\HeaderA{neuro}{Neurophysiological Point Process Data}{neuro}
\keyword{datasets}{neuro}
\begin{Description}\relax
\code{neuro} is a matrix containing times of observed firing of a neuron in windows
of 250ms either side of the application of a stimulus to a human subject.
Each row of the matrix is a replication of the experiment and there were a 
total of 469 replicates.
\end{Description}
\begin{Note}\relax
There are a lot of missing values in the matrix as different numbers of 
firings 
were observed in different replicates.  The number of firings observed varied 
from 2 to 6.
\end{Note}
\begin{Source}\relax
The data were collected and kindly made available by Dr. S.J. Boniface of the
Neurophysiology Unit at the Radcliffe Infirmary, Oxford.
\end{Source}
\begin{References}\relax
Davison, A.C. and Hinkley, D.V. (1997) 
\emph{Bootstrap Methods and Their Application}. Cambridge University Press.


Ventura, V., Davison, A.C. and Boniface, S.J. (1997) A stochastic model for 
the effect of magnetic brain stimulation on a motoneurone. To appear in
\emph{Applied Statistics}.
\end{References}

