\documentstyle[11pt]{article}
\title{Project Description}
\author{Matthew Gray}
\begin{document}
\maketitle

Using the fluctuation-dissipation relation, equipartition theorem, and
empirical models of analog components it is possible to evaluate a
noise model of a system.  The goal of this project will be to do this
for the case of the human body in the context of PAN.

\par

Specifically, the noise produced in various configurations typical of
the PAN system will be evaluated.  Combined with signal strength data
from previous simulations and experimental data, an estimate of the
body's channel capacity is possible.

\par

Time permitting, a noise analysis of the analog signal amplification
will be determined to determine a more realistic overall channel model.

\end{document}
