\HeaderA{sink}{Send R Output to a File}{sink}
\methaliasA{sink.number}{sink}{sink.number}
\keyword{file}{sink}
\keyword{connection}{sink}
\begin{Description}\relax
\code{sink} diverts \R{} output to a connection.

\code{sink.number()} reports how many diversions are in use.

\code{sink.number(type = "message")} reports the number of the
connection currently being used for error messages.
\end{Description}
\begin{Usage}
\begin{verbatim}
sink(file = NULL, append = FALSE, type = c("output", "message"),
     split = FALSE)

sink.number(type = c("output", "message"))
\end{verbatim}
\end{Usage}
\begin{Arguments}
\begin{ldescription}
\item[\code{file}] a connection or a character string naming the
file to write to, or \code{NULL} to stop sink-ing.
\item[\code{append}] logical. If \code{TRUE}, output will be appended to
\code{file}; otherwise, it will overwrite the contents of
\code{file}.
\item[\code{type}] character. Either the output stream or the messages
stream.
\item[\code{split}] logical: if \code{TRUE}, output will be sent to the new
sink and to the current output stream, like the Unix program \code{tee}.
\end{ldescription}
\end{Arguments}
\begin{Details}\relax
\code{sink} diverts \R{} output to a connection. If \code{file} is a
character string, a file connection with that name will be established
for the duration of the diversion.

Normal \R{} output is diverted by the default \code{type = "output"}.
Only prompts and warning/error messages continue to appear on the terminal.
The latter can diverted by \code{type = "message"} (see below).

\code{sink()} or \code{sink(file=NULL)} ends the last diversion (of
the specified type).  There is a stack of diversions for normal
output, so output reverts to the previous diversion (if there was
one).  The stack is of up to 21 connections (20 diversions).

If \code{file} is a connection it will be opened if necessary.

Sink-ing the messages stream should be done only with great care.
For that stream \code{file} must be an already open connection, and
there is no stack of connections.
\end{Details}
\begin{Value}
\code{sink} returns \code{NULL}.

For \code{sink.number()} the number (0, 1, 2, \dots) of diversions of
output in place.

For \code{sink.number("message")} the connection number used for
messages, 2 if no diversion has been used.
\end{Value}
\begin{Section}{Warning}
Don't use a connection that is open for \code{sink} for any other
purpose.  The software will stop you closing one such inadvertently.

Do not sink the messages stream unless you understand the source code
implementing it and hence the pitfalls.
\end{Section}
\begin{References}\relax
Becker, R. A., Chambers, J. M. and Wilks, A. R. (1988)
\emph{The New S Language}.
Wadsworth \& Brooks/Cole.

Chambers, J. M. (1998)
\emph{Programming with Data. A Guide to the S Language}.
Springer.
\end{References}
\begin{SeeAlso}\relax
\code{\LinkA{capture.output}{capture.output}}
\end{SeeAlso}
\begin{Examples}
\begin{ExampleCode}
sink("sink-examp.txt")
i <- 1:10
outer(i, i, "*")
sink()
unlink("sink-examp.txt")
## Not run: 
## capture all the output to a file.
zz <- file("all.Rout", open="wt")
sink(zz)
sink(zz, type="message")
try(log("a"))
## back to the console
sink(type="message")
sink()
try(log("a"))
## End(Not run)\end{ExampleCode}
\end{Examples}

