\HeaderA{cloth}{Number of Flaws in Cloth}{cloth}
\keyword{datasets}{cloth}
\begin{Description}\relax
The \code{cloth} data frame has 32 rows and 2 columns.
\end{Description}
\begin{Usage}
\begin{verbatim}
cloth
\end{verbatim}
\end{Usage}
\begin{Format}\relax
This data frame contains the following columns:
\describe{
\item[\code{x}] The length of the roll of cloth.

\item[\code{y}] The number of flaws found in the roll.
}
\end{Format}
\begin{Source}\relax
The data were obtained from


Bissell, A.F. (1972) A negative binomial model with varying element size.
\emph{Biometrika}, \bold{59}, 435--441.
\end{Source}
\begin{References}\relax
Davison, A.C. and Hinkley, D.V. (1997) 
\emph{Bootstrap Methods and Their Application}. Cambridge University Press.
\end{References}

