\documentstyle[12pt]{article}

\setlength{\oddsidemargin}{0in}
\setlength{\evensidemargin}{-0in}
\setlength{\textwidth}{6.5in}
\setlength{\topmargin}{-.5in}
\setlength{\textheight}{9in}
\def\centerleftbox#1{\centerline{\hbox to 0pt{\vbox{\hsize=3in{#1}}\hss}}}
\pagestyle{empty}
\parindent0pt
\begin{document}

{\obeylines
Departmentof Electrical Engineering and Computer Science
Room 38-444
Massachusetts Institute of Technology
Cambridge, MA 02139
}

\vskip2ex

Attention: Professor Campbell L. Searle

\vskip2ex

Subject: SM Thesis of Kenneth J. Duda

\vskip2ex

I have reviewed the attached thesis of Kenneth J. Duda on behalf of
Rolm, a Siemens Company.  The thesis is within the scope of the thesis
proposal as previously approved and does not contain any material that
is objectionable to Rolm.  It is also approved for its technical
content.

\vskip\baselineskip

It is understood that the actual thesis document will be the permanent
property of MIT and will be placed in the MIT Library within one month
after the date of submission.  Rolm agrees that MIT shall have the
nonexclusive right to reproduce, publish, and distribute the thesis.

\vskip1in
\underline{\hspace*{3in}}\\
Authorized Official\\
Rolm Systems

\end{document}
