\HeaderA{sample}{Random Samples and Permutations}{sample}
\keyword{distribution}{sample}
\begin{Description}\relax
\code{sample} takes a sample of the specified size from the elements
of \code{x} using either with or without replacement.
\end{Description}
\begin{Usage}
\begin{verbatim}
sample(x, size, replace = FALSE, prob = NULL)
\end{verbatim}
\end{Usage}
\begin{Arguments}
\begin{ldescription}
\item[\code{x}] Either a (numeric, complex, character or logical) vector of
more than one element from which to choose, or a positive integer.
\item[\code{size}] non-negative integer giving the number of items to choose.
\item[\code{replace}] Should sampling be with replacement?
\item[\code{prob}] A vector of probability weights for obtaining the elements
of the vector being sampled.
\end{ldescription}
\end{Arguments}
\begin{Details}\relax
If \code{x} has length 1, sampling takes place from
\code{1:x}.  \emph{Note} that this convenience feature may lead to
undesired behaviour when \code{x} is of varying length
\code{sample(x)}.  See the \code{resample()} example below.

By default \code{size} is equal to \code{length(x)}
so that \code{sample(x)} generates a random permutation
of the elements of \code{x} (or \code{1:x}).

The optional \code{prob} argument can be used to give a vector
of weights for obtaining the elements of the vector being
sampled. They need not sum to one, but they should be nonnegative
and not all zero.  If \code{replace} is true, Walker's alias method
(Ripley, 1987) is used when there are more that 250 reasonably
probable values: this gives results incompatible with those from \R{} <
2.2.0, and there will be a warning the first time this happens in a
session.

If \code{replace} is false, these probabilities are applied
sequentially, that is the probability of choosing the next item is
proportional to the probabilities amongst the remaining items. The number
of nonzero weights must be at least \code{size} in this case.
\end{Details}
\begin{References}\relax
Becker, R. A., Chambers, J. M. and Wilks, A. R. (1988)
\emph{The New S Language}.
Wadsworth \& Brooks/Cole.

Ripley, B. D. (1987) \emph{Stochastic Simulation}. Wiley.
\end{References}
\begin{Examples}
\begin{ExampleCode}
x <- 1:12
# a random permutation
sample(x)
# bootstrap sampling -- only if length(x) > 1 !
sample(x,replace=TRUE)

# 100 Bernoulli trials
sample(c(0,1), 100, replace = TRUE)

## More careful bootstrapping --  Consider this when using sample()
## programmatically (i.e., in your function or simulation)!

# sample()'s surprise -- example
x <- 1:10
    sample(x[x >  8]) # length 2
    sample(x[x >  9]) # oops -- length 10!
try(sample(x[x > 10]))# error!

## This is safer:
resample <- function(x, size, ...)
  if(length(x) <= 1) { if(!missing(size) && size == 0) x[FALSE] else x
  } else sample(x, size, ...)

resample(x[x >  8])# length 2
resample(x[x >  9])# length 1
resample(x[x > 10])# length 0
\end{ExampleCode}
\end{Examples}

