\HeaderA{nhtemp}{Average Yearly Temperatures in New Haven}{nhtemp}
\keyword{datasets}{nhtemp}
\begin{Description}\relax
The mean annual temperature in degrees Fahrenheit in New Haven,
Connecticut, from 1912 to 1971.
\end{Description}
\begin{Usage}
\begin{verbatim}nhtemp\end{verbatim}
\end{Usage}
\begin{Format}\relax
A time series of 60 observations.
\end{Format}
\begin{Source}\relax
Vaux, J. E. and Brinker, N. B. (1972)
\emph{Cycles}, \bold{1972}, 117--121.
\end{Source}
\begin{References}\relax
McNeil, D. R. (1977)
\emph{Interactive Data Analysis}.
New York: Wiley.
\end{References}
\begin{Examples}
\begin{ExampleCode}
plot(nhtemp, main = "nhtemp data",
  ylab = "Mean annual temperature in New Haven, CT (deg. F)")
\end{ExampleCode}
\end{Examples}

