0 10 20 30 40 50 60 1 1.5 2 2.5 3 3.5 4 4.5 5 5.5 6

Bin Number (1 bin = .185 microseconds)

Log of Counts for Run 1 (22h 41m 12s)

Muon Decay in Plastic Scintillator (Run 1)

Slope = -2.278 microseconds^(-1) Y-Intercept = 5.5455