Statue

of

Liberty

Length of hand:

16 feet 5 inches

Greatest thickness

of right arm: 12 ft.

Number of steps

from base of

pedestal to torch:

338

Weight of copper

used in statue:

100 tons.

Weight of steel

used in statue:

125 tons.

Total weight

of statue:

225 tons.

Thickness

of copper

sheeting:

1/32 to 1/8

inches

Thickness

of waist:

35 feet

Height of

statue

from base

to torch:

151 feet

1 inch

Length of torch: 21feet

The seven rays

in the crown�s

diadem represent

seven seas

and seven

continents

Inscription

on tablet:

�July 4, 1776�

JUDY TREIBLE/Knight-Ridder Graphics Network

BULLETIN BOARD: Today’s Graphics

SUBJECT: Statue of Libery: Fun Facts

ARTIST/ORIGIN: Judy Treible, KRGN

RECOMMENDED WIDTH: 2 columns (75% reduction)

ENTERED: 06/18/86

Fun Facts