NAME	     osidebug

DESCRIPTION  'OSI Remote Debugging Program'

EXETYPE      WINDOWS

STUB	     'WINSTUB.EXE'

CODE	     PRELOAD MOVEABLE
DATA	     PRELOAD MOVEABLE MULTIPLE

HEAPSIZE     1024
STACKSIZE    8192

EXPORTS
	MainWndProc   @1
	About	      @2
