\HeaderA{MASS-internal}{Internal MASS functions}{MASS.Rdash.internal}
\aliasA{enlist}{MASS-internal}{enlist}
\aliasA{fbeta}{MASS-internal}{fbeta}
\aliasA{frequency.polygon}{MASS-internal}{frequency.polygon}
\aliasA{nclass.freq}{MASS-internal}{nclass.freq}
\aliasA{neg.bin}{MASS-internal}{neg.bin}
\aliasA{negexp.SSival}{MASS-internal}{negexp.SSival}
\keyword{internal}{MASS-internal}
\begin{Description}\relax
Internal MASS functions
\end{Description}
\begin{Usage}
\begin{verbatim}
enlist(vec)
fbeta(x, alpha, beta)
frequency.polygon(x, nclass = nclass.freq(x), xlab="", ylab="", ...)
nclass.freq(x)
neg.bin(theta = stop("'theta' must be given"))
negexp.SSival(mCall, data, LHS)
\end{verbatim}
\end{Usage}
\begin{Details}\relax
These are not intended to be called by the user.
Some are for compatibility
with earlier versions of MASS (the book).
\end{Details}

