\HeaderA{flush.console}{Flush Output to A Console}{flush.console}
\keyword{utilities}{flush.console}
\begin{Description}\relax
This does nothing except on console-based versions of \R.
On the Mac OS X and Windows GUIs, it ensures that the display of
output in the console is current, even if output buffering is on.
\end{Description}
\begin{Usage}
\begin{verbatim}
flush.console()
\end{verbatim}
\end{Usage}

