\documentstyle[11pt]{article}
\begin{document}
\begin{center}
\large{Electric Field Modelling in an Electrostatic Intrabody Signalling System}\\
by Matthew Gray
\end{center}

The performance of data transmission by electrostatic signalling
through the human body is highly subject to the geometry of the
system.  The system is modelled as a set of equipotentials, with their
capacitive couplings solved for based on the current geometry.  This
paper describes various transmitter/receiver geometries and presents
theoretical calculations for relative signal strengths.

\end{document}