1 Program mritopgm

1.1 Purpose

Converts an image to raw pgm format. Results go to stdout and should be redirected. This program is only useful if the netpbm package is installed. (The shareware program xv can also read pgm images).

1.2 Usage

The command line format for program mritopgm is as follows:

mritopgm input image

1.3 Example

mritopgm fred.001 j ppmtogif ¿ fred.001.gif