1 Program nsize

1.1 Purpose

Expand a 2D image file up to a ‘normal’ (i.e., power-of-2) size. This is useful when the 2D image is to be used as input to an FFT (Fast Fourier Transform) program.

1.2 Usage

nsize image in image out

1.3 Notes

ffl The program zero pads ‘image in’ to size NxN, where N=64, 128, 256, 512, or 1024, whichever is the closest size larger than ‘image in’.

ffl The program works only for byte and short images.