1 2

1 2 3 4 5 6 7 8 9

1 2

1 2 3 4 5 6 7 8 9

1

2

1 2 3 4 5 6 7 8 9

1

2

1 2 3 4 5 6 7 8 9

The frame on this page should be one inch from each edge of the paper.

The rulers at the four edges will indicate how much of the page is useable. The ticks of the left and top rulers are 1mm apart. The large ticks are .1^{′′} apart.

1 2

1 2 3 4 5 6 7 8 9

1 2

1 2 3 4 5 6 7 8 9

1

2

1 2 3 4 5 6 7 8 9

1

2

1 2 3 4 5 6 7 8 9

The frame on this page should be one inch from each edge of the paper.

The rulers at the four edges will indicate how much of the page is useable. The ticks of the left and top rulers are 1mm apart. The large ticks are .1^{′′} apart.