PRESENTED AT THE IECON 1993 4

Preparing IECON-Articles Using the Style File IEEEtran.sty

Silvano Balemi Automatic Control Laboratory Swiss Federal Institute of Technology (ETH) 8092 Zurich, Switzerland

Abstract— This is the abstract. Note that the font size is the normal 11 point size.

Introduction

This is the introduction... All command should be supported by this style file

(see [?]).