\input output
\input tables2
\vsize=4in
This is a test.

\bigskip

\table{lr}
Left & Right \\
\hrule
\endheader
No & change \\
at& all. \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
blah & foob \\
\endtable

\bye
