\documentstyle[11pt,wp2latex]{report}
\begin{document}
{\bf ALTERNATE CYBERWARE DESCRIPTIONS}\\

\begin{tabbing}
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\kill
These documents contain a rather large selection of
\end{tabbing}
cyberware for GURPS. ~A lot of the material is inspired by\\
ICE's CyberSpace RPG (which certainly does have its virtues),\\
much of it origniates from GURPS Cyberpunk and Ultra-Tech, and\\
the rest is more or less my own invention.\\

\begin{tabbing}
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\kill
Since there are more than 120 different items, I've
\end{tabbing}
divided them into loose categories, with one file for each\\
category. ~There is also a separate file which simply lists\\
all the items by name and cost. ~\\

\begin{tabbing}
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\kill
Each item description includes the item's cost, how much
\end{tabbing}
the operation to install it will normally cost, the time\\
needed to recover after the operation, and also the item's\\
mass and power requirements, if any. ~There are no character\\
point costs listed, as I don't use them in my games (the PCs\\
in my campaign will have enough to worry about already). ~
\begin{tabbing}
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\kill
The costs for operations are, of course, not writ in
\end{tabbing}
stone; I'm sure all of you can think of situations where they\\
might be altered or waived entirely. ~Recovery times assume\\
that proper TL8 medical attention is available. ~If this is\\
not the case, double recovery time for each lower TL. ~If \\
medical attention of a higher TL is available, halve the time\\
for each higher TL.
\begin{tabbing}
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\kill
If a system has non-negligible mass, that mass will be 
\end{tabbing}
permanently added to the character's body mass and\\
encumbrance. ~The "unit" used to measure power requirements is\\
equivalent to one standard TL8 AA cell; each larger type of \\
cell holds 10 times as much power as the one before it. ~(By\\
the way, have any of you noticed how ridiculously large\\
amounts of energy standard ultra-tech power cells are able\\
to hold?)\\

\begin{tabbing}
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\kill
As a final disclaimer, I do not have a license from
\end{tabbing}
anyone to publish this cyberware list; nor do I make any \\
profit from it whatsoever. ~(In fact, it's cost me quite a\\
few hours' work, and I've done it all for fun.) ~Feel free\\
to spread it around. ~You don't even have to identify me as\\
the source for it. ~If you do find it useful, however, I\\
might like to hear from you. ~Encouraging comments are\\
welcome, as is constructive criticism. ~I can be contacted\\
at leifmk@lise.unit.no - hope someone enjoys this . . . .\\

\begin{tabbing}
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=\hspace{1.50cm}\=%
\hspace{1.50cm}\=\hspace{1.50cm}\=\kill
(And yes, some of the stuff does contradict "official"
\end{tabbing}
GURPS cyberware descriptions. ~So what?\\
\end{document}
