\documentstyle[11pt]{article}
\title{Project Description}
\author{Matthew Gray}
\begin{document}
\maketitle

Using the fluctuation-dissipation relation and equipartition theorem,
it is possible to evaluate a first principals noise model of a system.
The goal of this project will be to do this for the case of the human
body.

\par

Specifically, the noise produced in various configurations typical of
the PAN system will be evaluated.  Combined with signal strength data
from previous simulations and experimental data, an estimate of the
body's channel capacity is possible.

\par

Time permitting, a noise analysis of the analog signal amplification
will be determined to determine a more realistic overal channel model.

\end{document}


