, daß der Rückruf-Mechanismus ausnahmsweise nicht ordnungsgemäß funktioniert. Verwenden Sie diese Option, um AFS Light zum Löschen (Leeren) von Daten im Cache zu zwingen. Wenn danach ein Anwendungsprogramm die Daten anfordert,  ruft Ihre Client-Maschine die aktuellste beim Datei-Server verfügbare Version ab.

Führen Sie die folgenden Schritte aus, um  Volumes zu leeren:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf eine AFS-Datei oder ein AFS-Verzeichnis in einem Volume, das geleert werden soll.

3.	Klicken Sie auf AFS und anschließend auf  Volume leeren.

Zugehörige Abschnitte:

AFS-Dateispeicherungskonzepte

Dateien und Verzeichnisse leeren


Register Allgemein - Feld Zellenname
Zellenname

Gibt den Namen der AFS-Zelle an, in dem Ihre AFS Light-Maschine konfiguriert ist.

Hinweis:	AFS Light gehört zu derselben Zelle wie der AFS Client, der als ihr Gateway dient.


Register Allgemein - Feld Gateway
Gateway

Kennzeichnet eine Windows NT-Maschine, die als ein AFS Light Gateway konfiguriert wurde.

Weitere Informationen siehe Einen AFS Light Gateway identifizieren.


Register Allgemein - Markierungsfeld AFS-Token erhalten
AFS-Token beim Anmelden bei Windows erhalten

Wenn Sie dieses Markierungsfeld auswählen, können Sie sich mit nur einem Schritt bei Windows anmelden und bei AFS authentifizieren.  Geben Sie, wenn Sie sich bei Windows anmelden, die entsprechende ID und das Kennwort ein. Sie sind dann bei Windows angemeldet und besitzen ein AFS-Token für die lokale Zelle der Client-Maschine.  Damit ist keine weitere Authentifizierung mehr erforderlich.

Hinweis:	Um den Vorteil der integrierten Anmeldung nutzen zu können, müssen Ihre ID und Ihr Kennwort für AFS und für Windows identisch sein.

Wenn Sie die Markierung für dieses Markierungsfeld entfernen, können Sie sich bei Windows anmelden und unabhängig davon bei AFS authentifizieren.  Dies bedeutet, daß Sie jedes Mal, wenn Sie sich bei Windows anmelden, , die Authentifizierung bei AFS durchführen müssen.

Weitere Informationen siehe Integrierte Anmeldung.


Register Allgemein - Markierungsfeld Das Symbol für AFS Light in der Task-Leiste anzeigen
Das Symbol für AFS Light in der Task-Leiste anzeigen

Wenn Sie dieses Markierungsfeld auswählen, wird das Symbol für AFS Light in der rechten unteren Ecke des Monitors in der Task-Leiste angezeigt. Mit dem Symbol für AFS Light ist der Direktaufruf zahlreicher AFS-Funktionen möglich.

Weitere Informationen siehe Das Symbol für AFS Light anzeigen.


Hilfe anfordern
Online-Hilfefunktion

Die Dokumentation für die Online-Hilfefunktion, die gemeinsam mit  AFS Light geliefert wird, beschreibt Funktionen, die in den Produkten AFS Light für Windows  95 und Windows 98 verfügbar sind.

Führen Sie die folgenden Schritte aus, um Hilfe anzufordern:

1.	Suchen Sie im Menü Start die die Programmgruppe IBM AFS (oder IBM WebSphere) und die Programmuntergruppe Light.

2.	Klicken Sie auf Online-Hilfefunktion.

Es erscheint das Dialogfenster Hilfethemen.

Hilfe zu einem  bestimmten Stichwort erhalten Sie, indem Sie die Seite Inhalt mit dem Index nach dem gewünschten Stichwort durchsuchen, oder aber Suchen verwenden,  die Suchmaschine der Online-Hilfefunktion.

Hinweis:	Zu zahlreichen Themen können Sie die Hilfe auch durch Auswählen des Knopfes Hilfe aufrufen. Dieser Knopf ist in den meisten Dialogfenstern vorhanden.


Erste Schritte

Der Zugriff auf den AFS-Dateibereich ist erst möglich,  wenn Sie AFS auf Ihrer Windows 95- oder 98-Maschine konfiguriert haben.

Führen Sie die folgenden Schritte aus, um AFS zu konfigurieren:

1.	Legen Sie eine Windows NT-Maschine als Gateway zum AFS-Dateibereich fest. Siehe Ein AFS Light Gateway festlegen.

2.	Verbinden Sie ein Laufwerk mit dem  AFS-Dateibereich. Siehe Den AFS-Dateibereich anhängen.

Sie können jetzt auf  AFS zugreifen. Der Zugriff auf den AFS-Dateibereich ist ohne Authentifizierung jedoch massiv eingeschränkt. Damit Sie im AFS-Dateibereich sinnvoll und effizient arbeiten können, müssen Sie sich bei AFS authentifizieren.

3.	Legen Sie Ihre Identität in AFS fest. Siehe Authentifizierung bei AFS.

Zugehörige Abschnitte:

Dienstprogramm AFS Light Configuration

Informationen zu AFS Light


Glossar

A

Zugriffssteuerungsliste (Access Control List; (ACL)

Eine Liste, die einem AFS-Verzeichnis zugeordnet ist und die Aktion definiert,  die ein Benutzer oder eine Gruppe für dieses Verzeichnis und die in ihm enthaltenen Dateien durchführen darf.

Zugriffsberechtigungen

Es gibt sieben verschiedene Zugriffsrechte:  Read, Lookup, Insert , Delete, Write , Lock und Administer , wobei jedem der aufgeführten Zugriffsrechte eine aus einem Buchstaben bestehende Abkürzung zugeordnet ist: r , l, i, d, w, k, a.

ACL

Siehe Zugriffssteuerungsliste.

ACL-Eintrag

Ein Eintrag auf einer Zugriffssteuerungsliste (ACL), der einen Benutzer oder eine Benutzergruppe mit bestimmten AFS-Zugriffsberechtigungen verknüpft. Ein Eintrag kann den Wert normal aufweisen und dem Benutzer bzw. der Gruppe die speziell festgelegten Berechtigungen erteilen, oder er kann negativ sein und so dem Benutzer oder der Gruppe die festgelegten Berechtigungen verweigern.

AFS

Ein Unternehmensdateisystem, das über einen einzelnen gemeinsamen Dateibereich konsistenten Dateizugriff gewährleistet. Dateien werden im Computernetz auf verschiedenen Maschinen gespeichert (d.h. auf verschiedene Maschinen verteilt), der Zugriff auf diese Dateien ist jedoch von allen Maschinen möglich.

AFS Light

Software, die Benutzern von Windows 95 und Windows 98 ermöglicht, mit AFS Light Gateway auf den Dateibereich von AFS zuzugreifen.

AFS Light Gateway

Ein Service, der auf einer Windows NT-Maschine aktiv ist und Benutzern von AFS Light den Zugriff auf AFS ermöglicht. AFS Light Gateway ist eine Komponente des Produkts AFS  Client für Windows NT.

AFS UID

Eine eindeutige Identifikationsnummer, die AFS-Benutzern und AFS-Gruppen zugeordnet ist.

Authentifiziert

Der Status eines Principals, dessen Identität von AFS geprüft und bestätigt wurde.

Authentifizierung

Vorgang, bei dem geprüft wird, ob ein Benutzer oder ein Prozeß eine gültige (d.h. zulässige) Identität vorweisen kann. Die Authentifizierung umfaßt auch die Bestätigung, daß das vom Benutzer eingegebene Kennwort korrekt ist.

C

Rückruf

Eine Zusicherung des Datei-Servers, daß er AFS Light kontaktieren muß, falls Änderungen an der zentral gespeicherten Kopie der Datei durchgeführt werden, während sie lokal benutzt wird. Rückrufe stellen sicher, daß die Benutzer immer mit der aktuellsten Version der verfügbaren Dateien und Verzeichnisse arbeiten.

Zelle

Ein verwaltungstechnisch unabhängiger Standort, der AFS verwendet und aus einer Gruppe von AFS-Server-Maschinen und AFS- Client-Maschinen besteht. Eine Client-Maschine kann jeweils immer nur zu einer Zelle gehören.

Zellendatenbank

Eine Datei mit einer Auflistung aller registrierter  AFS- Zellen und den Namen sowie IP-Adressen der Datenbank-Server innerhalb jeder Zelle.  Die Zellendatenbank befindet sich in der Datei afsdcell.ini im  Standardverzeichnis von  Windows.

Eingabeaufforderung

Eine Befehlszeilenschnittstelle zum Eingeben von AFS-Textbefehlen.

D

Verzeichnis

Eine logische Struktur, die aus einer Objektgruppe besteht und Dateien sowie andere Verzeichnissen beinhaltet.

F

Datei

Eine Objektgruppe zusammengehöriger Informationen und Dateien, die unter einem einzigen Namen gespeichert und abgerufen werden.

Datei-Server

Ein bestimmter Maschinentyp zum Speichern von Dateien und zum Übertragen angeforderter Dateien zu Client-Maschinen.

Fremde Zelle

eine AFS-Zelle, die nicht identisch ist mit der Zelle, zu der die lokale (Client-) Maschine gehört.

G

Gruppeneintrag

Ein ACL-Eintrag, der für alle Mitglieder einer Gruppe gültig ist. Eine Gruppe kann sowohl aus Benutzern als auch aus Maschinen bestehen. Ein Benutzer, der Mitglied einer Gruppe ist, verfügt über alle dieser Gruppe zugeordneten Berechtigungen. Ein Benutzer, der bei einer Maschine angemeldet ist, die als Mitglied einer Gruppe definiert ist, besitzt alle für diese Gruppe festgelegten Berechtigungen.

E

Integrierte Anmeldung

Eine AFS-Funktion, die es ermöglicht, die Anmeldung für Windows und für AFS in einem Schritt miteinander zu verbinden.

L

Lokale Zelle

Die Zelle, zu der die lokale Client-Maschine gehört. Selbst wenn ein Benutzer die Authentifizierung in einer fremden Zelle erfolgreich durchführen oder auf Dateien in einer fremden Zelle zugreifen kann, bleibt die Identität der lokalen Zelle während einer Anmeldesitzung unverändert.

M

Mount-Punkt

Ein besonderer Verzeichnistyp, der eine Position im AFS-Dateibereich mit einem Volume verbindet. Ein Mount-Punkt sieht wie ein Standardverzeichnis aus. Bei der  Auflistung des Verzeichnisses wird der Inhalt des Volumes angezeigt.

N

Negative Zahlen (Eingabe)

Ein ACL-Eintrag, der einem Benutzer oder einer Gruppeausdrücklich die Berechtigung verweigert, bestimmte Aktionen durchzuführen.

Netzlaufwerk

Eine Verbindung zum Festplattenlaufwerk eines fernen Computers, über die Sie auf gemeinsam benutzte Dateien und Verzeichnisse zugreifen können. Es ist möglich, eine Verbindung zwischen einem Netzlaufwerk und einem Verzeichnis im AFS-Dateibereich herzustellen.

Netzlaufwerkzuordnung

Ein Neztlaufwerk, das einer bestimmten Position im AFS-Dateibereich zugeordnet ist und so den einfachen Zugriff auf Dateien, die in AFS gespeichert sind, ermöglicht.

Normaler Eintrag

Ein ACL-Eintrag, der einem Benutzer oder einer Gruppe die Berechtigung erteilt, bestimmte Aktionen durchzuführen.

P

Partition

Ein logischer Abschnitt (Sektion) einer Speicherplatte in einem Computer.

Kennwort

Eine eindeutige, einmalige und benutzerdefinierte Zeichenfolge, mit der die Identität des Benutzers gegenüber dem System gekennzeichnet wird.

Q

Quote

Die Größenbegrenzung eines Volumes, die vom Systemadministrator erteilt und in 1-KB-Blöcken gemessen wird.

R

Read-only-Volume

Die Kopie eines Quellen-Volumes, die nicht geändert werden kann.

Read/Write-Mount-Punkt

Ein Mount-Punkt zu einem  Read/Write-Volumen.

Read/Write-Volume

Ein Volume, das änderungsfähige Versionen von Dateien und Verzeichnissen umfaßt.

Registrierte Zelle

Eine AFS-Zelle, deren Volume Location Server-Informationen in der Zellendatenbank erfaßt worden sind.

Regulärer Mount-Punkt

Ein Mount-Punkt zu einem Volume  desselben Typs wie das Volume, in dem sich der Mount-Punkt befindet. Wenn Sie beispielsweise einen Mount-Punkt von einem Read-Only Volume erstellen, dann sucht AFS Light beim Zugriff auf diesen Mount-Punkt nach Daten von Read-Only Volumes.

S

Unterverzeichnis

Ein Verzeichnis, das sich in einem anderen Verzeichnis in der Dateisystem-Hierarchie befindet.

Systemadministrator

Ein Benutzer, der autorisiert (berechtigt) ist, AFS in einer Zelle zu bedienen und zu verwalten.

system:anyuser

Eine systemdefinierte Gruppe, die jeden Benutzer umfaßt, der Zugriff auf die Zelle erlangen kann. Dies beinhaltet auch nicht authentifizierte AFS-Benutzer.

T

Token

Ein Satz Daten, der nach der Authentifizierung eines Benutzers bei AFS freigegeben wird. AFS Light verwendet Token bei der Anforderung von Services von AFS Servern. Einem Token ist eine bestimmte Lebensdauer zugeordnet, die nach einer festgelegten Zeitspanne erschöpft ist. Danach verfällt das Token. Wenn Ihr Token abgelaufen ist, haben Sie nicht länger authentifizierten Zugriff auf AFS. Die Standardlebensdauer für Token beträgt 25 Stunden.

U

Nicht authentifiziert

Der Status eines Principals, dessen Identität bei AFS nicht bekannt ist.

Benutzereintrag

Ein ACL-Eintrag, der nur für den entsprechenden Benutzer gilt.

Benutzername

Ein Name, der den Benutzer in der lokalen Zelle eindeutig kennzeichnet. Der Benutzername ist der AFS-Benutzer-ID des Benutzers zugeordnet.

A

Volume

Eine Gruppe zusammengehöriger Dateien und Verzeichnisse, die auf einer AFS-spezifischen Plattenpartition gespeichert sind.

Volume Location Server

Ein AFS-Server-Prozeß, mit dem die Verwaltung der Volume Location Database erfolgt. In der Volume Location Database werden für alle Volumes in der Zelle die Position des Volumes  und sonstige Informationen über den Status des Volumes gespeichert.


Hilfe
Informationen zur Hilfe

Zielgruppe und Funktion

Diese Online-Dokumentation wurde für die Benutzer von  AFS Light für Windows 95 und Windows 98 verfaßt. Bei der Zusammenstellung der enthaltenen Informationen wurde vorausgesetzt, daß Sie mit den Grundbegriffen und grundlegenden Konzepten des Betriebssystems Microsoft® Windows sowie der Windows-Anwendungen vertraut sind.

Die Dokumentation für die Online-Hilfefunktion beschreibt Funktionen, die in den Produkten AFS Light für Windows 95 und Windows 98 verfügbar sind.

Referenzliteratur

Die Releae Notes für AFS Light beinhalten wichtige Zusatzinformationen, die nicht in der Online-Hilfe enthalten sind.

Hinweis:	Weitere Informationen zu Windows 95 oder Windows  98 finden Sie in der Windows- Dokumentation.


Inhaltsverzeichnis der Hilfetexte
Inhalt

Übersicht

Informationen zu AFS?

AFS-Speicherungskonzepte

AFS-Sicherheitskonzepte

Informationen zu AFS Light

Informationen zur Hilfe

Erste Schritte

Übersicht

Ein AFS Light Gateway identifizieren

Den AFS-Dateibereich anhängen

Bei AFS authentifizieren

Authentifizierung prüfen

Von AFS  deauthentifizieren

AFS verwalten

Übersicht

Das AFS-Menü

Das Dienstprogramm AFS Light Configuration

Die AFS Light-Programmgruppe

Das AFS Light- Merkmalfenster

Befehle an der Eingabeaufforderung

AFS benutzen

Zugriffssteuerungslisten (ALCs)

Übersicht

Zugriffssteuerungslisten (ALCs)

Zugriffssteuerung auf Verzeichnisebene

Zugriffsberechtigungen

Zusätzliche Zugriffsberechtigungen

Normale und negative Einträge

Zugriffssteuerungslisten (ALCs) verwenden

Zugriffssteuerungslisten festlegen

Einträge zu Zugriffssteuerungslisten hinzufügen

Einträge aus Zugriffssteuerungslisten entfernen

Eine Zugriffssteuerungsliste kopieren

Volumes und Partitionen

Übersicht

Volume- und Partitionsinformationen anzeigen

Name/Volume-ID-Zuordnung aktualisieren

Mount-Punkte

Übersicht

Informationen zum Mount-Punkt anzeigen

Mount-Punkte entfernen

Mount-Punkte erstellen

Zwischengespeicherte Dateien

Übersicht

Dateien und Verzeichnisse leeren

Volumes leeren

Server-Informationen

Übersicht

Datei-Server anzeigen

Den Status von Datei-Servern anzeigen

Zellen

Zelleninformationen auflisten

Zellen anzeigen

Zellendatenbank

Übersicht

Zellen hinzufügen

Zelleninformationen ändern

Zellen entfernen

Referenz

Glossar

So...


So...

  Auf das Dienstprogramm AFS Light Configuration zugreifen

  Auf die AFS Light-Programmgruppe zugreifen

  Auf das AFS Light-Merkmalfenster zugreifen

  Auf das AFS-Menü zugreifen

  ACL-Einträge hinzufügen

  Neue Zellen zur Zellendatenbank hinzufügen

  Server zu einer Zelle hinzufügen

  Bei AFS authentifizieren

  Netzlaufwerke verbinden

  Zugriffssteuerungslisten (Access Control Lists; ACLs) kopieren

  Token löschen

  Netzlaufwerke trennen

  Das Symbol für AFS Light in der Task-Leiste anzeigen

  Mount-Punkte anzeigen

  Partitionsinformationen anzeigen

  Volume-Informationen anzeigen

  Dateien und Verzeichnisse leeren

  Volumes leeren

  Erste Schritte in AFS

  Ein AFS Light Gateway identifizieren

  AFS-Anmeldung in die Windows-Anmeldung integrieren

  Mount-Punkt erstellen

  Netzlaufwerke AFS zuordnen

  Token erhalten

  Mount-Punkte entfernen

  Zugriffssteuerungslisten festlegen

  Zellen anzeigen

  Datei-Server anzeigen

  Status von Datei-Servern anzeigen

  Deauthentifizieren

  Authentifizierung prüfen


So rufen Sie das Dienstprogramm AFS Light Configuration auf
Führen Sie die folgenden Schritte aus, um das Dienstprogramm AFS Light Configuration aufzurufen:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf  Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

Das Dienstprogramm AFS Light Configuration wird aufgerufen.


So rufen Sie die AFS Light-Programmgruppe auf
Führen Sie die folgenden Schritte aus, um die AFS Light-Programmgruppe aufzurufen:

1.	Suchen Sie im Menü Start die Programmgruppe IBM AFS (oder IBM WebSphere), und wählen Sie dann den Eintrag Lightaus.

Die AFS Light-Programmgruppe erscheint.


So rufen Sie das AFS Light-Merkmalfenster auf
Führen Sie die folgenden Schritte aus, um das AFS Light-Merkmalfenster zu öffnen:

1.	Rufen Sie das Symbol AFS Light in der Task-Leiste am unteren rechten Bildschirmrand auf.

a.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung .

b.	Doppelklicken Sie auf das Symbol AFS Light Configuration, um das Dienstprogramm AFS Light Configuration aufzurufen.

c.	Wählen Sie das Register Allgemein aus.

d.	Wählen Sie die Option Das Symbol für AFS Light in der Task-Leiste anzeigen.

e.	Klicken Sie auf OK.

Das Symbol für AFS Light erscheint sofort als kleines Vorhängeschloß in der Task-Leiste.

2.	Klicken Sie auf das Symbol AFS Light in der Task-Leiste.

Das AFS Light-Merkmalfenster wird geöffnet.


So rufen Sie das AFS-Menü auf
Führen Sie die folgenden Schritte durch, um das AFS-Menü aufzurufen:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer.

2.	Klicken Sie mit der rechten Maustaste auf eine beliebige Datei oder ein Verzeichnis im Dateibereich.

3.	Zeigen Sie auf AFS.

Das AFS-Menü wird angezeigt.


So aktivieren Sie die integrierte Anmeldung
Führen Sie die folgenden Schritte aus, um die integrierte Anmeldung zu aktivieren.

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration, um das Dienstprogramm AFS Light Configuration aufzurufen.

3.	Wählen Sie das Register Allgemein aus.

4.	Wählen Sie die Option AFS-Token beim Anmelden bei Windows erhalten.

5.	Klicken Sie auf OK.

Hinweis:	Diese Änderung wird erst nach dem Neustart Ihrer Maschine wirksam.


So fügen Sie eine Zelle zur Zellendatenbank hinzu
Führen Sie die folgenden Schritte aus, um eine Zelle zur Zellendatenbank hinzuzufügen:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register AFS-Zellen aus.

4.	Klicken Sie auf Hinzufügen.

Es erscheint das Dialogfenster Neue Zelle.

5.	Geben Sie im Feld AFS-Zelle den Namen der neuen AFS-Zelle ein.

6.	Geben Sie im Feld Beschreibung zur genaueren Bezeichnung der neuen Zelle eine Beschreibung ein.

7.	Sie müssen für jede neue Zelle einen oder mehrere Volume Location Server angeben. Klicken Sie auf den Knopf Hinzufügen, um Informationen zum Server hinzuzufügen.

Es erscheint das Dialogfenster Server hinzufügen .

8.	Geben Sie im Feld Server-Name den Namen eines Volume Location Servers in der neuen Zelle ein.

9.	Wählen Sie die Option Spezielle Adresse benutzen, und geben Sie die IP-Adresse des Servers ein, oder wählen Sie die Option Adresse automatisch suchen, wenn Windows die entsprechende Adresse eigenständig suchen soll.

10.	Klicken Sie auf OK

Der Name und die Adresse des Servers erscheinen jetzt im Feld Server im Dialogfenster Neue Zelle.

Wiederholen Sie für Zellen mit mehreren Volume Location Servern die Schritte 7-10.

11.	Klicken Sie auf OK, damit die Zelle zu der Liste der registrierten AFS-Zellen auf dem Register AFS-Zellen hinzugefügt wird.


So fügen Sie einen Server zu einer Zelle hinzu
Führen Sie die folgenden Schritte aus, um Server-Informationen zu einer Zelle hinzuzufügen:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf  Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register AFS-Zellen aus.

4.	Doppelklicken Sie auf die Zelle, zu der die Server-Informationen hinzugefügt werden sollen.

Es erscheint das Dialogfenster Zellenmerkmale.

5.	Klicken Sie auf Hinzufügen.

Es erscheint das Dialogfenster Server hinzufügen .

6.	Geben Sie im Feld Server-Name den Namen eines Volume Location Servers ein, der zu der angegebenen Zelle hinzugefügt werden soll.

7.	Wählen Sie die Option Spezielle Adresse benutzen aus und geben Sie eine IP-Adresse ein, oder wählen Sie die Option Adresse automatisch suchen, wenn Windows die entsprechende Adresse selbständig suchen soll.

8.	Klicken Sie auf OK.

Der Name und die Adresse des Servers erscheinen jetzt im Feld  Server im Dialogfenster Zellenmerkmale.

9.	Klicken Sie zum Schließen des Dialogfensters Zellenmerkmale auf OK.


So fügen Sie einen ACL-Eintrag hinzu
 Führen Sie die folgenden Schritte aus, um einen ACL-Eintrag hinzuzufügen:

Hinweis::	Damit Sie einen Eintrag zu einer Verzeichnis-ACL hinzufügen können, müssen Sie die Administer- Berechtigung für das Verzeichnis besitzen. Siehe AFS-Zugriffsberechtigungen.

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das  AFS-Verzeichnis,  zu dem ein ACL-Eintrag hinzugefügt werden soll.

3.	Zeigen Sie auf AFS. Das AFS-Menü wird angezeigt.

4.	Klicken Sie auf Zugriffssteuerungslisten.

Das Dialogfenster AFS-ACL festlegen wird geöffnet.

5.	Klicken Sie auf  Hinzufügen.

Das Dialogfenster ACL-Eintrag hinzufügen  erscheint.

6.	Geben Sie im Feld Name den Namen des Benutzers oder der Gruppe ein, der zur ACL hinzugefügt werden soll.

7.	Wählen Sie im Feld Eintragungsart die entsprechende Art der Eintragung aus. Ein normaler Eintrag erteilt einem Benutzer oder einer Gruppe die angegebenen Berechtigungen. Durch die Eingabe negativer Zahlen werden dem entsprechenden Benutzer oder der Gruppe die angegebenen Berechtigungen verwehrt.  Weitere Informationen siehe Normale  und negative Einträge.

Hinweis::	Normale und negative Berechtigungen müssen voneinander getrennt hinzugefügt werden.

8.	Wählen Sie im Fenster Berechtigungen alle  AFS-Zugriffsberechtigungen aus, die dem Verzeichnis erteilt (positive, d.h. normale Rechte) oder verwehrt (negative Rechte) werden sollen. Weitere Informationen siehe AFS-Zugriffsberechtigungen.

9.	Klicken Sie zum Schließen des Dialogfensters ACL-Eintrag hinzufügen auf OK.

Der hinzugefügte ACL-Eintrag erscheint jetzt je nach zugewiesenen Rechten in der Berechtigungsliste normal oder negativ im Dialogfenster AFS-ACL festlegen.


So authentifizieren Sie sich bei AFS
Führen Sie die folgenden Schritte, um sich bei AFS zu authentifizieren (Token zu erhalten):

1.	Rufen Sie das Register Token im AFS Light-Merkmalfenster wahlweise mit einer der folgenden Vorgehensweisen auf:

Suchen Sie im Menü Start die Programmgruppe IBM AFS (oder IBM WebSphere) und die Programmuntergruppe Light . Klicken Sie auf Authentifizierung.

Klicken Sie in der Task-Leiste auf das Symbol AFS Light, und wählen Sie das Register Token aus.Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Klicken Sie auf dem Register Token auf Neue Token erlangen.

Es erscheint das Dialogfenstere Neue AFS-Token erlangen.

3.	Geben Sie im Fenster AFS-Zelle den Namen der Zelle ein, bei der Sie sich authentifizieren wollen, oder bestätigen Sie einfach die Standardzelle, die identisch mit der lokalen Zelle ist.

4.	Geben Sie im Fenster Benutzername Ihren AFS-Benutzernamen ein.

5.	Geben Sie im Fenster Kennwort Ihr Kennwort ein. Das Kennwort wird nicht auf dem Bildschirm angezeigt.

6.	Klicken Sie auf OK, damit die Authentifizierung erfolgt. Das Register Token zeigtdie Informationen zum neuen Token an.  Weitere Informationen über die Angaben und Informationen, die auf dem RegisterToken angezeigt werden, siehe  Register Token .

Hinweis: 	Wenn Sie sich bei mehreren Zellen authentifizieren wollen, wiederholen Sie für jede Zelle die Schritte 2-6.


So verbinden Sie Netzlaufwerkzuordnungen
Führen Sie die folgenden Schritte aus, um Netzlaufwerkzuordnungen zu verbinden:

1.	Rufen Sie das Register Laufwerkbuchstaben folgendermaßen auf:

Aufrufen des Registers vom Dienstprogramm AFS Light Configuration:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken  Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie dasRegister Laufwerkbuchstaben aus.

Öffnen des Registers vom AFS Light-Merkmalfenster:

1.	Klicken Sie auf das Symbol AFS Light in der Task-Leiste. Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Wählen Sie das Register Laufwerkbuchstaben aus.

2.	Markieren Sie im Feld Laufwerkbuchstaben das Markierungsfeld neben dem Buchstaben für das Laufwerk, das mit dem AFS-Dateibereich verbunden werden soll.

3.	Klicken Sie auf OK.

Die Zuordnung ist jetzt verbunden, und der Laufwerkbuchstabe erscheint im Windows Explorer.


So kopieren Sie eine Zugriffssteuerungsliste (Access Control List; ACL)
Führen Sie die folgenden Schritte aus, um einen ACL-Eintrag in ein Zielverzeichnis zu kopieren:

Hinweis::	Um einen ACL-Eintrag kopieren zu können, müssen Sie über die  Lookup-Zugriffsberechtigung für das Quellenverzeichnis und die Zugriffsberechtigung Administer für das Zielverzeichnis verfügen. Siehe AFS-Zugriffsberechtigungen.

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das Verzeichnis (oder eine Datei in diesem Verzeichnis), dessen ACL Sie kopieren wollen.

3.	Wählen Sie im AFS-Menü die Option Zugriffssteuerungslisten aus. Das Dialogfenster AFS-ACL festlegen wird geöffnet.

4.	Wählen Sie den Befehl  Kopieren aus.

Es erscheint das Dialogfenster ACL kopieren mit dem Feld Kopieren von, in dem der Pfad des Quellenverzeichnisses angegeben ist.

5.	 Geben Sie im Feld Kopieren nach den Pfadnamen für das Zielverzeichnis ein.

6.	Markieren Sie das Markierungsfeld Aktuelle Einträge löschen, wenn vor dem Hinzufügen der Zugriffsberechtigungen alle vorhandenen ACL-Einträge aus dem Zielverzeichnis entfernt werden sollen.

7.	Klicken Sie auf OK, damit die ACL in das angegebene Verzeichnis kopiert wird.


So bestimmen Sie ein AFS Light Gateway
Führen Sie die folgenden Schritte aus, um ein AFS Light-Gateway zu bestimmen:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

Das Dienstprogramm AFS Light Configuration wird aufgerufen.

3.	Wählen Sie das Register Allgemein aus.

4.	Geben Sie im Feld Gateway den Namen einer Windows NT-Maschine ein, die als ein AFS Light-Gateway konfiguriert ist.

Hinweis:	AFS Light gehört zu derselben Zelle wie das ihm zugeordnete AFS Light Gateway. Der Name der lokalen Zelle  wird im Feld Zellenname angezeigt.

5.	Klicken Sie zum Schließen des Dienstprogramms AFS Light Configuration auf OK.


So trennen Sie eine Netzlaufwerkzuordnung
Führen Sie die folgenden Schritte aus, um Netzlaufwerkzuordnungen zu trennen:

1.	Rufen Sie das Register Laufwerkbuchstaben folgendermaßen auf:

Aufrufen des Registers vom Dienstprogramm AFS Light Configuration:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register Laufwerkbuchstaben aus.

Öffnen des Registers vom AFS Light-Merkmalfenster:

1.	Klicken Sie auf das Symbol AFS Light in der Task-Leiste. Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Wählen Sie das Register Laufwerkbuchstaben aus.

2.	Entfernen Sie im Feld Laufwerkbuchstaben die Markierung aus dem Markierungsfeld neben dem Buchstaben für das Laufwerk, das getrennt werden soll.

3.	Klicken Sie auf OK.

Die Zuordnung ist jetzt getrennt, und der Laufwerkbuchstabe wird nicht mehr im Windows Explorer angezeigt.


So zeigen Sie Mount-Punkt-Informationen an
Führen Sie die folgenden Schritte aus, um die Mount-Punkt-Informationen anzuzeigen:

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das Verzeichnis, für das Sie den Mount-Punkt anzeigen lassen wollen.

3.	Wählen Sie AFS, dann  Mount-Punkt und anschließend anzeigen.

Das Dialogfenster Mount-Punkt wird angezeigt. Dieses Dialogfenster enthält Angaben und Informationen über den Mount-Punkt des ausgewählten Verzeichnisses. Wenn es sich bei dem ausgewählten Verzeichnis nicht um einen Mount-Punkt handelt, dann wird die Nachricht

Verzeichnis ist kein Mount-Punkt

angezeigt, wobei  Verzeichnis für den Namen des ausgewählten Verzeichnisses steht.


So zeigen Sie Partitionsinformationen an
Führen Sie die folgenden Schritte aus, um Partitionsinformationen anzuzeigen:

 1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf die Datei oder das Verzeichnis, für das die  Partitionsinformationen angezeigt werden sollen.

3.	Klicken Sie auf AFS, dann Volume/Partition, und anschließend auf Merkmale.

Es erscheint das Dialogfenster Volume-Informationen. Dieses Dialogfenster enthält Angaben und Informationen über das Volume, das die ausgewählte Datei oder das ausgewählte Verzeichnis beinhaltet.

4.	Klicken Sie im Dialogfenster Volume-Informationen auf den Knopf Informationen zur Partition anzeigen.

Es erscheint das Dialogfenster Informationen zur Partition. Dieses Dialogfenster enthält Angaben und Informationen über die Partition, die die ausgewählte Datei oder das ausgewählte Verzeichnis beinhaltet.


So zeigen Sie das Symbol für AFS Light in der Task-Leiste an
Führen Sie die folgenden Schritte aus, um das Symbol für AFS Light in der Task-Leiste anzuzeigen:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf  Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration, um das Dienstprogramm AFS Light Configuration aufzurufen.

3.	Wählen Sie das Register Allgemein aus.

4.	Wählen Sie die Option Das Symbol für AFS Light in der Task-Leiste anzeigen.

5.	Klicken Sie auf OK.

Das Symbol AFS Light erscheint sofort als kleines Vorhängeschloß in der Task-Leiste.

Hinweis:	Das Symbol AFS Light erscheint jetzt jedes Mal automatisch in der Task-Leiste, wenn Sie AFS starten.


So zeigen Sie Volume-Informationen an
Führen Sie die folgenden Schritte aus, um Volume-Informationen anzuzeigen:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf die Datei oder das Verzeichnis, für das die Volume-Informationen angezeigt werden sollen.

3.	Klicken Sie auf AFS, dann Volume/Partition, und anschließend auf Merkmale.

Es erscheint das Dialogfenster Volume-Informationen. Dieses Dialogfenster enthält Angaben und Informationen über das Volume, das die ausgewählte Datei oder das ausgewählte Verzeichnis beinhaltet.


So leeren Sie Dateien oder Verzeichnisse
Führen Sie die folgenden Schritte aus, um Dateien oder Verzeichnisse zu leeren:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf eine zu aktualisierende AFS-Datei oder ein zu aktualisierendes AFS-Verzeichnis.

3.	Wählen Sie AFS und anschließend Datei/Verz leeren aus.

Wenn Ihr Anwendungsprogramm das nächste Mal Informationen der Datei anfordert, dann löscht AFS Light die gespeicherten Daten und greift auf den Datei-Server zu, um die aktuellste Dateiversion abzurufen.


So leeren Sie Volumes
Führen Sie die folgenden Schritte aus, um Volumes zu leeren:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf eine AFS-Datei oder ein AFS-Verzeichnis in einem Volume, das geleert werden soll.

3.	Klicken Sie auf AFS und anschließend auf Volume leeren.

Wenn Ihr Anwendungsprogramm das nächste Mal mehr Informationen von  einer Datei im angegebenen Volume anfordert, dann löscht AFS Light die gespeicherten Daten und greift auf Datei-Server zu, um die aktuellste Version abzurufen.


So führen Sie die ersten Schritte in AFS aus
Führen Sie die folgenden Schritte aus, wenn Sie erstmals in AFS arbeiten wollen:

1.	Legen Sie eine Windows NT-Maschine als Gateway zum AFS-Dateibereich fest. Siehe Ein AFS Light Gateway identifizieren.

2.	Verbinden Sie ein Laufwerk mit dem AFS-Dateibereich. Siehe AFS anhängen.

Sie können jetzt auf AFS zugreifen. Ihr Zugriff auf den AFS-Dateibereich ist jedoch massiv eingeschränkt. Damit Sie im AFS-Dateibereich sinnvoll und effizient arbeiten können, müssen Sie sich bei AFS authentifizieren.

3.	Legen Sie Ihre Identität in AFS fest. Siehe Bei AFS authentifizieren.


So erstellen Sie Mount-Punkte
Führen Sie die folgenden Schritte aus, um Mount-Punkte zu erstellen:

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf ein AFS-Verzeichnis.

3.	Wählen Sie AFS, dann Mount-Punkt und anschließend  Erstellen.

Das Dialogfenster Mount-Punkt erstellen wird angezeigt. Das Standardverzeichnis, d.h. das aktuelle Arbeitsverzeichnis, wird im Feld Verzeichnis angezeigt.

4.	Fügen Sie zum Pfadnamen im Feld Verzeichnis den Namen des als Mount-Punkt zu erstellenden Verzeichnisses hinzu oder ersetzen Sie den Standardpfadnamen im Feld Verzeichnis durch einen anderen.

Hinweis:	Das angegebene Verzeichnis darf noch nicht vorhanden sein.

5.	Geben Sie im Feld Volume den Namen des anzuhängenden Volumes ein. (Wahlweise können Sie auch eine Volume-ID-Nummer angeben.)

6.	Geben Sie im Feld Zelle den Namen der Zelle ein, in dem sich das Volume befindet.

7.	Wählen Sie im Optionsfenster Optionen entweder die Option  Regulär oder Read/Write als Mount-Typ  aus.

8.	Klicken Sie auf  OK, um den Mount-Punkt zu erstellen.

Das neu erstellte Verzeichnis dient jetzt für das von Ihnen angegebene Volume als Mount-Punkt.


So ordnen Sie Laufwerke zu AFS zu
Führen Sie die folgenden Schritte aus, um AFS Laufwerke zuzuordnen:

1.	Öffnen Sie das Dialogfenster Laufwerkbuchstabe zuordnen. Folgen Sie dazu den Anweisungen für einer der beiden im folgenden beschriebenen Methoden.

Aufrufen des Dialogfensters vom Dienstprogramm AFS Light Configuration:

1.	Wählen Sie im Menü Start das Menüelement  Einstellungen aus, und  klicken Sie anschließend auf  Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register Laufwerkbuchstaben aus.

4.	Klicken Sie auf den Knopf Hinzufügen. Es erscheint das Dialogfenster Laufwerkbuchstabe zuordnen.

Öffnen des Registers vom AFS Light-Merkmalfenster:

1.	Klicken Sie auf das Symbol AFS Light in der Task-Leiste. Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Wählen Sie das Register Laufwerkbuchstaben aus.

3.	Klicken Sie auf den Knopf Hinzufügen. Es erscheint das Dialogfenster Laufwerkbuchstabe zuordnen.

2.	Wählen Sie im Feld Laufwerkbuchstabe ein Netzlaufwerk aus, das nicht verwendet wird, oder bestätigen Sie den voreingestellten Wert.

3.	Geben Sie im Fenster AFS-Pfad einen Pfad zum AFS-Dateibereich ein.

4.	Geben Sie im Feld Beschreibung einen kurzen Namen ein, der dem angegebenen Laufwerkbuchstaben und dem entsprechenden AFS-Pfad zugeordnet werden soll.

Hinweis:	Eine mit einem Laufwerkbuchstaben verknüpfte Kurzbeschreibung kann eine maximale Länge von 12 Zeichen aufweisen und darf keine Leerzeichen oder Tabulatorschritte enthalten.

5.	Wählen Sie die Option Diese Zuordnung bei jeder Anmeldung wiederherstellen, wenn bei jedem Anmeldungsvorgang eine Verbindung zu den angegebenen AFS-Dateien hergestellt werden soll.

6.	Klicken Sie auf OK , damit die Verbindung eingerichtet wird.


So entfernen Sie einen Mount-Punkt
Führen Sie die folgenden Schritte aus, um einen Mount-Punkt zu entfernen:

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das Verzeichnis, dessen Mount-Punkt Sie entfernen wollen.

3.	Wählen Sie AFS, dann  Mount-Punkt und anschließend Entfernen.

AFS Light zeigt die folgende Nachricht an:

Sind Sie sicher, daß Sie den (die) ausgewählten Mount-Punkt(e) entfernen möchten?

4.	Klicken Sie auf Ja. Es erscheint das Dialogfenster Mount-Punkte entfernen mit dem Ergebnis.


So legen Sie eine Zugriffssteuerungsliste (Access Control List; ACL) fest
Führen Sie die folgenden Schritte aus, um eine ACL festzulegen:

Hinweis::	Um die ACL für ein Verzeichnis festlegen zu können, müssen Sie die Administer- Berechtigung für das Verzeichnis besitzen. Siehe AFS-Zugriffsberechtigungen.

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf  Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das AFS-Verzeichnis, für das die Zugriffsteuerungsliste (Access Control List; ACL) festgelegt werden soll.

3.	Zeigen Sie auf AFS. Das AFS-Menü wird angezeigt.

4.	Klicken Sie auf Zugriffssteuerungslisten.

Das Dialogfenster AFS-ACL festlegen wird geöffnet.

Jetzt können Sie Einträge hinzufügen, ACLs in andere Verzeichnisse kopieren, Einträge löschen und Ihre  ACLs bereinigen.


So zeigen Sie Datei-Server an
Führen Sie die folgenden Schritte aus, um Datei-Server anzuzeigen:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf die Datei oder das Verzeichnis, für das die  Server-Position angezeigt werden soll.

3.	Wählen Sie AFS und anschließend Datei-Server anzeigen aus.

Das Dialogfenster Datei-Server anzeigen erscheint. Dieses Dialogfenster zeigt den Namen  des Servers an, in dem sich die angegebene Datei bzw. das angegebene Verzeichnis befindet.


So zeigen Sie Zellen an
Führen Sie die folgenden Schritte aus, um Zellen anzuzeigen:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf die Dateien oder Verzeichnisse, deren Zellen Sie ansehen wollen.

3.	Wählen Sie AFS und anschließend  Zellen anzeigen.

Es erscheint das Dialogfenster Zellen anzeigen mit einer Auflistung der AFS-Zellen, in denen sich die ausgewählten Dateien und Verzeichnisse befinden.


So zeigen Sie den Status von Datei-Servern an
Führen Sie die folgenden Schritte aus, um den Status von Datei-Servern anzuzeigen:

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf  Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf eine AFS-Datei oder ein AFS-Verzeichnis.

3.	Wählen Sie AFS und anschließend Server-Status anzeigen.

Es erscheint das Dialogfenster Server-Status anzeigen.

4.	Wählen Sie die Gruppe der Datei-Server, für die Sie einen Statusbericht anzeigen wollen. Standardeinstellung ist Ihre lokale Zelle .

5.	Wählen Sie die Option Testen Sie Server nicht, wenn Datei-Server-Informationen angezeigt werden sollen, ohne daß  Ihre Client-Maschine die Liste aktualisiert. Deaktivieren Sie die Option Testen Sie Server nicht, wenn die Liste aktualisiert werden soll.

6.	Klicken Sie auf Status anzeigen.

Wenn innerhalb der angegebenen Zelle oder Zellen ein oder mehrere Datei-Server nicht verfügbar sind, dann erscheint das Dialogfenster Inaktive Server mit einer Auflistung der Datei-Server, die zum aktuellen Zeitpunkt nicht zur Verfügung stehen. Ansonsten wird ein Dialogfenster mit der Information angezeigt, daß alle Server aktiv sind.


So deauthentifizieren Sie sich
Führen Sie die folgenden Schritte aus, um sich von AFS zu deauthentifizieren (Token zu löschen):

1.	Rufen Sie das Register Token im AFS Light-Merkmalfenster wahlweise mit einer der folgenden Vorgehensweisen auf:

Suchen Sie im Menü Start die Programmgruppe IBM AFS (oder IBM WebSphere) und die Programmuntergruppe Light . Klicken Sie auf Authentifizierung.

Klicken Sie in der Task-Leiste auf das Symbol AFS Light, und wählen Sie das RegisterTokenaus.Weitere Informationen siehe Anzeigen des AFS Light-Symbols .

2.	Wenn Sie in mehr als einer Zelle über Token verfügen, wählen Sie das Register mit dem Namen der Zelle aus, von der Sie sich deauthentifizieren wollen.

3.	Klicken Sie auf den Knopf Diese Token löschen.

Hinweis:	Sie können Sie immer nur von einer Zelle deauthentifizieren. Wenn Sie für mehr als eine Zelle Token besitzen, wiederholen Sie nacheinander für jede Zelle die Schritte 2 und 3.


So prüfen Sie die Authentifizierung
Führen Sie die folgenden Schritte durch, um die Authentifizierung zu prüfen:

1.	Öffnen Sie das Register Token im AFS Light-Merkmalfenster wahlweise mit einer der folgenden Vorgehensweisen:

Suchen Sie im Menü Start die Programmgruppe IBM AFS (oder IBM WebSphere) und die Programmuntergruppe Light . Klicken Sie auf Authentifizierung.

Klicken Sie in der Task-Leiste auf das Symbol AFS Light, und wählen Sie das Register Token aus.Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

Auf dem Register Token im AFS Light-Merkmalfenster werden Informationen zu den Token angezeigt.

Wenn Sie für mehr als eine Zelle über Token verfügen, erscheint auf dem Register anstelle des Wortes Token der Name der Zelle. Wenn Sie beispielsweise Token für die Zellen abc.com und xyz.com  besitzen, dann weisen die beiden ersten Register im AFS Light-Merkmalfenster die Bezeichnung abc.com und xyz.com auf. Diese Register treten an die Stelle des Registers Token. Sie enthalten dieselben Angaben und Informationen wie das Register Token.

Wenn Sie zum aktuellen Zeitpunkt in keiner AFS-Zelle über Token verfügen, dann enthält das Register Token keinerlei Token-Informationen. Siehe Register Token (keine Token).


Ein AFS Light Gateway identifizieren

Sie müssen eine Windows NT-Maschine, die als AFS Client konfiguriert ist, als Gateway zum AFS-Dateibereich festlegen, bevor Sie AFS Light für den Zugriff auf  AFS-Dateien und Verzeichnisse benutzen können.

Kennzeichnen Sie die Gateway-Maschine mit ihrem NetBIOS-Servicenamen. Verwenden Sie dazu die Namensstruktur mach-afs, wobei   mach stellvertretend für den Namen des Host-Computers steht. Dieser darf eine maximale Länge von 11 Zeichen aufweisen. AFS Light muß diesen Service-Namen auflösen können, damit die Kommunikation mit der Gateway-Maschine möglich ist. Die Namensauflösung ist gewährleistet, wenn Sie den  NetBIOS-Service-Namen des Gateways zur Datei LMHOSTS des Clients oder den entsprechenden DNS- bzw. WINS-Servern hinzufügen. Wenn sich die AFS Light-Maschine und ihre AFS Light Gateway-Maschine auf dem selben Teilnetz befinden, dann wird die Namensauflösung automatisch über eine NetBIOS-Übertragung erfolgreich durchgeführt.

Führen Sie die folgenden Schritte aus, um ein AFS Light-Gateway festzulegen:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

Das Dienstprogramm AFS Light Configuration wird aufgerufen.

3.	Wählen Sie das Register Allgemein aus.

4.	Geben Sie im Feld Gateway den  Namen einer Windows NT-Maschine ein, die als AFS Light Gatewaykonfiguriert ist.

Hinweis:	AFS Light gehört zu derselben Zelle wie das ihm zugeordnete AFS Light Gateway. Der Name der lokalen Zelle wird im Feld Zellenname  angezeigt.  Die angegebene Zelle muß in Ihrer Zellendatenbank registriert sein. Benutzen Sie zum Erfassen von Informationen zu der Zelle in Ihrer Zellendatenbank gegebenenfalls das Register AFS-Zellen . Wenden Sie sich an den zuständigen Systemadministrator, um zellenspezifische Informationen zu erhalten.

5.	Klicken Sie zum Schließen des Dienstprogramms AFS Light Configuration auf OK.

Zugehörige Abschnitte:

Erste Schritte in AFS


Integrierte Anmeldung

Bei der integrierten Anmeldung können Sie sich mit nur einem Schritt gleichzeitig bei Windows und bei AFS anmelden. Um den Vorteil der integrierten Anmeldung nutzen zu können, müssen Ihre ID und Ihr Kennwort für AFS und für Windows identisch sein. Geben Sie, wenn Sie sich bei Windows anmelden, die entsprechende ID und das Kennwort ein. Sie sind dann bei Windows angemeldet und besitzen ein AFS-Token für die lokale Zelle Ihrer Client-Maschine. Damit ist keine weitere  Authentifizierung mehr erforderlich.

Beachten Sie, daß Sie trotz integrierter AFS- Anmeldung  gegenüber der lokalen Windows-Maschine  definiert sein müssen. Die AFS-Authentifizierung wird von den Microsoft-Anmeldungsroutinen aufgerufen. Wenn Sie nicht bei der  lokalen Windows-Maschinedefiniert sind, dann wird die Anmeldung abgewiesen, und es erfolgt keine AFS-Authentifizierung.

Wenn Ihr AFS-Kennwort und Ihr Windows-Kennwort nicht identisch sind, können Sie sich zwar bei Windows anmelden, aber zeigt ein Dialogfenster mit der Nachricht an, daß die AFS-Authentifizierung nicht erfolgreich durchgeführt wurde. Sie können dann auf dem Register Token im AFS Light-Merkmalfenster ein AFS-Token erhalten.

Führen Sie die folgenden Schritte aus, um die integrierte Anmeldung zu aktivieren:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration, um das Dienstprogramm AFS Light Configuration aufzurufen.

3.	Wählen Sie das Register Allgemein aus.

4.	Wählen Sie die Option AFS-Token beim Anmelden bei Windows erhalten.

5.	Klicken Sie auf OK.

Hinweis:	Diese Änderung wird erst nach dem Neustart Ihrer Maschine wirksam.

Zugehörige Abschnitte:

Bei AFS authentifizieren


Befehle an der Eingabeaufforderung ausgeben

Verwenden Sie auf Ihrer Windows 95 oder Windows 98-Maschine zum Erteilen von Befehlen an der Eingabeaufforderung das Fenster Eingabeaufforderung. Die DOS-Eingabeaufforderung ist die Befehlszeilenschnittstelle bei Windows-Systemen.

Führen Sie die folgenden Schritte aus, um Befehle an der Eingabeaufforderung zu erteilen:

1.	Wählen Sie im Menü Start das Menüelement Programme aus, und klicken Sie anschließend auf Eingabeaufforderung.

2. 	Geben Sie im Fenster Eingabeaufforderung den entsprechenden Befehl ein.

Zugehörige Abschnitte:

Befehle an der Eingabeaufforderung


Datei-Server-Informationen auflisten

Sie können die folgenden Datei-Server--Informationen abrufen:

Die aktuelle Datei-Server-Maschine, auf der die ausgewählte Datei oder das ausgewählte Verzeichnis gespeichert ist.

Diese Informationen werden angezeigt , wenn Sie die Option Datei-Server anzeigen im AFS-Menü auswählen.

Weitere Informationen siehe Datei-Server anzeigen.

Der Status von Datei-Server-Maschinen in Ihrer  lokalen Zelle, einer angegebenen Zelle oder in allen Zellen.

Diese Informationen werden angezeigt, wenn Sie die Option Server-Status anzeigen im AFS-Menü auswählen.

Weitere Informationen siehe Den Status von Datei-Servern anzeigen.

Zugehörige Abschnitte:

AFS-Dateispeicherungskonzepte


Dialogfenster Mount-Punkt erstellen

Das Dialogfenster Mount-Punkt erstellen enthält die folgenden Angaben:

  Verzeichnis

  Volume

  Zelle

  Optionen

Zugehörige Abschnitte:

Mount-Punkte erstellen

Mount-Punkte

Dateispeicherungskonzepte


Dialogfenster Mount-Punkt erstellen - Feld Zelle
Zelle

Gibt den Namen der  Zelle an, in dem sich das Volume befindet.


Dialogfenster Mount-Punkt erstellen - Feld Verzeichnis
Verzeichnis

Gibt den Namen des Verzeichnisses an, das als Mount-Punkt für das Volume wie im Feld Volume bezeichnet erstellt werden soll.

Hinweis:	Es ist nicht  möglich, aus der Basis eines bereits vorhandenen Verzeichnis ein Mount-Verzeichnis zu erstellen.


Dialogfenster Mount-Punkt erstellen - Feld Optionen
Optionen (Regulär oder Read/Write)

Gibt den Typ des zu erstellenden Mount-Punktes an.

Reguläre Mount-Punkte weisen die Client-Maschine an, auf Daten von Volumes desselben Typs wie dem Volume zuzugreifen, in dem sich der Mount-Punkt befindet. Wenn Sie beispielsweise einen Mount-Punkt von einem Read Only-Volume erstellen, dann sucht AFS Light beim Zugriff auf diesen Mount-Punkt nach Daten von Read Only- Volumes.

Ein Read/Write-Mount-Punkt sucht immer nach Daten von einem Read/Write-Volume.


Dialogfenster Mount-Punkt erstellen - Feld Volume
Volume

Gibt den Namen oder die ID des Volumes an, das angehängt werden soll.


Mount-Punkte erstellen

AFS Light ermöglicht Ihnen, Mount-Punkte zu erstellen.

Hinweis:	Um einen Mount-Punkt zu erstellen, müssen Sie die Insert- und die Administer- Zugriffsberechtigungen für das Verzeichnis besitzen, das den Mount-Punkt enthalten soll. Weitere Informationen siehe Zugriffsberechtigungen.

Führen Sie die folgenden Schritte aus, um Mount-Punkte zu erstellen:

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf ein AFS-Verzeichnis.

3.	Wählen Sie AFS, dann Mount-Punkt  und anschließend Erstellen.

Das Dialogfenster Mount-Punkt erstellen wird angezeigt. Das Standardverzeichnis, d.h. das aktuelle Arbeitsverzeichnis, wird im Feld Verzeichnis angezeigt.

4.	Fügen Sie zum Pfadnamen im Feld Verzeichnis den Namen des als Mount-Punkt zu erstellenden Verzeichnisses hinzu oder ersetzen Sie den Standardpfadnamen im Feld Verzeichnis durch einen anderen.

Hinweis:	Das angegebene Verzeichnis darf noch nicht vorhanden sein.

5.	Geben Sie im Feld Volume den Namen des anzuhängenden Volumes ein. (Wahlweise können Sie auch eine Volume-ID-Nummer angeben.)

6.	Geben Sie im Feld Zelle den Namen der Zelle ein, in dem sich das Volume befindet.

7.	Wählen Sie im Optionsfenster Optionen entweder die Option  Regulär oder Read/Write als Mount-Typ aus.

8.	Klicken Sie auf OK, um den Mount-Punkt zu erstellen.

Das neu erstellte Verzeichnis dient jetzt für das von Ihnen angegebene Volume als Mount-Punkt.

Zugehörige Abschnitte:

Mount-Punkte

Dateispeicherungskonzepte


AFS verwalten

Nachdem Sie AFS Light konfiguriert haben (siehe Erste Schritte), können Sie AFS mit demAFS-Menü, dem Dienstprogramm AFS Light Configuration, der AFS Light-Programmgruppe und dem AFS Light-Merkmalfenster direkt auf dem Desktop verwalten. Die Methode, mit der Sie auf AFS zugreifen, hängt davon ab, welche Vorgänge Sie durchführen wollen.

Hinweis:	Wenn Sie sich nicht bei AFS authentifizieren, ist Ihr Zugriff auf den AFS-Dateibereich massiv eingeschränkt. Um sinnvoll und effizient arbeiten zu können, müssen Sie Ihre Identität in AFS festlegen. Weitere Informationen siehe Bei AFS authentifizieren .

Führen Sie die folgenden Schritte durch, um das AFS-Menü aufzurufen:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer.

2.	Klicken Sie mit der rechten Maustaste auf eine beliebige Datei oder ein Verzeichnis im Dateibereich.

3.	Zeigen Sie auf AFS.

Das AFS-Menü wird angezeigt.

Führen Sie die folgenden Schritte aus, um das Dienstprogramm AFS Light Configuration aufzurufen:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

Das Dienstprogramm AFS Light Configuration wird aufgerufen.

Führen Sie die folgenden Schritte aus, um die AFS Light-Programmgruppe aufzurufen:

1.	Suchen Sie im Menü Start die Programmgruppe IBM AFS (oder IBM WebSphere), und wählen Sie dann den Eintrag Light aus.

Die AFS Light-Programmgruppe erscheint.

Führen Sie die folgenden Schritte aus, um das AFS Light-Merkmalfenster zu öffnen:

1.	Rufen Sie das Symbol AFS Light in der Task-Leiste am unteren rechten Bildschirmrand auf.

a.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung .

b.	Doppelklicken Sie auf das Symbol AFS Light Configuration, um das Dienstprogramm AFS Light Configuration aufzurufen.

c.	Wählen Sie das Register Allgemein aus.

d.	Wählen Sie die Option Das Symbol für AFS Light in der Task-Leiste anzeigen.

e.	Klicken Sie auf OK.

Das Symbol für AFS Light erscheint sofort als kleines Vorhängeschloß in der Task-Leiste.

2.	Klicken Sie auf das Symbol AFS Light in der Task-Leiste.

Das AFS Light-Merkmalfenster wird geöffnet.

Zugehörige Abschnitte:

Erste Schritte in AFS

Befehle an der Eingabeaufforderung


Dialogfenster Laufwerkbuchstabe zuordnen

In diesem Dialogfenster können Sie  eine Zuordnung zwischen einem Buchstaben für ein Laufwerk auf Ihrer Windows-Maschine und einer bestimmten Position im AFS-Dateibereich durchführen. Um auf in AFS gespeicherte Dateien zugreifen zu können, müssen Sie mindestens einen Laufwerkbuchstaben einem Pfad im AFS-Dateibereich zuordnen.

Der Zugriff auf das Dialogfenster erfolgt entweder über das Dienstprogramm AFS Light Configuration oder das AFS Light-Merkmalfenster.

  Laufwerkbuchstabe

  AFS-Pfad

  Beschreibung

  Diese Zuordnung bei jeder Anmeldung wiederherstellen

Zugehörige Abschnitte:

Den AFS-Dateibereich anhängen

Laufwerke AFS zuordnen


Dialogfenster Laufwerkbuchstabe zuordnen - Feld AFS-Pfad
AFS-Pfad

Gibt den  Pfad zur gewünschten Position im AFS-Dateibereich an.


Dialogfenster Laufwerkbuchstabe zuordnen - Feld Beschreibung
Beschreibung

Ermöglicht Ihnen, dem Laufwerkbuchstaben und dem AFS-Pfad einen Kurznamen zuzuordnen.

Dieser Kurzname ist hilfreich, wenn Sie mehrere Netzlaufwerke mit einer Position im AFS-Dateibereich verbinden.

 Hinweis:	Eine mit einem Laufwerkbuchstaben verknüpfte Kurzbeschreibung kann eine maximale Länge von 12 Zeichen aufweisen und darf keine Leerzeichen oder Tabulatorschritte enthalten.


Dialogfenster Laufwerkbuchstabe zuordnen - Feld Laufwerkbuchstabe
 Laufwerkbuchstabe

Ermöglicht Ihnen, einen Laufwerkbuchstaben auszuwählen. Der Laufwerkbuchstabe kennzeichnet das Laufwerk auf Ihrer Windows- Maschine, das dem AFS-Dateibereich zugeordnet wird.


Dialogfenster Laufwerkbuchstabe zuordnen - Markierungsfeld Diese Zuordnung wiederherstellen
Diese Zuordnung bei jeder Anmeldung wiederherstellen

Markieren Sie dieses Markierungsfeld, wenn bei jeder Anmeldung die Verbindung zur angegebenen Position im AFS-Dateibereich hergestellt werden soll.


Dialogfenster Laufwerkbuchstabe zuordnen

In diesem Dialogfenster können Sie eine Zuordnung zwischen einem Buchstaben für ein Laufwerk auf Ihrer Windows-Maschine und dem AFS-Dateibereich festlegen. Um auf in AFS gespeicherte Dateien zugreifen zu können, müssen Sie mindestens einen Laufwerkbuchstaben einem Pfad im AFS-Dateibereich zuordnen.

Der Zugriff auf das Dialogfenster erfolgt entweder über das Dienstprogramm AFS Light Configuration oder das AFS Light-Merkmalfenster.

  Laufwerkbuchstabe

  AFS-Pfad

  Beschreibung

  Diese Zuordnung bei jeder Anmeldung wiederherstellen

Zugehörige Abschnitte:

Laufwerke AFS zuordnen


Laufwerke AFS zuordnen

Um auf in AFS gespeicherte Dateien zugreifen zu können, müssen Sie mindestens einen Laufwerkbuchstaben einem Pfad im AFS-Dateibereich zuordnen.

Führen Sie die folgenden Schritte aus, um AFS Laufwerke zuzuordnen:

1.	Öffnen Sie das Dialogfenster Laufwerkbuchstabe zuordnen. Folgen Sie dazu den Anweisungen für einer der beiden im folgenden beschriebenen Methoden.

Aufrufen des Dialogfensters vom Dienstprogramm AFS Light Configuration:

1.	Wählen Sie im Menü Start das Menüelement  Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register Laufwerkbuchstaben aus.

4.	Klicken Sie auf den Knopf Hinzufügen. Es erscheint das Dialogfenster Laufwerkbuchstabe zuordnen.

Öffnen des Dialogfensters vom AFS Light-Merkmalfenster:

1.	Klicken Sie auf das Symbol AFS Light in der Task-Leiste. Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Wählen Sie das Register Laufwerkbuchstaben.

3.	Klicken Sie auf den Knopf Hinzufügen. Es erscheint das Dialogfenster Laufwerkbuchstabe zuordnen.

2.	Wählen Sie im Feld Laufwerkbuchstabe ein Netzlaufwerk aus, das nicht verwendet wird, oder bestätigen Sie den voreingestellten Wert.

3.	Geben Sie im Fenster AFS-Pfad einen Pfad zum AFS-Dateibereich ein.

4.	Geben Sie im Feld Beschreibung einen kurzen Namen ein, der dem angegebenen Laufwerkbuchstaben und dem entsprechenden AFS-Pfad zugeordnet werden soll.

Hinweis:	Eine mit einem Laufwerkbuchstaben verknüpfte Kurzbeschreibung kann eine maximale Länge von 12 Zeichen aufweisen und darf keine Leerzeichen oder Tabulatorschritte enthalten.

5.	Wählen Sie Diese Zuordnung bei jeder Anmeldung wiederherstellen , wenn bei jedem  Anmeldungsvorgang die Verbindung zur angegebenen Position im AFS-Dateibereich wieder hergestellt werden soll.

6.	Klicken Sie auf OK , damit die Verbindung eingerichtet wird.

Der Laufwerkbuchstabe und der AFS-Pfad werden auf dem Register Laufwerkbuchstabe angezeigt. Der Laufwerkbuchstabe und die zugehörige Beschreibung erscheinen im Windows Explorer. (Beachten Sie, daß als Folge der Zuordnung eines Laufwerks zum AFS-Dateibereich ein sogenannter Submount, d.h. ein gemeinsam benutztes Netzwerk erstellt wird. Von AFS Light erstellte gemeinsam benutzte Netzwerke werden nicht auf der AFS Light-Maschine gespeichert. Anstatt dessen werden die Submount-Informationen auf der AFS Light Gateway-Maschine gespeichert.)

Zugehörige Abschnitte:

Den AFS-Dateibereich anhängen

Netzlaufwerkzuordnungen verbinden und trennen

Netzlaufwerkzuordnungen ändern

Netzlaufwerkzuordnungen löschen


Befehl Mount-Punkt
Der Befehl Mount-Punkt

Der Zugriff auf den Befehl Mount Point erfolgt vom AFS-Menü. Er umfaßt drei Optionen:

Anzeigen

Bei dieser Option werden Informationen zum Mount-Punkt angezeigt. Wenn Sie diese Option wählen, dann erscheint das Dialogfenster Mount-Punkt.

Weitere Informationen siehe Mount-Punkte anzeigen.

Entfernen

Diese Option ermöglicht Ihnen, Mount-Punkte zu entfernen.

Weitere Informatioen siehe Mount-Punkte entfernen.

Erstellen

Mit dieser Option können Sie Mount-Punkte erstellen. Wenn Sie diese Option wählen, dann erscheint das Dialogfenster Mount-Punkt erstellen .

Weitere Informationen siehe Mount-Punkte erstellen.

Zugehörige Abschnitte:

AFS-Dateispeicherungskonzepte

Mount-Punkte


Dialogfenster Mount-Punkt

Das Dialogfenster Mount-Punkt enthält die folgenden Angaben:

  Datei

  Volume

  Zelle

  Typ

Wenn es sich bei dem ausgewählten Verzeichnis nicht um einen Mount-Punkt handelt, dann wird die Nachricht

Verzeichnis ist kein Mount-Punkt

angezeigt, wobei Verzeichnis für den Namen des ausgewählten Verzeichnisses steht.

Zugehörige Abschnitte:

AFS-Dateispeicherungskonzepte

Mount-Punkte

Informationen zum Mount-Punkt anzeigen


Dialogfenster Mount-Punkt - Feld Zelle
Zelle

Gibt den Namen der  Zelle an, in dem sich das angehängte Volume befindet.


Dialogfenster Mount-Punkt - Feld Datei
Datei

Gibt den Namen des Verzeichnisses an, das als Mount-Punkt dient.


Dialogfenster Mount-Punkt - Feld Typ
Typ

Gibt den Typ des Mount-Punktes an (regulär oder Read/Write).

Reguläre Mount-Punkte weisen die Client-Maschine an, auf Daten von Volumes desselben Typs wie dem Volume zuzugreifen, in dem sich der Mount-Punkt befindet. Wenn Sie beispielsweise einen Mount-Punkt von einem Read Only-Volume erstellen, dann sucht AFS Light beim Zugriff auf diesen Mount-Punkt nach Daten von Read Only-Volumes.

Read/Write-Mount-Punkte suchen immer nach Daten von Read/Write-Volumes.


Dialogfenster Mount-Punkt - Feld Volume
Volume

Gibt den Namen des Volumes an, auf das der angegebene Mount-Punkt verweist.


Übersicht über Mount-Punkte
Mount-Punkt

Der Zugriff auf ein Volume erfolgt über den Mount-Punkt. Ein Mount-Punkt ist eine besondere Verbindungsart zwischen einer Verzeichnisposition im Dateibaum und dem Volumen, das die Elemente in diesem Verzeichnis beherbergt.  Im Dateibaum sieht ein AFS-Verzeichnis wie ein reguläres Verzeichnis aus. Wenn Sie in ein anderes Verzeichnis wechseln, kann es sein, daß Sie einen Mount-Punkt überqueren, ohne es zu bemerken. Wenn Sie einen Mount-Punkt überqueren, wechseln Sie von einem Volume zu einem anderen, gegebenenfalls auch von einem Datei-Server und einer Partition zu einem anderen Server und einer anderen Partition.  Dieser Übergang ist transparent, da AFS die Mount-Punkte interpretiert und die angeforderten Dateien und Verzeichnisse von der entsprechenden Position abruft. Daher ist es nicht erforderlich, die jeweiligen Volume-, Partitions- und Datei-Server-Positionen zu kennen.

AFS Light ermöglicht Ihnen, Mount-Punkte anzuzeigen, zu entfernen und zu erstellen.

Der Zugriff auf den Befehl  Mount-Punkt erfolgt vom AFS-Menü. Die Option Mount-Punkt im AFS-Menüumfaßt drei Optionen:

Anzeigen

Bei dieser Option werden Mount-Punkt-Informationen zu einem ausgewählten Verzeichnis angezeigt.

Weitere Informationen siehe  Mount-Punkt-Informationen anzeigen.

Entfernen

Mit dieser Option können Sie ein ausgewähltes Verzeichnis, das als Mount-Punkt dient, löschen.

Hinweis:	Nur Systemadministratoren sind autorisiert, Mount-Punkte zu entfernen.

Weitere Informatioen siehe Mount-Punkte entfernen.

Erstellen

Mit dieser Option können Sie einen Mount-Punkt erstellen.

Hinweis:	Nur Systemadministratoren sind autorisiert, Mount-Punkte zu erstellen.

Weitere Informationen siehe Mount-Punkte erstellen.

Zugehörige Abschnitte:

Dateispeicherungskonzepte


Den AFS-Dateibereich anhängen

Um auf in AFS gespeicherte Dateien zugreifen zu können, müssen Sie mindestens  einen Laufwerkbuchstaben einem Pfad im AFS-Dateibereich zuordnen.

Damit Sie einfacher auf in AFS gespeicherte Dateien, die Sie häufig verwenden, zugreifen können, ist es möglich, ein Laufwerk direkt einer spezifischen Position im AFS-Dateibereich  zuzuordnen, ohne daß ein Verzeichniswechsel vom AFS-Root erforderlich ist.

Wenn Sie beispielsweise häufig mit Dateien im Verzeichnis /afs/acme.com/usr/chris arbeiten, können Sie das Laufwerk Q direkt diesem Teil des AFS-Dateibereichs zuordnen. Die in AFS unter /afs/acme.com/usr/chris/ verfügbaren Dateien werden dann im Verzeichnis  Q:\ Ihres Rechners angezeigt.

Die Zuordnung eines Laufwerkes zum AFS-Dateibereich hat folgendes zur Folge:

Eine Zuordnung zwischen einem Netzlaufwerk und einem AFS-Pfad

Eine Netzwerkverbindung zum angegebenen Pfad im AFS-Dateibereich

Zugehörige Abschnitte:

Laufwerke AFS zuordnen

Netzlaufwerke verbinden und trennen


Dialogfenster Neue Zelle

Dieses Dialogfenster erscheint, wenn Sie im  Dienstprogramm AFS Light Configuration auf dem Register AFS-Zellen auf den Knopf Hinzufügen klicken. In diesem Dialogfenster können Sie neue Zellen  zur Zellendatenbank von AFS Light hinzufügen und AFS Anweisungen erteilen, wie diese Zellen kontaktiert werden sollen. Die einer Zelle zugeordneten Angaben und Informationen müssen in der Zellendatenbank enthalten sein, bevor Benutzer der Maschine auf Dateien und Verzeichnisse dieser Zelle zugreifen können.

Sie müssen für jede neue Zelle einen oder mehrere Volume Location Server  angeben.

Im Dialogfenster Neue Zelle können Sie Informationen und Angaben eingeben, die festlegen, wie AFS eine neue Zelle kontaktieren soll.

  AFS-Zelle

  Beschreibung

  Server

Im Dialogfenster Neue Zelle können  Sie Server-Informationen zu einer Zelle hinzufügen, die einer Zelle zugeordneten Server-Informationen ändern und Server-Informationen aus einer Zelle durch Löschen entfernen.

  Hinzufügen

  Ändern

  Entfernen

Zugehörige Abschnitte:

Zellen zur Zellendatenbank hinzufügen


Dialogfenster Neue Zelle - Feld AFS-Zelle
AFS-Zelle

Gibt den Namen der  Zelle an, die in der Zellendatenbank registriert wird.


Dialogfenster Neue Zelle - Knopf Hinzufügen
Hinzufügen

Ruft das Dialogfenster Server hinzufügen auf. In diesem Dialogfenster können Sie den Namen und die IP-Adresse eines Servers  zur ausgewählten Zelle hinzufügen.

Weitere Informationen siehe Server-Informationen zu Zellen hinzufügen.


Dialogfenster Neue Zelle - Knopf Ändern
Ändern

Ruft das Dialogfenster Server editieren auf, in dem Sie den Namen und die IP-Adresse eines ausgewählten Volume Location Servers in der Liste Server bearbeiten können.

Siehe Server-Informtionen ändern .


Dialogfenster Neue Zelle - Feld Beschreibung
Beschreibung

Eine Kurzbeschreibung zur genaueren Kennzeichnung der Zelle.


Dialogfenster Neue Zelle - Knopf Entfernen
Entfernen

Entfernt einen ausgewählten Server-Eintrag aus der  List der Server.

Siehe Server-Informationen aus einer Zelle entfernen.


Dialogfenster Neue Zelle - Feld Server
Server

Zeigt den Namen und die IP-Adressen für die Volume Location Server der angegebenen Zelle an.


Normale und negative Einträge

Sie können einem Benutzer oder einer Gruppe jede beliebige  Kombination von AFS-Zugriffsberechtigungen erteilen oder verweigern.

Wenn Sie einen normalen Eintrag erstellen, erteilen Sie einem Benutzer oder einer Gruppe das Recht, bestimmte Aktionen auszuführen.

Wenn Sie einen negativen Eintrag erstellen, der auf der Eingabe negativer Zahlen basiert, dann verweigern Sie einem Benutzer oder einer Gruppe das Recht, die angegebene Aktion auszuführen.

Wenn Sie beispielsweise allen Mitgliedern einer Gruppe mit Ausnahme eines Benutzers die  Read-Berechtigung erteilen wollen, dann müssen Sie die Gruppe in die Liste Normale Einträge aufnehmen und den Benutzer gesondert in die Liste Negative Einträge aufnehmen. Diesem einzelnen Benutzer wird dann die Read-Berechtigung verwehrt, da ein Eintrag auf der der Liste der Negativen Einträge alle Zugriffsrechte außer Kraft setzt, die ein Benutzer in einer Liste der Art Normale Einträge erhalten hat.

Hinweis:	Benutzer, die in der Liste Negative Einträge aufgeführt sind, können trotzdem Berechtigungen erhalten, die nicht erwünscht sind, falls der systemdefinierten Gruppe system:anyuser auf der Liste der normalen Einträge Zugriffsberechtigungen erteilt worden sind. Alle Benutzer einschließlich nicht authentifizierter AFS-Benutzer, die Zugriff auf Ihre Zelle erlangen können, sind Mitglieder der Gruppe system:anyuser. Jeder beliebige Benutzer, der in der Liste Negative Einträge enthalten ist, kann sich deauthentifizieren und die Zugriffsberechtigungen der Gruppe system:anyuser nutzen.

Zugehörige Abschnitte:

Eine Übersicht über Zugriffssteuerungslisten

Zugriffsberechtigungen

Zugriffssteuerungslisten festlegen


Dialogfenster Neue AFS-Token erhalten

Wenn Sie auf den KnopfNeue Token erhalten auf dem Register Token klicken, dann wird das Dialogfenster Neue AFS-Token erhalten angezeigt. In diesem Dialogfenster können Sie sich bei AFS authentifizieren, indem Sie ein Token für die angegebene AFS-Zelle erhalten.

  AFS-Zelle

  Benutzername

  Kennwort

Zugehörige Abschnitte:

Bei AFS authentifizieren


Dialogfenster Neue AFS-Token erhalten - Feld AFS-Zelle
AFS-Zelle

Gibt die AFS-Zelle an, bei der Sie sich authentifizieren.


Dialogfenster Neue AFS-Token erhalten - Feld Kennwort
Kennwort

Gibt Ihr AFS-Kennwortan.


Dialogfenster Neue AFS-Token erhalten - Feld Benutzername
Benutzername

Gibt Ihren AFS-Benutzernamenan.


Sonstige variable Berechtigungen

Es stehen zusätzliche AFS-Zugriffsberechtigungen, die mit den Großbuchstaben A bis H gekennzeichnet werden, zur Verwendung in denACLs zur Verfügung. Standardmäßig ist diesen Buchstaben kein Standardwert zugeordnet, und sie werden von denAFS-Serverprozessen ignoriert. Diesen Variablen kann eine besondere Bedeutung vom zuständigen AFS-Systemadministrator zugewiesen werden. Wenn Sie auf einer ACL auf derartige Berechtigungen stoßen, erkundigen Sie sich beim Systemadministrator über die ihnen zugeordnete Bedeutung.

Hinweis:	Der BefehlZugriffssteuerungslisten im AFS-Menüunterstützt diese zusätzlichen variablen Berechtigungen  nicht. Zum Anzeigen oder Ändern dieser Berechtigungen müssen Sie den Befehl fs listacl oder fs setacl in einem Fenster mit Eingabeaufforderung verwenden. Weitere Informationen siehe Befehle an der Eingabeaufforderung.

Zugehörige Abschnitte:

AFS-Zugriffsberechtigungen

Eine Übersicht über Zugriffssteuerungslisten


Dialogfenster Informationen zur Partition

Das Dialogfenster Informationen zur Partition enthält Angaben und Informationen zur Partition,in dem sich die ausgewählte Datei oder das Verzeichnis befindet. Der Zugriff auf dieses Dialogfenster erfolgt über das Dialogfenster Volume-Informationen.

Hinweis:	Nur Systemadministrator sind autorisiert, Partitionsmerkmale zu ändern.

Das Dialogfenster Informationen zur Partition enthält die folgenden Angaben:

  Größe insgesamt

  Blöcke frei

  % verwendet

Zugehörige Abschnitte:

Dateispeicherungskonzepte

Volumes und Partitionen


Dialogfenster Informationen zur Partition - Feld % verwendet
% verwendet

Gibt den Prozentsatz der Plattenpartition an, der zum aktuellen Zeitpunkt ausgelastet ist.


Dialogfenster Informationen zur Partition - Feld Blöcke frei
Blöcke frei

Gibt die Anzahl der1-KB-Blöcke an, die auf dieser Partition noch verfügbar sind.


Dialogfenster Informationen zur Partition - Feld Größe insgesamt
Größe insgesamt

Gibt die Größe der Partition, in der sich die ausgewählte Datei oder das Verzeichnis befindet,in 1-KB-Blöcken an.


Name/Volume-ID-Zuordnungen aktualisieren

Wenn Sie vom AFS-Dateibereich Dateien anfordern, greift AFS Light auf eine Zuordnungstabelle zu, die Volume-Namen den entsprechenden Volume-ID-Nummern zuordnet, und erhält dann auf der Grundlage der inder Zuordnungstabelle gespeicherten Informationen Dateien von Volumes. Die Volume-Informationen ändern sich gelegentlich. AFS verfügt über ein Verfahren zur Aktualisierung der Zuordnungen von Volumen-Namen und Volume-ID-Nummern. Dadurch wird sichergestellt, daß Sie auf das Volume mit den aktuellsten Informationen zugreifen, die auf dem Datei-Server verfügbar sind.

Hinweis:	DieZuordnungstabelle wird stündlich automatisch gelöscht und durch die aktualisierte Version ersetzt. Wenn Sie jedoch wissen, daß sich der Name eines Volumes geändert hat oder eine Freigabe von Read Only-Replikaten erfolgt ist, wird AFS Light bei der Aktualisierung der Zuordnungstabellegezwungen, das Volume mit dem aktuellsten Namen bzw. dem aktuellsten Read Only-Replikat zu referieren.

Führen Sie die folgenden Schritte aus, umVolume-Name//Volume-ID-Zuordnungen zu aktualisieren:

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Exploreraus.

2.	Klicken Sie mit der rechten Maustaste auf eine AFS-Datei oder ein Verzeichnis.

3.	Wählen Sie die Option AFS, dann Volume/Partitionaus, und klicken Sie anschließend  aufName/ID-Zuordnung aktualisieren.

AFS Light zeigt die folgende Nachricht an:

Alle Volume-ID/Name-Zuordnungen überprüft.

Zugehörige Abschnitte:

Dateispeicherungskonzepte

Volumes und Partitionen


Dialogfenster Mount-Punkte entfernen

Das Dialogfenster Mount-Punkte entfernen zeigt die Namen des Mount-Punktes und das Ergebnis der Operation an.

Wurde die Operation erfolgreich durchgeführt, erscheint die folgende Nachricht:

Erfolgreich gelöscht.

Schlägt die Operation fehl (weil z.B. das ausgewählte Verzeichnis kein Mount-Punkt ist), dann wird eine entsprechende Nachricht angezeigt.

Hinweis:	Um einen Mount-Punkt entfernen zu können, müssen Sie die Delete-Zugriffsberechtigung für das Verzeichnis besitzen, das den Mount-Punkt enthält. Weitere Informationen siehe Zugriffsberechtigungen.

Zugehörige Abschnitte:

Dateispeicherungskonzepte

Mount-Punkte entfernen

Mount-Punkte


ALC-Einträge entfernen

Es ist möglich, Einträge aus der Zugriffssteuerungsliste (Access Control List; ACL)  eines Verzeichnisses zu entfernen. Die erforderlichen Prozeduren zum Entfernen von Benutzereinträgen und von Gruppeneinträgen sind identisch.

Führen Sie die folgenden Schritte aus, um ACL-Einträge zu entfernen:

Hinweis::	Damit Sieeinen Eintragvon der ACL eines Verzeichnisses entfernen können, müssen Sie die  Administer-Berechtigung für das Verzeichnis besitzen. Siehe AFS-Zugriffsberechtigungen.

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das AFS-Verzeichnis, aus dessen ACL Sie einen Eintrag entfernen wollen.

3.	Zeigen Sie auf AFS. Das AFS-Menü wird angezeigt.

4.	Klicken Sie auf Zugriffssteuerungslisten.

Das Dialogfenster AFS-ACL festlegen wird geöffnet.

5.	Wählen Sie in der Liste Normal beziehungsweise Negativ den zu entfernenden Eintrag aus.

6.	Klicken Sie auf Entfernen.

7.	Klicken Sie zum Schließen des Dialogfensters AFS-ACL festlegen aufOK.

Zugehörige Abschnitte:

Eine Übersicht über Zugriffssteuerungslisten

ACL-Einträge hinzufügen

ACLs kopieren


Mount-Punkte entfernen

Es ist möglich,einen vorhandenen Mount-Punkt zu entfernen.

Hinweis:	Um einen Mount-Punkt entfernen zu können, müssen Sie die Delete- Zugriffsberechtigung für das Verzeichnis besitzen, das den Mount-Punkt enthält. Weitere Informationen siehe Zugriffsberechtigungen.

Führen Sie die folgenden Schritte aus, um einen Mount-Punkt zu entfernen:

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das Verzeichnis, dessen Mount-Punkt Sie entfernen wollen.

3.	Wählen Sie AFS, dann Mount-Punkt und anschließend Entfernen.

AFS Light zeigt die folgende Nachricht an:

Sind Sie sicher, daß Sie den (die) ausgewählten Mount-Punkt(e) entfernen möchten?

4.	Klicken Sie auf Ja. Es erscheint das Dialogfenster Mount-Punkte entfernen mit dem Ergebnis.

Zugehörige Abschnitte:

Mount-Punkte

Dateispeicherungskonzepte


Netzlaufwerkszuordnungen entfernen
Netzlaufwerkzuordnungen entfernen

Es ist möglich,Netzlaufwerkzuordnungen zu löschen.

Führen Sie die folgenden Schritte aus, um Netzlaufwerkzuordnungen zu entfernen:

Hinweis:	Ein Netzlaufwerk, das gerade benutzt wird, kann nicht gelöscht werden.

1.	Rufen Sie das Register Laufwerkbuchstaben folgendermaßen auf:

Aufrufen des Registers vom Dienstprogramm AFS Light Configuration:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf Systemsteuerung.

2.	Doppelklicken  Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das RegisterLaufwerkbuchstaben aus.

Aufrufen des Registers vom AFS Light-Merkmalfenster:

1.	Klicken Sie auf das Symbol AFS Light in der Task-Leiste. Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Wählen Sie das Register Laufwerkbuchstaben.

2.	Wählen Sie im Feld Laufwerkbuchstaben die Zuordnung aus, die gelöscht werden soll.

3.	Klicken Sie auf den Knopf Entfernen.

4.	Klicken Sie auf OK.

Die Zuordnung wird aus dem Feld LaufwDas Netzlaufwerk wird außerdem getrennt und aus dem Windows Explorer entfernt.

Zugehörige Abschnitte:

Netzlaufwerke AFS zuordnen

Netzlaufwerkzuordnungändern


Server aus einer Zelle entfernen
Server-Informationen aus einer Zelle entfernen

Es ist möglich, einen Server-Eintrag aus einer registrierten Zelle zu entfernen.

Hinweis:	Für jede Zelle, die in der Zellendatenbank von AFS Light aufgeführt ist, muß AFS Light mindestens ein Volume Location Server in dieser Zelle bekannt sein.

Führen Sie die folgenden Schritte aus,um Server-Informationen aus einer Zelle zu entfernen:

1.	Wählen Sie im Menü Start das Menüelement Einstellungen aus, und klicken Sie anschließend auf  Systemsteuerung.

2.	Doppelklicken Sie auf das Symbol AFS Light Configuration.

3.	Wählen Sie das Register AFS-Zellen aus.

4.	Wählen Sie die Zelle aus, aus der Sie einen Server-Eintrag entfernen wollen, und klicken Sie auf Ändern.

Es erscheint das Dialogfenster Zellenmerkmale.

5.	Wählen Sie in der Liste Server den zu entfernenden Server-Eintrag aus, und klicken Sie dann auf Entfernen.

6.	Klicken Sie auf OK.

Zugehörige Abschnitte:

Zelleninformationen ändern

Server-Informationen zu einer Zelle hinzufügen


DialogfensterServer-Status

Benutzen Sie dieses Dialogfenster zum Aktualisieren und Anzeigen von Informationen aus der Liste der Datei-Server-Maschinen von AFS Light. Das Dialogfenster Server-Status enthält die folgenden Optionen:

  Zelle

  Lokale Zelle

  Angegebene Zelle:

  Alle Zellen

  Testen Sie Server nicht

  Status anzeigen

Zugehörige Abschnitte:

Status von File Servern anzeigen


Dialogfenster Server-Status - Option Alle Zellen
Alle Zellen

Zeigt den Status von File Servern in allen Zellen an, die von Ihrer Client-Maschine kontaktiert werden.


Dialogfenster Server-Status - Feld Zelle
Zelle

Gibt die Zelle oder die Zellen an, deren File Server-Status angezeigt werden soll. Es kann sich dabei um lokale, angegebene oder alle Zellen handeln.


Dialogfenster Server-Status - Testen Sie Server nicht
Testen Sie Server nicht

Zwingt AFS Light, die Informationen ohne Aktualisierung derFile Server-Liste anzuzeigen.


Dialogfenster Server-Status - Option Lokale Zelle
Lokale Zelle

Zeigt den Status von Datei-Servern in derlokalen Zelle cellan.


Dialogfenster Server-Status - Knopf Status anzeigen
Status anzeigen

Zeigt den Status von Datei-Servern entsprechend der im Dialogfenster ausgewählten Optionen an.

Wenn innerhalb der angegebenen Zellen ein oder mehrere Datei-Server nicht verfügbar sind, dann erscheint das Dialogfenster Inaktive Server mit einer Auflistung der Datei-Server, die zum aktuellen Zeitpunkt nicht zur Verfügung stehen. Ansonsten wird ein Dialogfenster mit der Information angezeigt, daß alle Server aktiv sind.


Dialogfenster Server-Status - Option Angegebene Zelle
Angegebene Zelle:

Zeigt den Status von Datei-Servern in der von Ihnen angegebenen Zelle an.


Dialogfenster ACL festlegen - Knopf Hinzufügen
 Hinzufügen

Fügt auf der ACL eines Verzeichnisses einen Benutzer- oder Gruppeneintrag zur Liste Normale Einträge oder Negative  Einträge hinzu.

Weitere Informationen sieheACL-Einträge hinzufügen.


Dialogfenster ACL festlegen - Knopf Bereinigen
Bereinigen

Entfernt alleACL-Einträge, die einen Benutzer oder eine Gruppe bezeichnen, der bzw. die nicht mehr in der Protection-Datenbank der ACL eines angegebenenVerzeichnisses enthalten ist.

Hinweis:	Die Protection-Datenbank enthält Daten, die für den Zugriffsschutz der Dateien und Verzeichnisse im AFS-Dateibereich erforderlich ist. Wenn Benutzer oder Gruppen aus der Protection-Datenbank entfernt werden, erscheinen eher die entsprechenden AFS-UIDs auf den Zugriffssteuerungslisten (ACLs) als die Namen. Durch Aufräumen einer ACL werden derartige überflüssige AFS-UIDs, die nicht mehr aktuell sind, aus den ACLs entfernt.


Dialogfenster ACL festlegen - Knopf Kopieren
Kopieren

Kopiert die ACL von einem ausgewählten Verzeichnis zu einem oder mehreren Zielverzeichnissen.

Weitere Informationen siehe ACLs kopieren.


Dialogfenster ACL festlegen - Feld Verzeichnis
Verzeichnis

Gibt den Pfad und den Namen des Verzeichnisses an, dessen ACL angezeigt wird und änderungsfähig ist.


Dialogfenster ACL festlegen - Feld Negativ
Negativ

Zeigt die Namen der Benutzer und Gruppen mit den entsprechenden negativen Zugriffsberechtigungen an.  Negative Berechtigungen verwehren den jeweiligen Benutzern und Gruppen die angegebenen Berechtigungen.

Weitere Informationen siehe Normale und negative Einträge.


Dialogfenster ACL festlegen - Feld Normal
Normal

Zeigt die Namen der Benutzer und Gruppen mit den entsprechenden normalen Zugriffsberechtigungen an. Normale Berechtigungen erteilen den jeweiligen Benutzern und Gruppen die angegebenen Berechtigungen.

Weitere Informationen siehe Normale und negative Einträge.


Dialogfenster ACL festlegen - Feld Berechtigungen
 Berechtigungen

Eine Reihe von Markierungsfeldern, mit denen Sie AFS-Zugriffsberechtigungen festlegen können.

r 	Mit einer Read-Berechtigung können Benutzer den Inhalt der in einem Verzeichnis enthaltenen Dateien lesen.

l 	Mit einer Lookup-Berechtigung können Benutzer auf Dateien oder Verzeichnisse zugreifen. Wenn ein Benutzer keine Lookup-Berechtigung erhält, dann werden auch keine sonstigen Berechtigungen erteilt.

i	Mit einer Insert-Berechtigung kann ein Benutzer neue Unterverzeichnisse erstellen und neue Dateien zu einem Verzeichnis hinzufügen, indem er entweder neue Dateien erstellt oder bereits vorhandene kopiert.

d	Mit einer Delete-Berechtigung kann ein Benutzer Dateien und Unterverzeichnisse aus einem Verzeichnis entfernen.

w	Mit einer Write-Berechtigung kann ein Benutzer den Inhalt der Dateien in einem Verzeichnis ändern.

k	Mit einer Lock-Berechtigung kann ein Benutzer Programme ausführen, die Sperrverhinderungen für Dateien in einem Verzeichnisanlegen.

a	Mit einer Administer-Berechtigung kann ein Benutzer dieACL für ein Verzeichnis ändern. Benutzer besitzen die Administer-Berechtigung für ihr Ausgangsverzeichnis und die in ihm enthaltenen Unterverzeichnisse.


Dialogfenster ACL festlegen - Knopf Entfernen
Entfernen

Entfernt einen oder mehrere Benutzer- oder Gruppeneinträge aus der ACL.

Weitere Informationen siehe ACL-Einträge entfernen.


Dialogfenster AFS-ACL festlegen
Das Dialogfenster AFS-ACL festlegen

Das Dialogfenster AFS-ACL festlegen zeigt die folgenden Informationen an:

  Verzeichnis

  Normale Einträge

  Negative Einträge

Im Dialogfenster AFS-ACL festlegen kann der Benutzer neue Einträge zu einer Zugriffssteuerungsliste (Access Control List; ACL) hinzufügen, Einträge aus einer Liste löschen, ACLs von anderen Verzeichnissen kopieren sowie ACLs bereinigen beziehungsweise aktualisieren.

  Berechtigungen

  Hinzufügen

  Entfernen

  Bereinigen

  Kopieren

Zugehörige Abschnitte:

ACL-Einträge hinzufügen

ACLs kopieren

ACL-Einträge entfernen

Übersicht über Zugriffssteuerungslisten


Zugriffssteuerungslisten festlegen

Verwenden Sie das Dialogfenster AFS-ACL festlegen, um Zugriffssteuerungslisten festzulegen. Das Dialogfenster AFS-ACL festlegen wird geöffnet, wenn Sie die Option  Zugriffssteuerungslisten im AFS-Menü wählen. In diesem Dialogfenster können Sie ACL-Einträge für ein AFS-Verzeichnis hinzufügen, ändern und entfernen. Die Festlegung einer ACL  erfolgt durch Erteilung oder Verweigerung einer beliebigen Kombination von AFS-Zugriffsberechtigungen.

Führen Sie die folgenden Schritte aus, um eine Zugriffssteuerungsliste (Access Control List; ACL) festzulegen:

Hinweis::	Um die ACL für ein Verzeichnis festlegen zu können, müssen Sie die Administer- Berechtigung für das Verzeichnis besitzen. Siehe AFS-Zugriffsberechtigungen.

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf das AFS-Verzeichnis, für das die Zugriffsteuerungsliste (Access Control List; ACL) festgelegt werden soll.

3.	Zeigen Sie auf AFS. Das AFS-Menü wird angezeigt.

4.	Klicken Sie auf Zugriffssteuerungslisten.

Das Dialogfenster AFS-ACL festlegen wird geöffnet.

Jetzt können Sie Einträge hinzufügen, ACLs in andere Verzeichnisse kopieren, Einträge löschen und Ihre  ACLs bereinigen.

Zugehörige Abschnitte:

ACL-Einträge hinzufügen

ACLs kopieren

Übersicht über Zugriffssteuerungslisten


Befehl Zellen anzeigen
Der Befehl Zellen anzeigen

Dieser Befehl im AFS-Menü zeigt das Dialogfenster Zellen anzeigen an. Es werden die AFS-Zellen aufgeführt, in denen sich die ausgewählten Dateien und Verzeichnisse befinden.

Hinweis:	Die Zelle ist die Verwaltungsdomäne im AFS-Dateibereich. Aus Hardware-Sicht handelt es sich bei einer Zelle um eine Gruppierung von Client- und Server-Maschinen mit gemeinsamer Verwaltung. Der Administrator der Zelle bestimmt, wie Client-Maschinen konfiguriert werden und wieviel Speicherplatz jedem Benutzer auf der Datei-Server-Maschine zur Verfügung steht.

Zugehörige Abschnitte:

Zellen anzeigen

Dateispeicherungskonzepte


Dialogfenster Zellen anzeigen
Das Dialogfenster Zellen anzeigen

Das Dialogfenster Zellen anzeigen gibt jeweils die AFS-Zellean, in der sich die ausgewählte Datei bzw. das ausgewählte Verzeichnis befindet.

  Datei/Verzeichnis

  Zelle

Zugehörige Abschnitte:

 Zellen anzeigen

AFS-Dateispeicherungskonzepte


Dialogfenster Zellen anzeigen - Feld Zelle
 Zelle

Name der Zelle, in dem sich die ausgewählte Datei oder das ausgewählte Verzeichnis befindet.


Dialogfenster Zellen anzeigen - Feld Datei/Verzeichnis
Datei/Verzeichnis

Name der Datei oder des Verzeichnisses, für die bzw. das dieser Zellenname angegeben ist.


Befehl Datei-Server anzeigen
Der Befehl Datei-Server anzeigen

Dieser Befehl im AFS-Menü zeigt das Dialogfenster Datei-Server anzeigen an. Es wird der Name einer angegebenen Datei oder eines Verzeichnisses sowieder Name des File Servers angezeigt, in dem die Datei oder das Verzeichnis enthalten ist.

Normalerweise ist es nicht erforderlich, zu wissen, auf welcher  Datei-Server-Maschine sich eine bestimmte Datei oder ein Verzeichnis befindet. Wenn der Pfadname zu einer Datei angegeben wird, greift die Client-Maschine automatisch auf die Server-Maschine zu. Gelegentlich ist es jedoch nützlich, die Position einer Datei oder eines Verzeichnisses zu kennen. Wenn zum Beispiel ein Datei-Server mit einer Datei, an der Sie arbeiten, als Folge von Hardwarefehlern, Softwarestörungen oder Routinewartungsläufen plötzlich nicht mehr verfügbar ist, dann können Sie die Datei so lange nichtspeichern, bis der Server wieder voll betriebsfähig ist. Der zuständige Systemadministrator kann Volumes, die bestimmte Dateien enthalten, auf verschiedene Datei-Server-Maschinen verschieben. Es ist sinnvoll, gelegentlich die Speicherposition der Dateien und Verzeichnisse zu prüfen, die Sie häufig verwenden.

Zugehörige Abschnitte:

Datei-Server anzeigen

AFS-Dateispeicherungskonzepte


Dialogfenster Datei-Server anzeigen
Das Dialogfenster Datei-Server anzeigen

Dieses Dialogfenster enthält die folgenden Angaben:

  Datei/Verzeichnis

  Datei-Server

Zugehörige Abschnitte:

Datei-Server anzeigen

Status von Datei-Server anzeigen


Dialogfenster Datei-Server anzeigen - Feld Datei-Server
Datei-Server

Zeigt die aktuelle Datei-Server-Maschine an, auf der die ausgewählte Datei oder das ausgewählte Verzeichnis gespeichert ist.

Hinweis::	Wenn mehr als ein Datei-Server aufgeführt wird,  handelt es sich bei dem  Volume, das die ausgewählte Datei oder das Verzeichnis enthält, um ein Replikat, das als solches an jeder der aufgeführten Positionen vorhanden ist. Im allgemeinen werden Dateien, die häufig verwendet, nicht aber geändert werden, oft repliziert, so daß sie immer noch auf anderen Datei-Servern zur Verfügung stehen, selbst wenn ein Server, der diese Datieen enthält, inaktivwird.


Dialogfenster Datei-Server anzeigen - Feld Datei/Verzeichnis
Datei/Verzeichnis

Name der Datei oder des Verzeichnisses, für die bzw. für das die Server-Positionangezeigt wird.


Befehl Server-Status anzeigen
Der Befehl Server-Status anzeigen

Dieser Befehl imAFS-Menü aktualisiert  Informationen aus der Auflistung der  Datei-Server-Maschinen von AFS Light und zeigt sie an. Der Befehle Server-Status anzeigen öffnet dasDialogfenster Server-Status.

Ihre Client-Maschine verwaltet ständig eine Liste der Datei-Server-Maschinen, diesie kontaktiert hat oder zu einem späteren Zeitpunkt eventuell kontaktieren muß. Die Liste wird alle drei Minuten aktualisiert, indem der File Server-Prozeß auf jeder Server-Maschine in der Liste getestet wird.  Wenn ein Prozeß nicht auf den Test reagiert, wird die Datei-Server-Maschine als nicht funktionierend verzeichnet. Wenn eine Maschine, die zu einem früheren Zeitpunkt bei einem solchen Test nicht reagiert hat, wieder antwortet, dann wird die Markierung nichtfunktionierend entfernt.

Zugehörige Abschnitte:

Status von File Servern anzeigen

AFS-Dateispeicherungskonzepte


Zellen anzeigen

AFS ermöglicht Ihnen, die AFS-Zellen aufzulisten, in denen sich ausgewählte Dateien und Verzeichnisse befinden.

Führen Sie die folgenden Schritte aus, um Zellen anzuzeigen:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf die Dateien oder Verzeichnisse, deren Zellen Sie ansehen wollen.

3.	Wählen Sie AFS und anschließend Zellen anzeigen.

Es erscheint das Dialogfenster Zellen anzeigen mit einer Auflistung der AFS-Zellen , in denen sich die ausgewälten Dateien und Verzeichnisse befinden.

Zugehörige Abschnitte:

Datei-Server anzeigen

Status von Datei-Servern anzeigen

AFS-Dateispeicherungskonzepte


Datei-Server anzeigen

Sie können die Position von Dateien und Verzeichnissen, mit denen Sie häufig arbeiten, festlegen.

Normalerweise ist es nicht erforderlich, zu wissen, auf welcher Datei-Server-Maschine sich eine bestimmte Datei oder ein Verzeichnis befindet. Wenn der Pfadname zu einer Datei angegeben wird, greift die Client-Maschine automatisch auf die Server-Maschine zu.

Gelegentlich ist es jedoch nützlich, die Position einer Datei oder eines Verzeichnisses zu kennen. Wenn zum Beispiel ein Datei-Server mit einer Datei, an der Sie arbeiten, als Folge von Hardwarefehlern, Softwarestörungen oder Routinewartungsläufen plötzlich nicht mehr verfügbar ist, dann können Sie die Datei so lange nicht speichern, bis der Server wieder voll betriebsfähig ist.

Führen Sie die folgenden Schritte aus, um Datei-Server anzuzeigen:

1.	Rufen Sie im Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie anschließend das Menüelement Windows Explorer aus.

2.	Klicken Sie mit der rechten  Maustaste auf die Datei oder das Verzeichnis, für das die Server-Position angezeigt werden soll .

3.	Wählen Sie AFS und anschließend Datei-Server anzeigen aus.

Das Dialogfenster Datei-Server anzeigen erscheint. Dieses Dialogfenster zeigt den Namen  des Servers an, in dem sich die angegebene Datei bzw. das angegebene Verzeichnis befindet.

Zugehörige Abschnitte:

Status von Datei-Servern anzeigen


Status von Datei-Servern anzeigen

Wenn Sie die Option Server-Status anzeigen im AFS-Menü auswählen, werden die inaktiven Server, falls überhaupt vorhanden, angezeigt.

Eine Datei-Server-Maschine in ihrer Zelle kann aufgrund von Harewarefehlern, Softwarestörungen oder Routinewartungsläufen nicht verfügbar sein. In diesemFall können Sie erst wieder auf Dateien zugreifen, die auf dem Datei-Server gespeichert sind, oder Änderungen speichern, die Sie an auf dem  Datei-Server gespeicherten Dateien vorgenommen haben, wenn die Maschine wieder betriebsbereit und aktiv ist. Sie können jedoch an Ihren Dateien arbeiten, wenn Kopien der entsprechenden Dateien auf AFS Light lokalgespeichert sind.

Ihre Client-Maschine verwaltet ständig eine Liste der Datei-Server-Maschinen, die sie kontaktiert hat oder zu einem späteren Zeitpunkt eventuell kontaktieren muß. Die Liste wird alle 30 Sekunden aktualisiert, indem der File Server-Prozeß auf jeder Maschine in der Liste getestet wird.  Wenn ein Prozeß nicht auf den Test reagiert, wird der Datei-Server als nicht funktionierend verzeichnet. Wenn eine Maschine, die zu einem früheren Zeitpunkt bei einem solchen Test nicht reagiert hat, wieder antwortet, dann wird die Markierung nichtfunktionierend entfernt.

Führen Sie die folgenden Schritte aus, um den Status von Datei-Servern anzuzeigen:

1.	Rufen Sie vom Menü Start den Windows Explorer auf. Klicken Sie dazu auf Programme, und wählen Sie Windows Explorer aus.

2.	Klicken Sie mit der rechten Maustaste auf eine AFS-Datei oder ein AFS-Verzeichnis.

3.	Wählen Sie AFS und anschließend  Server-Status anzeigen.

Es erscheint das Dialogfenster Server-Status anzeigen.

4.	Wählen Sie die Gruppe der Datei-Server, für die Sie einen Statusbericht anzeigen wollen. Standardeinstellung ist Ihre lokale Zelle .

5.	Wählen Sie die Option Testen Sie Server nicht, wenn Datei-Server-Informationen angezeigt werden sollen, ohne daß  Ihre Client-Maschine die Angaben aktualisiert. Deaktivieren Sie die Option Testen Sie Server nicht, wenn die Liste aktualisiert werden soll.

6.	Klicken Sie auf Status anzeigen.

Wenn innerhalb der angegebenen Zelle oder Zellen ein oder mehrere Datei-Server nicht verfügbar sind, dann erscheint das Dialogfenster Inaktive Server mit einer Auflistung der Datei-Server, die zum aktuellen Zeitpunkt nicht zur Verfügung stehen. Ansonsten wird ein Dialogfenster mit der Information angezeigt, daß alle Server aktiv sind.

Zugehörige Abschnitte:

Datei-Server anzeigen


Register Token

Das RegisterToken enthält die folgenden Angaben:

  Zelle

  Token

Mit dem Register Token können Sie sich bei AFS authentifizieren und  von AFS deauthentifizieren.

  Neue Token erhalten

  Diese Token löschen

Hinweis:	Wenn Sie zum aktuellen Zeitpunkt in keiner AFS-Zelle über Token verfügen, dann enthält das Register Token gegebenenfalls nur manche  der aufgeführten Felder. Siehe Register Token (keine Token).

Wenn Sie für mehr als eine Zelle über Token verfügen, erscheint auf dem Register anstelle des Wortes Token der Name der Zelle. Wenn Sie beispielsweise Token für die Zellen abc.comund xyz.com  besitzen, dann weisen die beiden ersten Register im AFS Light-Merkmalfenster die Bezeichnung abc.com und xyz.com auf. Diese Register treten an die Stelle des Registers  Token und enthalten die selben Angaben und Informationen wie oben für das Register Token erläutert.

Zugehörige Abschnitte:

Bei AFS authentifizieren

Von AFS deauthentifizieren


Register Token (keine Token)
Das Register Token (keine Token)

Wenn Sie keinerlei Token für AFS-Zellen besitzen, dann tritt dieses Register an die Stelle des üblichen Registers Token und gibt so an, daß Sie zum aktuellen Zeitpunkt kein authentifizierter AFS-Benutzer sind.

Das Register Token enthält die folgenden Angaben:

Sie verfügen in keiner AFS-Zelle über Token

Authentifizieren Sie sich mit dem RegisterToken bei AFS:

  Neue Token erhalten

Zugehörige Abschnitte:

Bei AFS authentifizieren


Register Token - Feld Zelle
Zelle

Gibt den Namen der Zelle an, in der der Benutzer über ein Token verfügt, sowie den Namen der Windows NT-Maschine, die als Gateway zum AFS-Dateibereich dient.


Register Token - Knopf Diese Token löschen
Diese Token löschen

Sie können sich von AFS deauthentifizieren. Nachdem Ihre Token gelöscht worden sind, können Sie nicht mehr als vollwertiger AFS-Benutzer auf AFS-Dateien zugreifen.


Register Token - Knopf Neue Token erhalten
Neue Token erhalten

Sie können sich bei AFS authentifizieren und gelten dann als zulässiger AFS-Benutzer.


Register Token - Feld Token
Token

Zeigt den AFS-Benutzernamen des Benutzers an, der ein von AFS Light ausgegebenes Token erhalten hat, sowie das Ablaufdatum des Token.

Hinweis:	Einem Token ist eine bestimmte Lebensdauer zugeordnet, die nach einer festgelegten Zeitspanne erschöpft ist. Danach verfällt das Token. Die Standardlebensdauer für Token beträgt 25 Stunden.


Register Token - Feld Benutzername
Benutzername

Zeigt den Benutzernamen des Benutzers an, der zum aktuellen Zeitpunkt beim System angemeldet ist. Die Information wird folgendermaßen angezeigt:

Aktuelle Anmeldung beim Windows-Netzwerk als ”Benutzername”


Von AFS deauthentifizieren
Von AFS deauthentifizieren (Token löschen)

Als Deauthentifizierung wird das Löschen Ihrer Token bezeichnet.  Durch Löschen Ihrer Token wird vermieden, daß Unbefugte Ihre Token zum Zugreifen auf  AFS verwenden, wenn Sie nicht an Ihrer Maschine sind.

Führen Sie die folgenden Schritte aus, um sich von AFS zu deauthentifizieren:

1.	Rufen Sie das Register Token im AFS Light-Merkmalfenster wahlweise mit einer der folgenden Vorgehensweisen auf:

Suchen Sie im Menü Start die Programmgruppe IBM AFS (oder IBM WebSphere) und die Programmuntergruppe Light. Klicken Sie auf Authentifizierung.

Klicken Sie in der Task-Leiste auf das Symbol AFS Light, und wählen Sie das RegisterTokenaus. Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

2.	Wenn Sie in mehr als einer Zelle über Token verfügen, wählen Sie das Register mit dem Namen der Zelle aus, von der Sie sich deauthentifizieren wollen.

3.	Klicken Sie auf den Knopf Diese Token löschen.

Hinweis:	Sie können Sie immer nur von einer Zelle deauthentifizieren. Wenn Sie für mehr als eine Zelle Token besitzen, wiederholen Sie nacheinander für jede Zelle die Schritte 2 und 3.

Sie sind nicht mehr bei AFS in der angegebenen Zelle authentifiziert. Um sich erneut bei AFS zu authentifizieren, wählen Sie den Knopf Neue Token erhalten.

Zugehörige Abschnitte:

Bei AFS authentifizieren


Authentifizierung prüfen

Wenn Sie ein Token besitzen, sind Sie bei einer AFS- Zelle authentifiziert. Sie können Ihre Token auflisten lassen, um zu überprüfen, ob Sie authentifiziertsind.

Es ist sinnvoll, die Token-Informationen anzuzeigen, um zu prüfen, ob die Option Integrierte Anmeldung für Ihre Client-Maschine ausgewählt ist. Es ist ebenfalls sinnvoll, die Authentifizierung zu prüfen, wenn Sie keinen Zugriff auf eine Datei in AFS erhalten können oder vermuten, daß ein Token abgelaufen ist. Wenn Ihr Token abgelaufen ist, müssen Sie sich bei AFS erneut authentifizieren.

Führen Sie die folgenden Schritte durch, um die Authentifizierung zu prüfen:

1.	Öffnen Sie das Register Token im AFS Light-Merkmalfenster wahlweise mit einer der folgenden Vorgehensweisen auf:

Suchen Sie im Menü Start die Programmgruppe IBM AFS (oder IBM WebSphere) und die Programmuntergruppe Light. Klicken Sie auf Authentifizierung.

Klicken Sie in der Task-Leiste auf das Symbol AFS Light, und wählen Sie das  Register Token aus.Weitere Informationen siehe Das Symbol für AFS Light anzeigen.

Auf dem Register Token im AFS Light-Merkmalfenster werden Informationen zu den Token angezeigt.

Wenn Sie für mehr als eine Zelle über Token verfügen, erscheint auf dem Register anstelle des Wortes Token der Name der Zelle. Wenn Sie beispielsweise Token für die Zellen abc.comund xyz.com  besitzen, dann weisen die beiden ersten Register im AFS Light-Merkmalfenster die Bezeichnung abc.com und xyz.com auf. Diese Register treten an die Stelle des Registers Token. Sie enthalten dieselben Angaben und Informationen wie das Register Token.

Wenn Sie zum aktuellen Zeitpunkt in keiner AFS-Zelle über Token verfügen, dann enthält das Register Tokenkeinerlei Token-Informationen. Siehe Register Token (keine Token).

Zugehörige Abschnitte:

Bei AFS authentifizieren (Token erhalten)

Von AFSdeauthentifizieren (Token löschen)


Dialogfenster Volume-Informationen

Das Dialogfenster Volume-Informationen enthält die folgenden Angaben:

  Datei/Verzeichnis

  Name

  ID

  Quote

  Verwendet

  % verwendet

  Neue Quote

  Informationen zur Partition anzeigen

 Zugehörige Abschnitte:

AFS-Dateispeicherungskonzepte

Volumes und Partitionen


Dialogfenster Volume-Informationen - Feld % verwendet
%verwendet

Zeigt in Prozent die Belegung der Quoteeines Volumes an.


Dialogfenster Volume-Informationen - Feld Datei/Verzeichnis
Datei/Verzeichnis

Zeigt den Namen der ausgewählten Datei bzw. des ausgewählten Verzeichnissen an, für die bzw. für den die Volume-Informationen angezeigt werden.


Dialogfenster Volume-Informationen - Feld ID
ID

Zeigt die ID-Nummer des Volumes an.


Dialogfenster Volume-Informationen - Feld Name
Name

Zeigt den Namen des Volumes an, in dem sich die ausgewählte Datei oder das ausgewählte Verzeichnis befindet.


Dialogfenster Volume-Informationen - Feld Neue Quote
Neue Quote

Ermöglicht Ihnen, eine neue Quote (in KB) für das Volume festzulegen, in dem sich die ausgewählte Datei oder das Verzeichnis befindet.

 Hinweis:  Nur Systemadministratoren können die Quote hochsetzen.


Dialogfenster Volume-Informationen - Feld Quote
Quote

Zeigt die Quote in KB an, die dem Volume zugewiesen ist.


Dialogfenster Volume-Informationen - Feld Informationen zur Partition anzeigen
Informationen zur Partition anzeigen

Ermöglicht Ihnen, das Dialogfenster Informationen zur Partition mit Informationen zu der Partition aufzurufen, in dem sich das Volume befindet.


Dialogfenster Volume-Informationen - Feld Verwendet
Verwendet

Zeigt den Plattenspeicherplatz in KB an, der zum aktuellen Zeitpunkt auf dem Volume belegt ist.


Befehl Volume/Partition
Der Befehle Volume/Partition

Der Zugriff auf den Befehl Volume/Partition erfolgt vom AFS-Menü. Die folgenden zwei Optionen stehen zur Verfügung:

Merkmale

Es werden Informationen zum Volume und zur Partition angezeigt. Wenn Sie diese Option wählen, dann erscheint das Dialogfenster Volume-Informationen.

Weitere Informationen siehe Volume- und Partitionsmerkmale anzeigen.

Name/ID-Zuordnung aktualisieren

Die aktuelle Zuordnungstabelle zwischen Volume-Namen und Volume-ID-Nummern wird von der Client-Maschine gelöscht und durch eine aktualisierte ersetzt. Weitere Informationen siehe Name/ID-Zuordnungenaktualisieren.

Zugehörige Abschnitte:

Dateispeicherungskonzepte

Volumes und Partitionen


Volumes und Partitionen

Der Zugriff auf den Befehl Volumes und Partitionen erfolgt vom AFS-Menü. Das Menüelement Volume/Partition im AFS-Menüenthält zwei  Optionen: Merkmale und Name/ID-Zuordnung aktualisieren.

Merkmale

Jeder Datenträger in einem Computer ist in Abschnitte (Sektionen)  unterteilt, die als Partitionen bezeichnet werden. AFS gliedert die Partitionen in kleinere Untereinheiten auf, sogenannte Volumes. Ein Volume umfaßt eine untergeordnete Baumstruktur zusammengehörender Daten bzw. Verzeichnisse und eignet sich zum Speichern, Sichern und Verschieben von  zusammengehörenden Dateien und Verzeichnissen. Jedes Volume unterliegt einer Größenbeschränkung, der sogenannten Quote, die gleichbedeutend mit dem Plattenspeicherplatz ist, den ein Volume maximal umfassen kann. Quoten werden vom Systemadministrator festgelegt.

Die Option Merkmale zeigt Informationen zum  Volume und zur Partition an.  Weitere Informationen siehe Volume- und Partitionsmerkmale anzeigen.

Name/ID-Zuordnung aktualisieren

AFS Light greift auf eine Zuordnungstabelle zu, die Volume-Namen den entsprechenden Volume-ID-Nummern zuordnet.  Wenn Sie Dateien vom AFS-Dateibereich anfordern, erfolgt der Zugriff auf ein Volume auf der Grundlage der Informationen,  die in der Zuordnungstabelle gespeichert sind. Volume-Informationen ändern sich gelegentlich. So kann sich zum Beispiel der Name eines Volumes ändern, oder der zuständige Systemadministrator gibt neue Read Only-Replikate frei. AFS verfügt über ein Verfahren zur Aktualisierung der Zuordnungen von Volumen-Namen und Volume-ID-Nummern. Dadurch wird sichergestellt, daß Sie auf das Volume mit den aktuellsten Informationen zugreifen, die auf dem Datei-Server verfügbar sind.

Die Option Name/ID-Zuordnung aktualisieren  löscht Ihre aktuelle Tabelle für Zuordnungen zwischen Volume-Namen und Volume-ID-Nummern und ersetzt sie durch eine aktualisierte. Weitere Information siehe Name/Volume-ID-Zuordnungen aktualisieren.

Zugehörige Abschnitte:

Dateispeicherungskonzepte