\HeaderA{library.dynam}{Loading Shared Libraries}{library.dynam}
\aliasA{.dynLibs}{library.dynam}{.dynLibs}
\methaliasA{library.dynam.unload}{library.dynam}{library.dynam.unload}
\keyword{data}{library.dynam}
\begin{Description}\relax
Load the specified file of compiled code if it has not been loaded
already, or unloads it.
\end{Description}
\begin{Usage}
\begin{verbatim}
library.dynam(chname, package = NULL, lib.loc = NULL,
              verbose = getOption("verbose"),
              file.ext = .Platform$dynlib.ext, ...)
library.dynam.unload(chname, libpath,
              verbose = getOption("verbose"),
              file.ext = .Platform$dynlib.ext)
.dynLibs(new)
\end{verbatim}
\end{Usage}
\begin{Arguments}
\begin{ldescription}
\item[\code{chname}] a character string naming a shared library to load.
\item[\code{package}] a character vector with the names of packages to search
through, or \code{NULL}.  By default, all packages in the search
path are used.
\item[\code{lib.loc}] a character vector describing the location of \R{}
library trees to search through, or \code{NULL}.  The default value
of \code{NULL} corresponds to all libraries currently known.
\item[\code{libpath}] the path to the loaded package whose shared library is
to be unloaded.
\item[\code{verbose}] a logical value indicating whether an announcement
is printed on the console before loading the shared library.  The
default value is taken from the verbose entry in the system
options.
\item[\code{file.ext}] the extension to append to the file name to specify
the library to be loaded. This defaults to the appropriate value
for the operating system.
\item[\code{...}] additional arguments needed by some libraries that
are passed to the call to \code{\LinkA{dyn.load}{dyn.load}} to control
how the library is loaded.
\item[\code{new}] a list of DLLInfo objects corresponding to the shared
libraries loaded by packages.
\end{ldescription}
\end{Arguments}
\begin{Details}\relax
\code{library.dynam} is designed to be used inside a package rather
than at the command line, and should really only be used inside
\code{\LinkA{.First.lib}{.First.lib}} or \code{\LinkA{.onLoad}{.onLoad}}.  The
system-specific extension for shared libraries
(e.g., \file{.so} or \file{.sl} on Unix systems)
should not be added.  Note that to allow for versioned installs, the
first argument should not be set to the \code{pkgname} argument of
\code{.First.lib} or \code{.onLoad}.

\code{library.dynam.unload} is designed for use in
\code{\LinkA{.Last.lib}{.Last.lib}} or \code{\LinkA{.onUnload}{.onUnload}}.

\code{.dynLibs} is used for getting or setting the shared libraries
which were loaded by packages (using \code{library.dynam}).  Versions
of \R{} prior to 2.1.0 simply recorded the (names of) packages which had
loaded shared libraries.  Versions of \R{} prior to 1.6.0 used an
internal global variable \code{.Dyn.libs} for storing this
information: this variable is now defunct.
\end{Details}
\begin{Value}
If \code{chname} is not specified, \code{library.dynam} returns an
object of class \code{"DLLInfoList"} corresponding to the shared
libraries loaded by packages.

If \code{chname} is specifed, an object of class \code{"DLLInfo"} that
identifies the DLL and can be used in future calls is returned
invisibly.  For packages that have namespaces, a list of these objects
is stored in the namespace's environment for use at run-time.

\code{library.dynam.unload} invisibly returns an object of class
\code{"DLLInfo"} identifying the DLL successfully unloaded.
\end{Value}
\begin{References}\relax
Becker, R. A., Chambers, J. M. and Wilks, A. R. (1988)
\emph{The New S Language}.
Wadsworth \& Brooks/Cole.
\end{References}
\begin{SeeAlso}\relax
\code{\LinkA{getLoadedDLLs}{getLoadedDLLs}} for information on DLLInfo and DLLInfoList
objects.

\code{\LinkA{.First.lib}{.First.lib}}, \code{\LinkA{library}{library}},
\code{\LinkA{dyn.load}{dyn.load}}, \code{\LinkA{.packages}{.packages}},
\code{\LinkA{.libPaths}{.libPaths}}

\code{\LinkA{SHLIB}{SHLIB}} for how to create suitable shared libraries.
\end{SeeAlso}
\begin{Examples}
\begin{ExampleCode}
## Which DLLs were "dynamically loaded" by packages?
library.dynam() 
\end{ExampleCode}
\end{Examples}

