%%%%%
%%
%% Greensheets live in this directory.  This file doubles as a
%% latex'able example greensheet.
%%
%% Greensheet macros (in ../Lists/green-LIST.tex, presumably) each
%% have a file that lives here.  The argument to \name{...} probably
%% should be the macro for the given greensheet, which will generate
%% the greensheet's name as specified in green-LIST.tex.  However, you
%% can also just use \name{Some Text} if you want.
%%
%%%%%

\documentclass[green]{conditionechoblueshift}
\begin{document}

\name{\gCD{}}

\bigquote{``You need to remember that all great circles must be
terminated.  In the case of the great circuit of Al-Hazred, the
terminator was originally a black goat, sacrificed at midnight with a
silver knife touched only by virgins, but these days we just use a
fifty microfarad capacitor...''}{-- The Atrocity Archive}

\gameloc{} has five main base mainframes scattered throughout it, 
relics from when the base was first established. Ancient as they are, 
they're critical to the centre's proper operation. They maintain the 
paranormal geas protecting the base and, with the imminent threat of 
a giant rift opening in spacetime, are all that keeps the base 
together.

The five computers are spread across the base, located in:
\pMainFrameI{\MYwhere}, \pMainFrameII{\MYwhere},
\pMainFrameIII{\MYwhere}, \pMainFrameIV{\MYwhere}, and
\pMainFrameV{\MYwhere}.

As a computational demonologist, you're one of the sysadmins 
responsible for making sure the computers stay working. If too many of 
them are disabled at once, there's nothing stopping demons from the 
extraplatonic realms from showing up to say hello.

Furthermore, if the Paranormal Researchers manage to write a program 
to close the rift for good, they're going to need the computers 
operational to deploy it.

To fix a broken computer, you will need to find a {\bf
  \iScrewdriver{}} in order to open the case.

You will then need to identify the broken part and repair it. There
are three components to each computer that can be broken, and each
needs to be repaired in a different way:

\begin{enum}[RAID Array]
  \item Find two {\bf \iHardDrive{}s}
  \item Find a new {\bf \iRaidController{}}
  \item Place them in the ``RAID'' packet inside the computer
  \item Spend three minutes with both hands on the computer to
    initialize the new array.
\end{enum}

\begin{enum}[Interdimensional Mesh Interface]
  \item Find two {\bf \iBigCap{}s}
  \item Find a {\bf \iWire{}}
  \item Find another willing person. They don't need to have this
    greensheet
  \item Each of you need a {\bf \iGroundingCord{}}
  \item Both of you must spend one minute within ZoC of the
    computer. Destroy all five items.
\end{enum}

\begin{enum}[Power Supply]
  \item Find two {\bf \iMedCap{}s}
  \item Find a {\bf PowerCord{}}
  \item Optionally, find another person with this greensheet to help
    you
  \item Spend 4 minutes (two minutes if you have a helper) and destroy
    the capacitors and power cord.
\end{enum}

\end{document}
