\HeaderA{steam}{The Saturated Steam Pressure Data}{steam}
\keyword{datasets}{steam}
\begin{Description}\relax
Temperature and pressure in a saturated steam driven experimental
device.
\end{Description}
\begin{Usage}
\begin{verbatim}
steam
\end{verbatim}
\end{Usage}
\begin{Format}\relax
The data frame contains the following components:
\describe{
\item[\code{Temp}] Temperature, in degrees Celsius

\item[\code{Press}] Pressure, in Pascals
}
\end{Format}
\begin{Source}\relax
N.R. Draper  and H. Smith (1981)
\emph{Applied Regression Analysis.}
Wiley, pp. 518--9.
\end{Source}
\begin{References}\relax
Venables, W. N. and Ripley, B. D. (1999)
\emph{Modern Applied Statistics with S-PLUS.} Third
Edition. Springer.
\end{References}

