0 5 10 15 20 25 30 35 40 45 50 0 20 40 60 80 100 120 140 160 180 200

Bin Number

Counts

Plot of differences of arrival times of cosmic muons with scintillators separated by 1.64m

Height=184.6 Center=21.4 Background=7.15 Std Dev=4.8