Figure 1. Probability of False Detection vs. Cluster Size Threshold; Spatially Uncorrelated Voxels

Figure 2. Probability of False Detection vs. Cluster Size Threshold;

Spatially Correlated Voxels (FWHM = 4 mm)

Figure 3. Log (Voxel Probability Threshold) vs. Cluster Size Threshold; Constant Alpha = 0.05

Figure 4. Power vs. Cluster Size Threshold;

Spatially Uncorrelated Voxels

Figure 5. Power vs. Cluster Size Threshold; Spatially Correlated Voxels (FWHM = 4 mm)

Figure 6. Alpha/Voxel vs. Cluster Size Threshold;

Spatially Uncorrelated Voxels

Figure 7. Alpha/Voxel vs. Cluster Size Threshold; Spatially Correlated Voxels (1 sigma = 0.6 voxel)

Figure 8. Power/Voxel vs. Cluster Size Threshold;

Spatially Uncorrelated Voxels

Figure 9. Power/Voxel vs. Cluster Size Threshold; Spatially Correlated Voxels (1 sigma = 0.6 voxel)