Disclaimer:

MCW AFNI , its associated programs, and its documentation are provided as is, and no warranty for their correctness or usefulness for any purpose is made or implied by the Medical College of Wisconsin (MCW), or by the author of the software. Neither MCW nor the author accepts any liability for any defects in this software or its manuals, or for any damages caused by use of this software.

Ownership, Conditions of Use, and Restrictions:

ffl Permission is granted to make use of and to make copies of the MCW AFNI software and documentation for research purposes only. Ownership of MCWAFNI and all copies is retained by the Medical College of Wisconsin.

ffl Patient-care applications are not recommended. MCW AFNI has not been evaluated by or approved by the United States Food and Drug Administration, or by any other agency.

ffl Use by for-profit organizations is restricted to one computer system per registration. The derivation of commercial products, directly or indirectly, from MCW AFNI is prohibited.

ffl Redistribution of MCW AFNI , or any derived work, outside the receiving institution is prohibited without prior permission.

ffl Copies may be made within non-commercial institutions without separate permission from the Medical College of Wisconsin.

ffl Technical support (e.g., the fixing of bugs, the explanation of documentation, etc.) for MCW AFNI is not guaranteed.

I agree to abide by the terms and restrictions above.

SIGNATURE:

NAME:

(print clearly, or type)

DATE:

E-MAIL ADDRESS: (print very clearly, or type)

To Register Copy this page onto your departmental or institutional letterhead (or otherwise indicate clearly your affiliation), sign and date, include your e-mail address, and return via mail or FAX to Robert W. Cox, PhD Biophysics Research Institute Medical College of Wisconsin 8701 Watertown Plank Road Milwaukee WI 53226 USA FAX: 414–456–6512 Instructions on how to obtain MCW AFNI by anonymous ftp and/or via the WWW will be sent by e-mail.