\HeaderA{Defunct}{Marking Objects as Defunct}{Defunct}
\aliasA{.Defunct}{Defunct}{.Defunct}
\keyword{documentation}{Defunct}
\keyword{utilities}{Defunct}
\begin{Description}\relax
When an object is removed from \R{} it should be replaced by a call to
\code{.Defunct}.
\end{Description}
\begin{Usage}
\begin{verbatim}
.Defunct(new, package = NULL)
\end{verbatim}
\end{Usage}
\begin{Arguments}
\begin{ldescription}
\item[\code{new}] character string: A suggestion for a replacement function.

\item[\code{package}] character string: The package to be used when suggesting where the
defunct function might be listed.

\end{ldescription}
\end{Arguments}
\begin{Details}\relax
\code{.Defunct} is called from defunct functions. Functions should be
listed in \code{help("pkg-defunct")} for an appropriate \code{pkg},
including \code{base}.
\end{Details}
\begin{SeeAlso}\relax
\code{\LinkA{Deprecated}{Deprecated}}.

\code{base-defunct} and so on which list the defunct functions
in the packages.
\end{SeeAlso}

