\HeaderA{panel.stripplot}{Default Panel Function for stripplot}{panel.stripplot}
\keyword{dplot}{panel.stripplot}
\begin{Description}\relax
This is the default panel function for \code{stripplot}. Also see
\code{panel.superpose}
\end{Description}
\begin{Usage}
\begin{verbatim}
panel.stripplot(x, y, jitter.data = FALSE, factor = 0.5,
                horizontal = TRUE, groups = NULL,
                ...)
\end{verbatim}
\end{Usage}
\begin{Arguments}
\begin{ldescription}
\item[\code{x,y}] coordinates of points to be plotted
\item[\code{jitter.data}] whether points should be jittered to avoid
overplotting.
\item[\code{factor}] factor by which to jitter
\item[\code{horizontal}] logical. If FALSE, the plot is \sQuote{transposed}
in the sense that the behaviours of x and y are switched. x is now
the \sQuote{factor}.  Interpretation of other arguments change
accordingly. See documentation of \code{\LinkA{bwplot}{bwplot}} for a fuller
explanation.

\item[\code{groups}] optional grouping variable 
\item[\code{...}] graphical parameters etc can be supplied, passed to
\code{panel.xyplot} or \code{panel.superpose}, depending on whether
\code{groups} is present
\end{ldescription}
\end{Arguments}
\begin{Details}\relax
Creates stripplot (one dimensional scatterplot) of \code{x}
for each level of \code{y}
\end{Details}
\begin{Author}\relax
Deepayan Sarkar \email{Deepayan.Sarkar@R-project.org}
\end{Author}
\begin{SeeAlso}\relax
\code{\LinkA{stripplot}{stripplot}}
\end{SeeAlso}

